Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Replacement of A Mandibular Molar with Implant Retained Single Crown

Manas Singh, Khurshid A Mattoo*, Shailesh Jain

Department of Prosthodontics, College of dentistry, Jazan University, Jazan, (KSA)

Abstract: Among various challenges to restore a single tooth implant in the posterior region of the oral cavity is the creation of harmonious gingival contour beneath the restoration and near the abutment –gingiva interface so as not to allow plaque accumulation within this inaccessible zone. Deficiencies in the soft or hard tissue in the edentulous space are usually the most common obstacles to achieve a gingival symmetry around the proposed restoration, besides the factors like accessibility of cleansing aids to the area. This article describes a novel approach to eliminate the ridge or soft tissue deficiencies by over contouring and undermining soft tissue around the healing abutment at the second stage implant surgery.

Keywords: abutment, implant, cement, implant surgery, single crown

Received December 21, 2014; Revised December 27, 2014; Accepted December 31, 2014

Citation: Manas Singh, Khurshid A Mattoo, Shailesh Jain, Replacement of A Mandibular Molar with Implant Retained Single Crown. Oral Surgery Oral Medicine Oral Radiology, 2 (2). 25-27. January 2014. doi:10.12691/oral-2-2-6

1. Introduction

Treatment modalities for posterior tooth replacement have truly evolved from ancient transplant to modern day implants. They have more or less revolutionized the dental practice since the inspired work done by Branemark et al. [1] However, the precise role of single-tooth implants in the management of patients with compromised teeth has remained uncertain, controversial, and the subject of considerable debate. [2-7] This is mainly due to the criteria that have been set for the success of an implant system. [8,9] Marginal bone loss around the implant restoration is one criteria that determine the final outcome. Other factors that influence success rate are quantity and quality of bone, the presence or absence of keratinized tissue around the implant, the reason for tooth loss, the type of microflora present in the sulci/pockets of the natural teeth and implants, the patient’s plaque control, and the quality of professional maintenance, including the type of instruments used to clean the implants. [10-16].

The junction of the soft tissue and the implant has received considerable attention that is focused largely to recontouring of the gingiva to enhance aesthetics through the use of surgical or non-surgical means. [17,18] This article in the form of a clinical case report describes the use of the same principle to allow more favorable growth of soft tissue around posterior implant that enhances protection to the implant soft tissue junction from overlying ingress of food.

2. Case Report

An elderly male patient aged 42 years, visited the department of Prosthodontics for an opinion regarding the possibility of implant supported prosthesis for his missing mandibular first molar that had been extracted due to caries about 3 years back. Patient’s medical history was non-contributory and dental history included wearing a treatment partial denture since last 3 months. Social and drug history were non influential. No significant adverse habits of the patient came to light. No significant extra and intra oral findings were observed. After routine biochemical and radiographic investigations (Figure 1A), the patient was presented with an option of implant supported single molar restoration in relation to missing mandibular molar. After obtaining his consent, diagnostic impressions were made using Irreversible hydrocolloid (Thixotropic, Zhermach, Italy) following which diagnostic casts were mounted on a semi adjustable articulator (Whip Mix series 3000; Elite Dental Services, Inc, Orlando, Fla). A diagnostic cum radiographic splint was fabricated of clear acrylic auto polymerizing resin (Fortex; Lucite Intl, Durham) that would assist the placement of cement retained single implant fixture (Bio horizons Implant Systems, Inc.). After fabrication of a radiographic/ diagnostic splint patient was referred to having a Dentascan (Figure 1 B and C) that helped in determining the accuracy of the radiographic splint as well as the amount of available bone along with various other obvious advantages. The technique used in this report is for a two stage, two piece implant system. At the first stage of the surgery the surgical splint was placed after surgical exposure of the area (Figure 2A). This was followed by placement of an implant fixture after slow drilling of the bone with the reciprocal size of the implant fixture (Figure 2B).

A paralleling pin to indicate the correct alignment of the implant fixture was placed before screwing the implant fixture in place (Figure 2B). After debriding the surrounding area (Figure 2C, D), a cover screw was placed onto the implant fixture and the area was sutured (Figure 2E). The patient was given instructions regarding maintenance and care and the patient was followed up till stage 2 surgery. Before stage 2 surgery, radiographs were taken to evaluate successful Osseointegration of the implant fixture (Figure 2F). Stage 2 surgery was initiated by exposing the cover screw (Figure 3A) that was placed over the implant fixture. A healing abutment (Figure 3B) was then attached to the implant fixture and the area was closed.

Figure 1. (A) Orthopantomograph shows the relation of edentulous space with adjacent teeth. Dentascan with radiographic splint showing the future position of the implant (B) Superior view (C) Lateral view

Figure 2. (A) Surgical splint in place (B) Paralleling pin to indicate alignment (C) Implant fixture in place (D) Implant placed with surrounding area debrided (E) Cover screw placement (F) OPG showing successful Osseointegration

At this stage the soft tissue that would overlap the abutment was surgically modified by undermining the tissue 1 mm below the margins. An internal bevel was placed that would remove the soft tissue underneath and leave epithelial and some amount of connective tissue above. Following a healing period of a few days the healing abutment was removed and definitive abutment was placed (Figure 3C and D). Final abutment was then prepared and final impressions were made using addition polyvinyl siloxane material (Reprosil, Dentsply/Caulk; Milford, DE, USA). Porcelain fused to metal complete crown was fabricated in which an implant protected occlusion was incorporated. The crown was cemented (Figure 3E) using zinc phosphate cement (Harvard, Germany). The patient was demonstrated oral hygiene measures that would be necessary for maintenance of implant supported single crown. The patient was followed up regularly for a period of one year during which the patient did not report any complaint of food accumulation or halitosis in or around the implant supported crown.

Figure 3. (A) Implant fixture exposed (B) Healing abutment placed (C) Healing abutment in place (D) Final abutment placed on the fixture (E) Single crown cemented in place

3. Discussion

Prosthetic reconstruction involving endosseous implants can involve screw-retained or cement retained restorations or both. [19,20] The choice of cementation versus screw retention seems to be based on mainly the clinician’s preference. [21] With advantages like elimination of the unaesthetic screw access hole, greater resistance to porcelain, better occlusion, cost and accessibility the cement retained single implant restorations provide alternate options with proven success. Creating an emergence profile to enhance aesthetics is focussed largely on manipulation of the soft tissues around the abutment that is placed on the implant fixture. The same principle has been used in this case to create soft tissue contour around the surface of the abutment that would aid in maintaining oral hygiene. An internal bevel incision on the gingiva leaves the margins overhanging at the time of the surgical procedure. While healing takes place, the area is replaced by soft tissue that pushes the overlying soft tissue coronally resulting in the growth of soft tissue around the neck of the abutment that is at a higher level than the tissue on and around the bone. The raised tissue at the surface of the abutment does not allow plaque to move in the implant gingiva crevice. Care though, has to be taken that only adequate amount of cement is used while cementing the crown otherwise the cement will flow into the crevice and would do more harm than good.

4. Conclusion

Within the scope and limitation of the surgical technique mentioned a careful approach is necessary to accomplish the advantages that can be obtained from the procedure. Further studies are advised regarding the viability of the technique.

Acknowledgements

The authors would like to acknowledge the staff and postgraduate students of the department of oral surgery, Periodontology and Prosthodontics for shaping the study in its present context.

References

[1]   | Brånemark PI, Adell R, Hansson BO, et al. Intraosseous anchorage of dental prosthesis: I-experimental studies. Scand J Plast Reconstr Surg 1969; 3: 81-100.
[2]   | Lewis S. Treatment planning: teeth versus implants. Int J Periodontics Restorative Dent 1996; 16: 366-77.
[3]   | Matosian GS. Treatment planning for the future: endodontics, post and core, and periodontal surgery: or an implant? Journal of the California Dental Association 2003; 31: 323-5.
[4]   | Hutter JW. Implants versus the natural tooth: stand up for what we know is right. J Endod 2001; 27: 637.
[5]   | Torabinejad M. Apples and oranges. J Endod 2003; 29:5 41-2.
[6]   | Felton DA. Implant or root canal therapy: a prosthodontist’s view. J Esthet Restor Dent 2005; 17: 197-9.
[7]   | Moiseiwitsch J. Do dental implants toll the end of endodontics? Oral Surg Oral Med Oral Pathol Oral Radiol Endod 2002; 93: 633-4.
[8]   | Albrektsson T, Zarb GA, Worthington P, et al. The long term efficacy of currently used dental implants: a review and proposed criteria of success. Int J Oral Maxillofac Implants 1986; 1: 11.
[9]   | Smith DE, Zarb GA. Criteria for success of osseointegrated endosseous implants. J Prosthet Dent 1989; 62: 567-72.
[10]   | Jaffin RA, Berman CL. The excessive loss of Brånemark fixtures in Type IV bone: A 5-year analysis. J Periodontol 1991; 62: 2-4.
[11]   | Block MS, Gardiner D, Kent JN, Misiek DJ, Finger IM, Guerra L. Hydroxyapatite-coated cylindrical implants in the posterior mandible: 10-year observations. Int J Oral Maxillofac Implants 1996; 11: 626-633.
[12]   | Artzi Z, Tal H, Moses O, Kozlovsky A. Mucosal considerations for osseointegrated implants. J Prosthet Dent 1993; 70: 427-432.
[13]   | Bauman GR, Mills M, Rapley JW, Hallmon WW. Plaque induced inflammation around implants. Int J Oral Maxillofac Implants 1992; 7: 330-337.
[14]   | Mombelli A, Marxer M, Gaberthuel T, Grunder U, Lang NP. The microbiota of osseointegrated implants in patients with a history of periodontal disease. J Clin Periodontol 1995; 22: 124-130.
[15]   | Kohavi D, Greenberg R, Raviv E, Sela MN. Subgingival and supragingival microbial flora around healthy osseointegrated implants in partially edentulous patients. Int J Oral Maxillofac Implants 1994; 9:673-678.
[16]   | Meffert RM, Langer B, Fritz ME. Dental implants: A review. J Periodontol 1992; 63: 859-870.
[17]   | Neale D, Chee WW. Development of implant soft tissue emergence profile: a technique. J Prosthet Dent 1994; 72: 364-7
[18]   | Siebert JS. Reconstruction of deformed, partially edentulous ridges using full thickness inlay graft, 1: technique and wound healing. Compend Contin Educ Dent 1983; 4: 437-53
[19]   | Albrektsson T, Dahl E, Enbom L, et al. Osseointegrated oral implants. A Swedish multicenter study of 8139 consecutively inserted Nobelpharma implants. J Periodontol 1988; 59: 287-296.
[20]   | Hebel KS, Gajjar RC. Cement-retained versus screw retained implant restorations: Achieving optimal occlusion and esthetics in implant dentistry. J Prosthet Dent 1997; 77: 28-35.
[21]   | Taylor TD, Agar JR, Vogiatzi T. Implant prosthodontics: Current perspectives and future directions. Int J Oral Maxillofac Implants 2000; 15: 66-75.