Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Performance Mapping of an Aluminum - Nitinol Composite Vibrating Beam

Nicholas G. Garafolo*, Rachel J. Collard

Department of Mechanical Engineering, The University of Akron, Akron, OH 44325, U.S.A.

Abstract: Dynamic control of a vibrating beam is critical to the efforts of mitigation of high cycle fatigue, as it is a leading cause of component or engine failure. Recent advances in composite structures have afford the ability to control the eigenvalue, eigenvectors, and amplitude of vibration through the use of the shape memory effect of shape memory alloys (e.g. Nitinol). These “smart materials” are proven to create active damping and variable stiffness in engine components is an innovative concept. Research presented herein seeks to quantify the effectiveness of Nitinol as a HCF mitigation technique and map the frequency and damping performance. A composite beam consisting of a Nitinol topical actuator adhered to an aluminum alloy 6061 substrate was designed and fabricated. Test specimens comprised two configurations: (1) a composite beam with the topical treatment encompassing the full span of free length of the beam, and (2) a composite beam with the topical treatment encompassing half the span the free length of the beam. Benchtop tests allowed for the determination both modal frequency and damping of the aluminum - Nitinol composite beam with an 8 in. free length. Modal analyses were taken over a selected frequency range using a single point laser vibrometer, excited using a dynamic shaker. Experimental studies were completed over a frequency range which represented the second bending mode. Quality factor values, Q, of approximately 200 were observed. No correlation, however, with phase transformation was realized. The design space charts for temperature, modal frequency, and beam tip amplitude were compiled for both the full-span and half-span sample for second bending mode. These charts graphically depict how tip amplitude changes with varied temperature and illustrate the design capabilities created through the use of shape memory alloy components in dynamic applications.

Keywords: shape memory alloys, thin foil, vibration, high cycle fatigue, turbomachinery, damping

Citation: Nicholas G. Garafolo, Rachel J. Collard, Performance Mapping of an Aluminum - Nitinol Composite Vibrating Beam. Journal of Mechanical Design and Vibration, 5 (1). 27-36. January 2017. doi:10.12691/jmdv-5-1-4

1. Introduction

High cycle fatigue (HCF) mitigation requires research into novel materials and techniques to expand the available tools and resources for innovated designs. Recent advances in the use of Shape Memory Alloys (SMA) for controlling the vibration characteristics offer significant potential for HCF mitigation cite [1]. High cycle fatigue, as characterized by high frequencies, low amplitudes, cyclic elastic behavior, and high cycle count, affect a large number of engine components. The root causes include unidentified resonance, manufacturing problems, foreign object damage, and aero-elasticity issues [2].

The balance of aerodynamics performance and damping is difficult, as the means to obtain additional damping cannot interfere with the aerodynamics of machinery blades, so any treatments must be internal, out of air flow, or in the form of a thin layer. Emerging materials and unique methods for their implementation are vital for the success of novel HCF mitigation methods.

Current mitigation techniques include sprayed coatings, constrainment layers, and piezo-electric actuators [3]. Coatings, including magnesium aluminate spinel, have been shown to increase damping nonlinearly in titanium blades [4,5]. Active vibration control using piezo-electric actuators have gained acceptance because they have no moving parts, they are low weight, and they provide high force with low power consumption. Piezo-electric materials, however, require high excitation voltages and only control vibration in the micro-inch range [6].

A popular method for HCF mitigation is to implement damping methods to reduce the excessive stresses in engine components that lead to high cycle fatigue [3]. Advances in manufacturing techniques have enabled integrally bladed disk designs, which are are highly susceptible to high cycle fatigue as they are inherently low damped [7]. These advanced, high performance turbomachinery blade designs have led to higher stresses and decreased damping.

An important metric in damping performance is the quality factor, Q. As damping increases, Q decreases. A structure that is exhibiting higher damping will have a lower Q value. The typical Q value of a blade structure is 1000 or greater. A Q value of 100 or less is desirable to reduce vibratory stress in the blade. Using FEA, Duffy et al. found that for a 1.8 in. x 0.75 in. x 0.010 in. beam, with small 0.005 in. SMA patches on both sides, if the Q value of the SMA structure was 14, the Q value of the composite structure would be 100. During material testing of Ni₅₀Ti₃₅Hf₁₅, Duffy et al. found minimum quality factors of less than 5, but these factors corresponded to the low input frequency of 0.1 Hz. See Figure 1 where the loss factor η represents the ratio of damping energy to strain energy and is equal to the reciprocal of Q. No damping peak was found in the Ni₅₀Ti₃₅Hf₁₅ material at 100 Hz [3].

Figure 1. Cast Ni50Ti35Hf15 static test deflection and dynamic test loss factor temperature. Loss factor at 0.1 Hz, 35×10-6 strain amplitude [3]

Commercially shape memory alloy Nickel Titanium (NiTi, Nitinol) has been used in many applications including ocean engineering [8], civil engineering [9] and a host of mechanical engineering areas. NiTi has demonstrated damping an order of magnitude higher than ordinary metals [10]. Piedboeuf et al. found a minimum quality factor at 0.1 Hz in their own study of NiTi wires [11]. Ikegami investigated active control with NiTi wires and piezo-electric ceramic actuators [12].

Damping characteristics in NiTi alloy are influenced by the composition and the thermo-mechanical processing [3]. The transformation temperature can be tailored through formulation, especially for high temperature applications [13,14]; Ni19.5Ti50.5Pd₂₅Pt₅ has a transformation temperature near 300°C, which is conductive for turbomachinery applications [15]. The transformation temperature of NiTi can be changed by increasing or decreasing the atomic percentage of Ni in the material. NiTi with 50% Ni exhibits a transformation temperature of 120°C, this temperature decreases with increasing nickel content. NiTi 55 has shown superior corrosion resistance when compared to stainless steel in salty environments. It also can be hot formed into various shapes and does not require cold working [16].

Shape memory alloys allow for large amounts of recoverable strain which coincide with work densities that can be ten times higher than traditional approaches. The shape memory effect allows for the use of shape memory alloys in applications where work per unit weight must be maximized. The density of NiTi is 6.45 g/cm³, slightly higher than the 4.43-4.66 g/cm³ density of current titanium alloys used in aero engine components [17]. Shape memory alloys can be used for multiple activations. If the material is returned to its original state, it can be deformed, reheated, and recovered repeatedly [18].

The hysteresis an SMA undergoes represents the mechanical energy it can dissipate. Damping can occur in shape memory alloys during the solid-solid phase transition, during which energy can be dissipated. Duffy et al. found that SMAs exhibit damping during their phase transformation. The amount of damping observed depends upon the steady state stress level, alternating stress level, frequency, and temperature.

SMAs have been used in many fixed-wing aircraft, rotorcraft, and spacecraft applications. SMA's have been used to create hingeless ailerons and variable geometry airfoils, as well as variable inlets and exhaust chevrons. They have been used in satellite low-shock release mechanisms because of their slow activation. Most applications are designed through careful, specific experimentation. Civil structural component designers have been interested in SMAs because of their ability to dissipate energy through hysteresis [16]. These applications illustrate that SMAs have become a viable engineering material for aerospace and vibratory components.

Shape memory alloys exhibit a change in elastic modulus when they undergo the phase transition from martensite to Austenite. This modulus change creates variable stiffness in components utilizing shape memory material. The stiffness change from the martensite to Austenite phase makes SMAs a tool to isolate vibrations. It has been shown that the variable stiffness property inherent to shape memory alloys has the capability of shifting the natural frequencies of components made with this material. Along with a frequency shift, variable stiffness has been shown to reduce component amplitudes and create a change in the mode shape vector [1,19,20]. Preliminary damping quantification suggested NiTI effectiveness as a HCF mitigation technique [20].

2. Technical Approach

The shape memory effect is present in several materials. One such material of interferes is the nickel – titanium based Nitinol [18]. The materials has the unique property of returning to shape if this material is deformed while in the martensitic phase and then subsequently heated above Af, the Austenite finish temperature. This behavior is due to a solid-solid phase change in the material from martensite to austenite and is often characterized as pseudo-plasticity. An illustration of the hysteretic loop shape memory alloys undergo during their solid-solid phase changes is shown in Figure 2 [18]. The phase transformation is evident in the non-linear property response. As the sample is heated, a nonlinear property change is evident at the austenite start temperature (As) and continues until it reaches the austenite finish temperature (Af). Further heating is shown as a linear response. Upon cooling, the non-linear property change is evident at the martensite start temperature (Ms) and continues until it reaches the martensite finish temperature (Mf). These changes are extended to include changes in elastic modulus. SMAs can absorb and dissipate energy through their hysteretic shape change when they are cyclically loaded. The properties of SMAs have made them suitable for many sensing and actuation applications [16]. The introduction of the shape memory effect, whereby the shape memory alloy material acts as both a damper and a means of variable stiffness is a novel technique for HCF mitigation. Electromagnetic actuators have is also a methods for controlling vibration amplitude [21].

Figure 2. Hypothetical plot of property change vs. temperature for the martensite to austenite phase transformation in a shape memory alloy [18]

Shape memory alloys exhibit a change in elastic modulus when they undergo the phase transition from martensite to austenite. This modulus change creates variable stiffness in components utilizing shape memory material. In has been shown that the variable stiffness property inherent to shape memory alloys has the repeatable capability of shifting the natural frequencies of components made with this material. Repeated tests showed consistent change in modal frequency during shape memory alloy phase change. Highlighting this capability, a modal frequency change of 5.95% to 6.53% was realized during the cooling of a composite sample over modes 2-5 [19]. Along with a frequency shift, variable stiffness has been shown to reduce component amplitudes and create a change in the mode shape vector [19].

The hysteresis an SMA undergoes represents the mechanical energy it can dissipate. The target application of SMA damping in turbomachinery would be its use on a compressor blade. Here frequencies can range from 100 to 10,000+ Hz. The “quality factor”, Q, is a dimensionless parameter that describes the damping of a structure. The lower the Q value, the higher the damping is in the structure. Damping is calculated by using the “half-power bandwidth" method by measuring the bandwidth of the fast Fourier transform (FFT) curve below the resonant peak [4]. The damping ratio, ζ, is found by:

Here represents the bandwidth defined as and is the resonant frequency. The quality factor is inversely proportional to the damping ratio and is calculated as:

The objective of the research presented was to map and quantify the effectiveness of the shape memory alloy Nitinol in creating active damping and stiffness in a beam. Through a series of experimental analyses the effects were quantified. These experiments had two focuses: (1) map the modal shape by quantifying change in node location due to temperature change, and the third focus was to characterize the materials response to changing temperature while forced vibration was held at several different constant frequencies, and (2) investigate changes in damping during the solid-solid phase change of the shape memory material.

3. Experimental Approach

A modal analysis was performed on a cantilever beam in a fixed-free condition to simulate a simple, vibrating turbomachinery component. The performance of the beam was mapped to provide guidance in future design and optimization. It was expected that optimally designed components will be of low weight and low power consumption, and thus attractive for future use in flight applications. High temperature SMA formulations exist, reaching activation temperatures around 300°C [13,14,15]; utilization of the engine operating temperature may be a viable source of actuation.

3.1. Test Specimen Design

This research effort leverages an extremely large experimental and theoretical base. Test specimens were created and consistent with those used to quantify the eigenvalue, eigenvectors, and amplitude changes in recent studies [1,19,20]. The test specimens consisted of a topical treatment adhered to an aluminum substrate. The specimens were designed to have a free length of 8 in. when clamped to a dynamic shaker. The overall dimensions of the aluminum specimens was 11 in. x 1in. x 0.125 in.

Two topical treatment were fabricated. The dimensions of the topical treatment are illustrated in Figure 3; further differentiated in length as “full-span” and “half-span”. The experiment test specimens consisting of one “half-span” and one “full-span” were created from shape memory alloy sheet material NiTi. The experimental control was fabricated from aluminum topical sheet in only the “full sample” configuration. The shape memory topical treatment consisted of Ni₅₅Ti₄₅ and was received as factory annealed flat. The selected SMA configurations were cut out of the 0.008 in thick shape memory sheet material by a waterjet. The treatments were not subjected to any additional heat training. Certificates of material data accompanying the shape memory alloy sheet material listed the modulus of the material as 28-41 GPa for the martensite phase and 83 GPa for the austenite phase. The austenite finish temperature of the material was listed as 113°C. The control topical treatment consisted of Aluminum 1145-H19 and was 0.008” thick.

Figure 3. Dimensions of shape memory topical treatment: (a) full-span length and (b) half-span length

The substrate of the test specimens consisted of a beam, machined from 0.125 in. aluminum alloy 6061 sheet material. Again, the specimens were designed to have a free length of 8 in. when clamped and an overall dimensions of 11 in. x 1in. x 0.125 in.

The SMA treatments were adhered to one side of the aluminum alloy beams using Permabond 920 high temperature cyanoacrylate. The treatments were designed to be fully adhered to the 8 in. free length of the beam while also being applied to the section of the beam that ran under the clamp so that the SMA could be attached to leads on the opposite side of the clamp. The composite samples underwent a full curing process to leverage the high temperature properties of Permabond 920. During this process the samples were brought to 150°C for two hours in an oven. Prior to the adhesion process, the aluminum beam specimens were anodized to electrically isolate them from the SMA treatments. Continuity testing of the anodized aluminum substrates and SMA treatments in the adhered condition ensured the electrical isolation between the components. The experimental control consisted of a thin aluminum foil, adhered to the same anodized aluminum substrate. Composite samples can be seen in Figure 4.

Figure 4. Composite experimental samples with SMA treatment: (a) full-span and (b) half-span

3.2. Experimental Method

Experimental methods included the use of a single point scans of the beam tip using a Polytec laser vibrometer. The shift in frequency and damping was quantified at multiple temperature points, as the SMA patch was brought from room temperature, past activation temperature, and then back down to room temperature. These scans were used to illustrate any change in the beam's damping and stiffness characteristics as a result of phase change.

In order to control temperature, Joule heating was utilized as the catalyst in obtaining the original shape from the deformed SMA. This method allowed for a low power mechanism to return the SMA patch to its original state and orientation. Employing this method allowed for a low power mechanism to return the SMA patch to its original state and orientation. Low weight is inherent to the use of SMAs because they exhibit large amounts of recoverable strain with direct actuation [18]. It is expected that optimally designed components will be of low weight and low power consumption, and thus attractive for future use in flight applications. Alternatively, SMA formulations exist with high temperature transformation temperatures [13,14,15]; utilization of the engine operating temperature may be a viable source of actuation.

The surface temperature of the SMA patches was controlled with the use of a DC power supply. Leads were attached to either end of the SMA loop on the opposite side of the dynamic shaker clamp so as to not interfere with vibratory testing. Temperature readings of the SMA patches were taken using an infrared temperature sensor and the information was fed to a data acquisition system. A LabVIEW controller used the feedback data and a specified target temperature to control the SMA surface temperature by varying the current that was flowing through the patch.

Vibratory excitation was provided by a 6000 pound dynamic shaker apparatus. Instrumentation included an accelerometer attached to the top of the clamp, IR temperature sensor, and a Polytec single point laser vibrometer. The samples were clamped on one end by the dynamic shaker, the other end remainted free. In order to isolate the beam for Joule heating, ceramic inserts were fabricated from the shaker head made from Very High Temperature Machinable Glass-Mica Ceramic with a maximum operating temperature of 1100°F. Inserts were used on either side of the beam, sandwiching it between the shaker's steel clamp faces. A Teflon washer was used to further isolate the clamp's center bolt from the SMA patch.

The vibration single was acquired with a Polytec OFV-505 single point laser vibrometer, connected to a Polytec OFV-5000 controller. The laser was mounted directly above the shaker, sample, and clamp and the laser beam was manually aligned to the tip of the beam. The controller autofocus was used to focus the laser. VibrationVIEW software was used to control shaker input, acquire laser data, perform all necessary FFTs, and output results. The sine test module was used in both sweep and fixed-frequency scans. The software controlled the shaker to an acceleration equal to 0.1 G. In damping studies, this software also used FFT output to perform a calculation for the damping “quality factor”, Q using the half-power bandwidth method. The software also output the peak frequency and amplitude of the frequency range studied.

3.2.1. Frequency Performance Mapping

The performance of the test specimens was mapped at a constant excitation frequency. These simulated an engine test running at cruise. A series of four tests were completed, two on the half sample and two on the full sample. For each test the sample remained clamped to the 6000 pound shaker while a series of frequency dwells were performed. During each dwell, the joule heating controller was used to heat the sample and then allow it to cool. These frequency dwells were repeated at several different frequencies to quantify the response of the sample under different circumstances.

The second bending mode was excited for both half-span and full-span samples, occurring around 200 Hz in both. Accordingly, dwell frequencies around 200 Hz were used for testing. Multiple single point scans were completed to quantify damping effects. A reduction of the laser vibration signaled generated FFT data for each temperature investigated using VibrationView. The software was used to map the time domain data to the frequency domain and takes the ratio of the response to the input data to calculate the Frequency Response Function (FRF). The FRF was used to identify modal frequencies.

3.2.2. Damping Quantification

Damping was quantify with a 6000 pound shaker with the ceramic inserts. VibrationVIEW software was used to generate a sine sweep in the shaker that captured second bending mode in the samples. The samples were heated and allowed to cool through use of the Joule heater. Multiple single point scans were completed to quantify damping effects. In order to capture the quality factor, Q, with good resolution, the best practice of sweeping a frequency range of two times the modal peak bandwidth was employed. Several scans were taken at each set temperature value to ensure the sample was being swept in this way. The sweeps were completed over an approximately 4 Hz frequency range.

4. Results and Discussion

The frequency and damping performance was mapped for Ni₅₅Ti₄₅ –aluminum composite beam. Both frequency shift mapping and damping experimentation scans were taken at multiple temperature points, as the SMA patch was brought from room temperature, past activation temperature, and then back down to room temperature. These scans were used to illustrate any change in the beam's damping and stiffness characteristics as a result of phase change.

4.1. Frequency Mapping

A key performance metric for this technique is a mapping of the frequency-temperature domain. In order to reduce the data, the vibration signal for all of the frequency shift mapping scans were compiled and filtered for noise with the peak-to-peak velocities converted to amplitudes. Representative dwell data for the full sample for two frequencies, 199 Hz and 201 Hz, are shown in Figure 5 and Figure 6. It is evident that the change in response between the two dwell frequencies is caused by the phase change inherent in Ni₅₅Ti₄₅. Both the temperature increasing curve and the temperature decreasing curve exhibit two peaks at relatively the same amplitude. These two modal peaks are due to the changing stiffness in the material. At 201 Hz, the difference between the two peaks is approximately 73.5°C for increasing temperature and 38.5°C for decreasing temperature, at 199 Hz, these values are 23.6°C and 11.1°C respectively. The response's amplitude is dependent on both temperature and input frequency.

Figure 5. Example of Temperature vs. Tip Amplitude, Full Sample, 199 Hz dwell

Figure 6. Example of Temperature vs. Tip Amplitude, Full Sample, 201 Hz dwell

Performance maps were created to better understand the temperature-frequency relationship. Performance were created utilizing the MATLAB code gridfit to map the data to a surface plot [22]. Here, a triangular interpolation with gradient smoothing regularization is utilized to convert the three dimensional point data into a meaningful surface. Representative amplitude maps for the temperature and frequencies tested are shown in Figure 7 for the full-span test specimen and Figure 8 for the half-span test specimen. Note that scans 2 for the half sample used data from five dwells, while the other scans used data from 7 dwells.

Figure 7. Performance map of full-span sample: (a) increasing temperature and (b) decreasing temperature

Figure 8. Frequency performance map of half-span sample: (a) increasing temperature and (b) decreasing temperature

The nonlinear dynamic response of the test sample is evident in the temperature vs. modal frequency vs. amplitude maps for second bending mode. As a design tool, these maps graphically depict how tip amplitude changes with changing temperature. They can be utilized by engineers to design a component to actively avoid areas of high strain. The maps also provide guidance for active controller, whereas the frequency can be controlled through heat addition or removal. An example of this use in the half sample (Figure 8) may occur if a component was operating and the excitation frequency was increasing to 202 Hz at 60°C. Actuating the sample and changing its temperature to 100°C would decrease the tip displacement.

4.2. Damping

Damping was quantify using the quality factor metric. The quality factor with a frequency response superimposed is shown in Figure 9. Both the heating and cooling cycles are shown, indicted minimal hysteresis in quality factor with temperature. Results suggested that the quality factor does not changed drastically during phase transition. The quality factor response was somewhat constant at a value around 200 to 250 with a notable drop to a value around 100 at the highest temperature scans in both samples. It is suggested that drop at high temperatures may also be influenced by softening effects in the beam at these temperatures. While Duffy et. al had predicted an increase in damping during phase change, during the experimental investigation, Q stayed fairly constant. Duffy et. al's prediction was for a free piece of shape memory alloy material while this damping investigation was completed on a composite NiTi-aluminum alloy structure. This would account for less than optimal damping realization during the phase transition as the aluminum substrates was dominate.

Figure 9. Damping performance map of half-span sample: (a) increasing temperature and (b) decreasing temperature

5. Conclusions

Novel methods and materials are important for effective high cycle fatigue mitigation. State-of-the art compressor blades and stators have increased turbomachinery performance, all while increasing the vibratory stresses (e.g., integrally bladed disks). The research presented focused on the feasibility of the use of the shape memory effect of shape memory alloys as active actuators to mitigate stresses and dampen blades. The performance of two composite samples in a simple geometry, designed to leverage the strengths of the “smart materials.”

Damping investigations included charactering the quality factor for the hysteretic cycle of composite beam. Results suggested an increased damping with increasing temperature. A peak in quality factor during phase transformation was not realized.

Performance charts of temperature, modal frequency and beam tip amplitudes where established for a range of working temperatures. Results illustrated the design capabilities for a composite using shape memory alloys. The investigation qualified the change in response that can be realized with the use of a small SMA actuator. In summary, NiTi's unique capability in creating variable stiffness in a blade as well as its effect on damping characteristics has been mapped.

Acknowledgements

The authors appreciate the contributions of Dr. Jeffrey Brown, Dr. Tommy George, and the Turbine Engine Fatigue Facility (TEFF) at The Air Force Research Laboratory. This work was supported by the Dayton Area Graduate Studies Institute and the Air Force Research Laboratory Ohio Student-Faculty Research Program under agreement RQ6-UA-14-5-AFRL.

References

[1]   | Garafolo, N. G., and Collard, R., 2017. “Active stiffness method for high cycle fatigue mitigation using topical thin foil shape memory alloy”. Journal of Mechanical Design and Vibration, 5(1), pp. 11-20.
[2]   | Cowles, B. A., 1996. “High cycle fatigue in aircraft gas turbines - an industry perspective”. International Journal of Fracture, 80, pp. 147-163.
[3]   | Duffy, K., Padula, S. A., and Scheiman, D., 2008. “Damping of high temperature shape memory alloys”. In The 15th International Symposium on: Smart Structures and Materials & Nondestructive Evaluation and Health Monitoring.
[4]   | Blackwell, C., Palazotto, A., George, T. J., and Cross, C. J., 2007. “The evaluation of the damping characteristics of a hard coating on titanium”. Shock and Vibration, 14(1), pp. 37-51.

[5]  
Easterday, O., Palazotto, A., Branam, R., Baker, W., and George, T., 2011. “Experimental characterization of damping properties of coatings at elevated temperatures using a free-free beam based apparatus”. In 52nd AIAA/ASME/ASCE/AHS/ASC Structures, Structural Dynamics and Materials Conference, American Institute of Aeronautics and Astronautics.

[6]   | Baz, A., Imam, K., and McCoy, J., 1990. “Active vibration control of flexible beams using shape memory alloys”. Journal of Sound and Vibration, 140, pp. 437-456.
[7]   | Bhaumik, S., Bhakaran, T. A., Rangaraju, R., Venkataswamy, M., Parameswara, M. A., and Krishnan, R. V., 2002. “Failure of turbine rotor blisk of an aircraft engine”. Engineering Failure Analysis, 9(3).
[8]   | Buehler, W. J., and Wang, F. E., 1968. “A summary of recent research on the nitinol alloys and their potential application in ocean engineering”. Ocean Engineering, 1(1), pp. 105-120.
[9]   | McGavin, G. L., and Guerin, G., 2002. “Real-time seismic damping and frequency control of steel structures using nitinol wire”. Proc. SPIE, 4696, pp. 176-185.
[10]   | Humbeeck, J. V., 2003. “Damping capacity of thermoeleastic martensite in shape memory alloys”. Journal of Alloys and Compounds, 355(1), pp. 58-64.
[11]   | Piedboeuf, M. C., and Gauvin, R., 1998. “Damping behavior of shape memory alloys: strain amplitude, frequency and temperature effects”. Journal of Sound and Vibration, 214, pp. 885-901.
[12]   | Ikegami, R., Wilson, D. G., Anderson, J. R., and Julien, G. J., 1990. “Active vibration control using nitinol and piezoelectric ceramics”. Journal of Intelligent Material Systems and Structures, 1(2), pp. 189-206.
[13]   | Noebe, R., D. Gaydosh, D., S. Padula, I., Garg, A., Biles, T., and Nathal, M., 2005. “Properties and potential of two (NiPt)Ti alloys for use as high-temperature actuator materials”. pp. 364-375.
[14]   | Noebe, R., S. Padula, I., Bigelow, G., Rios, O., Garg, A., and Lerchl, B., 2006. “Properties of Ni19.5Pd30Ti50.5 high temperature shape memory alloy in tension and compression”. In Proceedings of Smart Structures and Materials 2006: Active Materials: Behavior and Mechanics, Vol. 6170.

[15]  
S. Padula, I., Noebe, R., Bigelow, G., Culley, G., Stevens, M., Penney, N., Gaydosh, D., Quackenbush, T., and Carpenter, B., 2007. “Development of a HTSMA-actuated surge control rod for high-temperature turbomachinery applications”. In 48th AIAA/ASME/ASCE/AHS/ASC Structures, Structural Dynamics, and Materials Conference, no. AIAA 2007-2196.

[16]   | Lagoudas, D. C., ed., 2008. Shape Memory Alloys. Springer Science+Business Media, LLC, New York, NY.
[17]   | Klocke, F., Zeis, M., Klimk, A., and Veselovac, D., 2013. “Experimental research on the electrochemical machining of modern titanium- and nickel-based alloys for aero engine components”. The Seventeenth CIRP Conference on Electro Physical and Chemical Machining (ISEM), 6, pp. 368-372.
[18]   | Wayman, C., 1993. “Shape memory alloys”. MRS Bulletin.
[19]   | Wischt, R., and Garafolo, N., 2015. “Variable stiffness technique for turbomachinery using shape memory alloys”. Proceedings from the 56th AIAA/ASCE/AHS/ASC Structures, Structural, Dynamics, and Materials Conference.
[20]   | Wischt, R., and Garafolo, N., 2016. “The development of an active damping and stiffness technique for turbomachinery using shape memory alloys,”. Proceedings from the 57th AIAA/ASCE/AHS/ASC Structures, Structural, Dynamics, and Materials Conference.
[21]   | Rajasekhar, M., and Srinivas, J., 2014. “Active vibration control in engine rotors using electromagnetic actuator system”. Journal of Mechanical Design and Vibration, 2(1), pp. 25-30.
[22]   | D’Errico, J., 2010. Surface fitting using gridfit. http://www.mathworks.com/matlabcentral/fileexchange/8998.