Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Theoretical and Numerical Analysis of a Jib Crane Vibration

Umar Sanusi Umar*, Muhammad Tukur Hamisu, Mahmud Muhammad Jamil, Aisha Sa’ad

Department of Mechanical Engineering, Nigerian Defence Academy, Kaduna, Nigeria

Abstract: A Comparative approach is used that adopted analytical and numerical methods in analysing the vibration of a jib crane. The analytical method employed the use of planar serial-frame structures analysis which utilizes transfer matrix solution to the governing equation of motion. The jib and the mast are treated as different segment and analysed by the transverse and longitudinal motions of each segment while considering the compatibility requirements across the mast from the jib and the boundary condition of the entire jib crane system. Finite element analysis using ANSYS software was employed to analyse the jib crane system as the numerical method. The jib crane analytical approach derived theoretically was modelled in ANSYS and solved in other to evaluate and compare the vibration parameters of the system.

Keywords: jib crane, mast, jib, ANSYS

Received October 24, 2019; Revised November 28, 2019; Accepted December 21, 2019

Citation: Umar Sanusi Umar, Muhammad Tukur Hamisu, Mahmud Muhammad Jamil, Aisha Sa’ad, Theoretical and Numerical Analysis of a Jib Crane Vibration. Journal of Mechanical Design and Vibration, 7 (1). 33-42. January 2019. doi:10.12691/jmdv-7-1-5

1. Introduction

Jib cranes are part of material handling equipment that help in loading and offloading docks, machining and assembly operations, industrial and construction sites. They come in different configurations as application requires ranging from free standing jib cranes to wall bracket and wall cantilever cranes. Several researches were conducted in different aspects of cranes to study, analyses and solve variety of problems associated with them.

An active vibration control based on stability was presented in [1]. The study modelled and developed a nonlinear feedback control scheme and simulated the data using an actual jib crane. The result from this study shows the usefulness of derived model in suppressing the payload vibration. Some works presented dealt with FEM modelling and analysis of such cranes in preventing failures. The study presented in [2] studied the advantages and disadvantages of various FE models for crane structures to avoid service failure while the study presented in [3] modelled a tower crane using FEM and derived the governing equations of motion for the dynamic problem. A comparative analysis of several concept solutions and selected solutions of jib cranes was presented in [4]. The study focused on using the KOMIPS system and the static-dynamic analysis of complex configuration.

Studies related to cranes analysis have been mostly based on FEM approach [5,6,7] without the theoretical background analysis of such systems analysed as a means of comparison and validation. Theoretical approach of a cantilever beam was derived in [8]. The study looked at a cantilever beam with a damped dynamic vibration absorber attached to the beam at desired locations. This gives an inspiration for the development of analytic solution of the jib crane and comparison of such systems.

In this paper, we present a comparative approach of both theoretical and FEM methods of analysing the vibration of a jib crane. The theoretical method explores frame structures approach presented in [9] to model the jib crane as a continuous structure to derive the governing equations of motion and ANSYS [10] will be used to solve same system as the numerical method which will serve as a yardstick for comparison.

2. Methodology

2.1. Theoretical Modelling a Jib Crane as a Frame Structure

The jig crane system is represented in Figure 1 with frame and angle The system is sectioned into k and k +1 components inclined at an angle in other to be treated as a sub structural frame. The Jib and Mast having length l₁ and l₂ respectively with the position of the frame angle located at B. The Jib and Mast are analysed independently by their transverse and longitudinal motion.

Figure 1. The Jib Crane System

The X axis represent the longitudinal displacement while the Y axis represent the transverse displacement of the Jib as shown in Figure 2. Likewise, for the mast is represented by the Y and X axes respectively. Hence, vibration theories for Euler-Bernoulli beam and axial vibration of a rod are employed to analyse the system.

The amplitude of vibration of the transverse displacement of the jib is denoted by Yi (X, T) and longitudinal displacements is denoted by Ui (X, T). The total length of the system is L = (L1 +L₂). The equation of motion for each of the Jib with uniform cross-section, is:

Transverse motion:

[picture] | (1)

Longitudinal motion:

[picture] | (2)

The boundary conditions at point A is W(0)=0, W’(0)=0, U(0)=0 and U’(0), At point C is W”(l)=0 and W”’(l)=0 and at point B is Y₂(x) = U₁(x), U₂(x) = - Y₁(x),

The compatibility conditions at point B are

[picture] | (3a)

[picture] | (3b)

[picture] | (3c)

The compatibility conditions transfer the transverse and longitudinal displacement, slope, bending moment, shear force and axial force, respectively from the mast to the jib at angle . This compatibility requirements across the mast from the jib angle are Yi and Ui that represent the transverse and longitudinal displacements of the jib at point as shown in Figure 3(a) while the force compatibility requirements across the jib angle are Vi and Fi that represent the shear and axial forces of the Jib at point as shown in Figure 3(b). The mast is the segment while the Jib is the segment.

Figure 2. Transverse and longitudinal motion of the system

Figure 3. (a) Displacement Compatibility, (b) Force Compatibility

[picture] | (4a)

[picture] | (4b)

[picture] | (4c)

[picture] | (4d)

[picture] | (4e)

[picture] | (4f)

The symbols and refers to the mast and jib above and below the angle between the two point atreferred to as The assumptions in the mentioned compatibility conditions are the same as the normal analysis of the transverse vibrations of Euler–Bernoulli beam and the axial vibrations of a rod and the angle between the mast and jib is assumed to be constant during the motion of the system.

The following quantities are introduced:

[picture] | (5)

Thus, in each beam, Eqns. (1) and (2) can be expressed in a non-dimensional form as

[picture] | (6)

[picture] | (7)

The non-dimensional ‘‘compatibility conditions’’ from the mast to the jib angle are (from Equations (4a) – (4f))

[picture] | (8a)

[picture] | (8b)

[picture] | (8c)

[picture] | (8d)

[picture] | (8e)

[picture] | (8f)

where with the 1 standing for the mast and 2 for the jib. Similarly, the non-dimensional boundary conditions from Equations (3a) - (3c), for point having a fixed–fixed ends, is written as

[picture] | (9a)

[picture] | (9b)

[picture] | (9c)

2.2. Calculation of the Eigen Solutions

The solutions of the other boundary conditions can then be obtained through same procedure. Using the separable solutions: and in Equations (6) and (7) will lead to the associated eigenvalue problem,

[picture] | (10)

[picture] | (11)

Where

[picture] | (12)

From Equation (12), the relationship between and is expressed as

[picture] | (13)

where is a constant expressed as From Equations (8a) – (8f), the corresponding compatibility conditions from the mast to the jib angle gives

[picture] | (14a)

[picture] | (14b)

[picture] | (14c)

[picture] | (14d)

[picture] | (14e)

[picture] | (14f)

For and the boundary conditions, from Equations (9a) – (9c), are

[picture] | (15a)

[picture] | (15b)

[picture] | (15c)

[picture] | (15d)

[picture] | (15e)

[picture] | (15f)

A closed-form solution of this eigenvalue problem is obtained by employing transfer matrix methods as established in [9]. The solutions of Equation (10) and (11) for the mast and jib are

[picture] | (16)

[picture] | (17)

where ,,,, and are constants associated with the jib segment. The constants in the mast segment are and are related to those in the jib segment through the compatibility conditions in Equations (14a) – (14f), which can be expressed as

[picture] | (18)

Where is the transfer matrix which depends on the eigenvalue ; for which the elements are given in reference [9]

Through repeated applications of Equation (18), the six constants in the mast, and can be mapped into those of the Jib, hence the number of independent constants of the entire system are reduced to six as:

[picture] | (19)

These six remaining constants, , , , and can be determined through the satisfaction of the boundary conditions in Equation (15a) - (15f). For the system, Equations (16), (17), (15a), (15c) and (15e) lead to

[picture] | (20a)

[picture] | (20b)

[picture] | (20c)

The Satisfaction of those boundary conditions of Equations (16) and (17) at the mast support, Equations (15b), (15d) and (15f), requires

[picture] | (20d)

[picture] | (20e)

[picture] | (20f)

this is expressed in matrix form as

[picture] | (21)

Where

[picture] | (22)

Substituting Equation (19) into Equation (21) and use of Equations (20a) - (20c) gives

Further written as

[picture] | (23)

Where

Hence, this gives a non-trivial solution which requires

[picture] | (24)

The determinant gives the characteristic equation for the solution of the eigenvalues. The solution of this equation with Newton–Raphson iterations, using the method shown in Reference [9] gives the eigenvalues.

This coefficients of the Eigen functions of the equation, and can then be obtained using back-substitution into Equation (23), (18) and then Equations (16) and (17).

Applying Equations (15a – f) into Equation (20d - f) for the Jib crane leads to,

[picture] | (25)

For a non-trivial solution of Equation (25), determinant of coefficients of constants and must be zero, that is

[picture] | (26)

Expanding the determinant gives the frequency equation

[picture] | (27)

This is similar to equation of a cantilever beam in [8], thus for this case and same solution applies as:

[picture] | (28)

The possible solution of Equation (28) is, which gives

[picture] | (29)

From Equation (29) and Equation (13), The natural frequencies are:

[picture] | (30)

There are infinite number of natural frequencies associated with a continuous structure as it possesses infinite degrees of freedom. The associate mode shapes are obtained by

[picture] | (31)

The response of the beam is given as linear combination of mode shapes.

2.3. Forced Vibration of the Jib

The principle of superposition is used to solve the forced vibration of the Jib as a cantilever beam as shown in Figure 4b. Thus, the deflection of the beam is assumed as

[picture] | (32)

where is the generalized coordinate in the mode and is the nth normal mode or characteristic function satisfying the differential equation [9]

[picture] | (33)

Substituting Equation (32) in Equation (33), it gives

[picture] | (34)

From Equation (32), Equation (33) can be written as

[picture] | (35)

Multiplying Equation (35) throughout by integrating from to and using orthogonality condition, it gives

[picture] | (36)

where is the generalized force corresponding to

[picture] | (37)

And the constant is given by

[picture] | (38)

Figure 4. (a) The Jib Crane System, (b) The Jib Under Loading, (c) The Mast Under Loading

Equation (36) is an equation of motion of undamped single degree of freedom system. Using Duhamel integral, the solution of the Equation (36) can be expressed as

[picture] | (39)

2.4. Response of the Jib Subjected to Harmonic Force

From Equation (36), the generalized coordinate is given by

[picture] | (40)

Where

[picture] | (41)

The steady state solution of Equation (36) is given by

[picture] | (42)

Where

[picture] | (43)

Using the formula

[picture] | (44)

Equation (43) can be evaluated to obtain

[picture] | (45)

2.5. Response of Mast Subjected to a Moment at the Free End

From Equation (37), the generalized force becomes

[picture] | (46)

Where

[picture] | (47)

The steady state response of the beam under the action of the moment is given by Equation (32) with

[picture] | (48)

Where

Noting that

Thus, the steady state response can be written as

[picture] | (49)

Thus, the combined response of the Jib Crane due to the harmonic force and moment is

[picture] | (50)

2.6. Numerical Analysis of the Jib Crane Using ANSYS

Finite element method is used to analyse the crane frame-structure mode shape, frequency, and amplitude using ANSYS [10] software in other to compare and verify it with the theoretical solution. Its main advantage is that it employs a different technique in its solution to the theoretical solution. However, results must be subjectively analysed.

2.6.1 Element Type

The selection of the type of element is of paramount importance and time, precision and application are some of the variables that must be considered when choosing an element. The elements selected is SOLID187.

2.6.2. SOLID187

SOLID187 as shown in Figure 5 is a higher order 3-D, 10-noded element that considers quadratic displacement behavior throughout the cross-section suited for irregular mesh. This was used because it has three degree of freedom at each nodal x, y, and z direction and gives significant accuracy to the Euler-Bernoulli beam under consideration, section control and accommodate material properties needed for this analysis [10].

2.6.3. Material Property

The material of the crane structure is a structural steel with Modulus of Elasticity of 200 GPa, Poisson ratio of 0.3 and Density of 7800 kg/m³.

2.6.4. Geometry

2.6.4.1. Jib and Mast

The jib has an I-cross section and keypoints are used to define the edges. Lines are then created through the keypoints, then area and finally extruding the cross-section along the normal to the length of the jib and the mast is then attached to the jib by defining a new working plan due to the difference in plan between the jib and mast as shown in Figure 6.

2.6.5. Meshing

The created volume is then meshed. First, the element size is specified as 0.04 because of the complexity of the model which will not allow for AutoMesh and then specifying mesh attributes with Element type as SOLID187 for the Jib as shown in Figure 7.

2.6.6. Solution

2.6.6.1. Modal Solution

Modal analysis of the jib crane structure was carried out with frequency range of 0 to 100 Hz and natural frequencies and mode shapes were extracted.

Figure 5. SOLID187

Figure 6. Jib Crane Model in ANSYS

Figure 7. Meshed Jib Crane

3. Results and Discussion

3.1. Numerical Parameters

The following are standard numerical data obtained from [8] for a 5ton model. I-cross section beam, and with structural steel (A36) having and . The force acting is and a motor speed of on drum.

3.2. The Natural Frequencies of the Jib Crane

The following parameters were calculated as area , , and maximum displacement as . The first three natural frequencies are obtained from Equation (30) and tabulated as in Table 1.

Table I. Modal Analysis frequencies

The result shown in Table 1 shows the first three natural frequencies of the jib crane. This result is almost the same as the solution of a cantilever beam with same boundary conditions as derived in Equation 30. The result tallies with Reference [8] as a good indication of the effective of this approaching of treating the Jib Crane as a Frame Structure.

3.3. Mode Shapes of the Jib Crane

The mode shapes of the jib crane are shown in Figure 4a-c from Equation 31. It shows that each of the mast and the jib behaves as an independent cantilever beam. The mast is fixed at the base, but the other end is free in its axis while forming a fixed support for the jib.

Figure 8. (a): First Mode Shape

Figure 8. (b): Second Mode Shape

Figure 8. (c): Third Mode Shape

3.4. The Response of the Jib Crane to the Force

The response of the Jib to the force P at the end of the Jib which is the load carried by the Jib Crane from Equation 45 is shown in Figure 9(a) with a maximum displacement of about 26mm and a mean steady displacement of less that 20mm while the response of the Mast due to the combined effect of the harmonic force and the moment acting on it from Equation 50 is shown in Figure 9(b) with a mean displacement of about 32mm. The response of the mast is higher due to the combined displacement of the jib and mast from the superposition effect.

Figure 9. (a): Response of the Jib

Figure 9. (b): Response of the Mast

4. Conclusion

A comparative approach of analytical and numerical solution of a jib crane system was explored. The analytical method gave an efficient analysis of the jib crane using planar serial-frame structure approach to evaluate the eigensoulutions of the system and other vibration parameters. This approach shows that the jib crane can be modelled and treated as a frame structure in analysing the vibration of the system. The numerical method utilizes ANSYS in modelling the derived system using the established boundary conditions and solved. The ANSYS results conform with the analytical solution which is a good indicator for this study.

References

[1]   | T.G. Abu-El Yazied, S.Y. Abu-El-Hagag, M.S. Al-Ajmi an, A.M. Makady “Nonlinear Modelling and Vibration Control of Jib Cranes” World Applied Sciences Journal 16 (11): 1543-1550, 2012.
[2]   | Dušan Kovacˇevic, Igor Budak, Aco Antic´, Aleš Nagode, Borut Kosec “FEM modelling and analysis in prevention of the waterway dredgers crane serviceability failure” Engineering Failure Analysis 28 (2013) 328-339.
[3]   | F. Ju, Y.S. Choo, F.S. Cui. “Dynamic Response of Tower Crane induced by the Pendulum Motion of the Payload”. International Journal of Solids and Structures 43 (2006) 376-389.
[4]   | Fuad Hadžikadunić, Nedeljko Vukojević, Senad Huseinović, Omer Jukić “AN ANALYSIS OF JIB CRANE CONSTRUCTIVE SOLUTION IN EXPLOATATION” 'Trends in the Development of Machinery and Associated Technology, TMT 2008, Istanbul, Turkey, 26-30 August 2008.
[5]   | K Suresh Bollimpelli, V Ravi Kumar. “Design and Analysis of Column Mounted JIB Crane” INTERNATIONAL JOURNAL OF RESEARCH IN AERONAUTICAL AND MECHANICAL ENGINEERING, Vol. 3, Issue 1 Page, ISSN (ONLINE): 2321-3051 (2015).
[6]   | S. S. Kiranalli, N.U. Patil “Jib Crane Analysis using FEM” International Journal for Scientific Research & Development, Vol. 3, Issue 04, 2015 | ISSN (online): 2321-0613.
[7]   | Ismail Gerdemeli, Serpil Kurt “Design and Finite Element Analysis of Gantry Crane” Key Engineering Materials, ISSN: 1662-9795, Vol. 572, pp 517-520 (2014).
[8]   | Umar Sanusi Umar “Theoretical and Numerical Analysis of a Cantilever Main System to which a Vibration Absorber is Attached” International Journal of Science and Innovative Engineering & Technology (IJSIET), Volume 2 May issue 2015, ISBN 978-81-904760-7-2 (2015).
[9]   | H. P. Lin, J. Ro “Vibration analysis of Planar Serial-frame structures” Journal of Sound and Vibration, 262, 1113-1131 (2003).
[10]   | ANSYS Release 15 UP20090415, ANSYS Inc.