Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

New Biosafe Nanocomposite Polymer Sorbent (BNPS) for Isotopes Sr and Cs Sorption and for Decontamination Highly Radioactive Water in Solid Phase

Elena V. ORLOVA*, Roman S. FADEEV, Eugene I. MAEVSKY

Institute of Theoretic and Experimental Biophysics (ITEB) RAS, Institutskaya, Pushchino, Moscow district, Russia

Abstract: It was de novo obtained the means of a specific structure designed and the method for the selective binding of Sr and Cs radionuclides in order to decontamination of highly radioactive water in the process of nuclear power stations, as well as under anthropogenic and natural disasters, accompanied by ejection Sr and Cs radionuclides in the environment.

Keywords: nanocomposite polymer sorbent, decontamination highly radioactive water in solid phase, radionuclides Sr and Cs

Received August 07, 2013; Revised October 20, 2013; Accepted November 18, 2013

Citation: Elena V. ORLOVA, Roman S. FADEEV, Eugene I. MAEVSKY, New Biosafe Nanocomposite Polymer Sorbent (BNPS) for Isotopes Sr and Cs Sorption and for Decontamination Highly Radioactive Water in Solid Phase. Journal of Polymer and Biopolymer Physics Chemistry, 1 (1). 9-12. January 2013. doi:10.12691/jpbpc-1-1-2

1. Introduction

Removing slowly decaying radionuclides, particularly Sr and Cs, from water and soil, plants and animals, contaminated nuclear waste is a problem lasting more than 70 years. Increasing problem due to the predominance of the "peaceful atom" in energy, unfortunately, is permanent and requires a serious decision because of the inevitability of early failures and accidents anthropogenic and natural origin. There have been proposed many different, but not radical solutions. There are several basic types of radionuclide sorbents in the form of the sorption matrix of inorganic salts - complexons such as tetra borate [1], acrylates [2], acetates [2], silicates [3,4] and zeolite modification, recently developed at NIMS, Japan (National Institute for Materials Science) [5], strontium-based chelator diazo-complex and silicon zeolite matrix [6], aluminosilicates, aluminasilicium alums [7], orthophosphate [8]. General shortcomings of the above compounds is the complexity of their synthesis, toxicity and rather low sorption capacity.

In order to achieve a high and specific sorption capacity, subject to the requirements of biocompatibility and safety of for various biological objects we have developed the biosafety nanocomposite polymer sorbent for selective sorption of the isotopes of Sr and Cs from liquid media, which has a uniquely high sorption capacity.

2. Materials and Methods

1. Biosafe nanocomposite polymer sorbent (BNPS) was synthesed by the original method [Patent issued from 19.06.2012] [9,10].

2. Saturated aqueous Sr(NO₃)₂ and Cs(NO₃) salts solutions were taken in the amount of 5 ml in each. Sorbent samples (2g) were dissolved in these solutions. 15 minutes later the sorbent hydrated all liquid phase and increased in volume. Then the sorbent was separated from the water and atomic absorption spectrophotometry (AAS) investigation was carried out.

3. Determination of the radiation stability of polymer sorbent structure to the absence of radiation crosslinks. BNPS sample was subjected to high irradiation for 24h it is resistant to high doses of radiation and then NMR spectra was determined. UO₂₋ source: α =80000 particals/sm²/sec (80kBq); β= 26000 particals/sm2/sec (26kBq); γ = 76 roentgen/h , exposure time= 24h. : α =1920 kBq, β= 624kBq, and that full dose on γ = 15.86mSv.

4. Keratinocyte-derived A431cells were obtained from the Russian Cell Culture Collection (Institute of Cytology, Russian Academy of Sciences, St. Petersburg). Fetal bovine serum was from Gibco; culture medium DMEM, acridine orange, hoechst 33342, crystal violet, and other chemicals for cytotoxicity tests were purchased from Sigma Chemical Co.

5. Cytotoxicity Assay. A431 cells were grown in Dulbecco’s modified Eagle’s medium (DMEM) supplemented with 10% (w/v) fetal bovine serum, 40 mg/L gentamycin, 35 mM sodium bicarbonate, and 20 mM HEPES at 37°C in an atmosphere of 5% CO2. For the cytotoxicity assay, cells were seeded in 96-well microplates or culture dishes (Corning, USA) at a concentration of 2,5 × 10⁴ cells/cm². Freshly prepared solution of BNPS was added to culture medium 24 h after seeding the cells. Cytotoxicity was evaluated using the crystal violet assay from the ratio of optical densities at 560 nm in treated and untreated (control) cultures at 24 h after adding the agents [11]. The optical density value was in direct proportion to the number of viable cells. Each experiment was performed at least three times. All of the values represent the means (SEM). The statistical significance of the results was analyzed using Student’s t test.

6. Confocal microscopy. For imaging, A 431 cells were seeded in 8-well Lab-Tek Chamber Slide system (Nalge Nunc International, USA) at a concentration of 2,5 × 10⁴ cells/cm². Freshly prepared solution of BNPS was added to each well 24 h after seeding the cells. At 24 h after adding the BNPS, cells were washed three times with ice-cold PBS and stained with acridine orange(1 mkg/ml) and hoechst 33342 (1 mkg/ml) for 25 minutes at 37°C. Images obtained using the confocal system Leica TCS SP5 (Leica, Germany).

3. Results and Discussion

It was de novo obtained the means of a specific structure designed and the method for the selective binding of Sr and Cs radionuclides in order to decontamination of highly radioactive water in the process of nuclear power stations, as well as under anthropogenic and natural disasters, accompanied by ejection Sr and Cs radionuclides in the environment (see Figure 1).

Figure 1. De novo obtained biosafe nanocomposite polymer sorbent (BNPS) for selective sorption of Sr and Cs isotopes

In order to achieve a high and specific sorption capacity, subject to the requirements of biocompatibility and safety for various biological objects we have developed the biosafety nanocomposite polymer sorbent for selective sorption of Sr and Cs isotopes from liquid media, which has a unique high sorption capacity. For example, 73kg of this polymer sorbent can decontaminate 1ton of highly radioactive water (in solid phase) (Table 1).

Table 1. Table of comparison BNPS vs HOM (high-ordered mesoporous) sorbent

By the AAS investigation it was shown that 2 g of the sorbent can bind Sr - 22% by weight, and Cs-25% by weight. This means that under these conditions the hydrated form of the sorbent has a specific sorption capacity 330mg of Sr²⁺ can be collected and removed with 1g of hydrated sorbent. The resulting specific capacity of the sorbent is higher than NIMS’ created equivalent HOM (high-ordered mesoporous) of 25 times (13 mg per 1g). Our sorbent binds 3.7TBq ⁹⁰Sr (while HOM only 65GBq). At the same time our hydrated sorbent also binds Cs (but HOM doesn’t) and has a sorption capacity under these conditions for Cs²⁺ 105g per 1g of hydrated sorbent or for radioactive isotope ¹³⁷Cs in the number of 1.12TBq (Table 1).

It was shown that when this polymer sorbent sample was subjected to high irradiation for 24h it is resistant to high doses of radiation with the absence of radiation crosslinks in its structure as evidenced by the identity of the NMR control spectra (see Figure 2) vs experiment (see Figure 3) samples as well as the complete identity of the two starting from right hydrogen triplet peaks.

Saving of such particular specificity as a triplet form in the NMR spectrum after radiation exposure shows a strong stability of the complete structure of the polymer and its inertness to high dose of radiation.

Figure 2. Control BNPS sample

Figure 3. Irradiated BNPS sample

Saving of such particular specificity as a triplet form in the NMR spectrum after radiation exposure shows a strong stability of the complete structure of the polymer and its inertness to high dose of radiation.

Also there were proofed BNPS nontoxic and biosafe properties on human keratinocyte- derived A431cells (Figure 4, Figure 5, Figure 6).

Figure 4. Concentration dependence of cytotoxicity against A 431 cells, evaluated using the crystal violet assay for BNPS

Figure 5. control

Figure 6. experiment

4. Conclusions

Thus, BNPS can be used: for decontamination (in solid phase) of highly radioactive water from

reactors; for radioactive fuel binding (hydration) for subsequent safe removal from the reactor; a filler for portable and industrial filters for purification of highly radioactive liquids; as enterosorbent because of its biosafe properties. It can be used in various industries, nuclear plants, agriculture and medicine.

Acknowledgement

The authors express their appreciation to “MedProFarm Ltd.” for sponsoring this development.

References

[1]   | RF patent 2200994.
[2]   | JP Patent 2005008753, 2005.
[3]   | RF patent 2200994.
[4]   | RF Patent 2154317.
[5]   | http://www.nims.go.jp/eng/news/press/2011/07/p201107270.html.
[6]   | RF patent 2189650.
[7]   | RF patent 2200994.
[8]   | RF patent 2200994.
[9]   | E.V. Orlova, E.I. Maevsky, V. K. Klubkov: Patent EAPO 201201241.
[10]   | E.V. Orlova, E.I. Maevsky, V. K. Klubkov: Patent PCT/RU2012/001142.
[11]   | M. Nomizu, W. H. Kim, M. Yamamura, A. Utani, S. Song, and A Otaka: J. Biol. Chem. 270 (1995) 20583.
[12]   | Fujii T. and Yamana H.: www.oecd-nea.org/pt/docs/iem/jeju02/session2/SessionII- 18.pdf.