Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

The Modified Resonant Method for Measuring the Velocity Factor of the Electromagnetic Wave in the Microstrip Transmission Line

Alexey Kopylov*, Yuri Salomatov, Alexander Senchenko

Radio Engineering Department of the Engineering Physics and Radio Electronics Institute of the Siberian Federal University, Krasnoyarsk, Russia

Abstract: To measure the real value of velocity factor of the electromagnetic waves in the microwave microstrip transmission line was developed a modified resonant method and implements its measuring system. This system is using measuring the resonant frequency of a closed on the end one wave microstrip resonator. The method is designed to determine the velocity factor of the electromagnetic wave in the microstrip transmission line on substrates “policor” (95% Al₂O₃) for a small batch of microwave hybrid integrated circuits.

Keywords: velocity factor of the electromagnetic waves, dielectric constant, resonant method

Received January 31, 2014; Revised March 06, 2014; Accepted March 06, 2014

Citation: Alexey Kopylov, Yuri Salomatov, Alexander Senchenko, The Modified Resonant Method for Measuring the Velocity Factor of the Electromagnetic Wave in the Microstrip Transmission Line. Journal of Instrumentation Technology, 2 (1). 5-8. January 2014. doi:10.12691/jit-2-1-2

1. Introduction

Although the current trend in the development of the microwave (MW) technology is a massive shift from hybrid integrated circuits (HIS) to microwave monolithic integrated circuit (MIC), many problems arising in the construction of microwave devices of various functional purposes, can still be successfully solved using conventional HIS technology microwave. It is typical for microwave technology decimeter and centimeter wavelengths, where the dimensions of the elements of transmission lines in free space is very large and this requires use as a constructive basis HIS microwave substrates with sufficiently large value of the relative permittivity. These devices can include filters [1], the matching circuit [2], microwave transfer circuits of energy and signals [3], as well as a microwave device other than radio, assignments [4]. At design and realization of such devices based on microwave HIS the recurrent problem is the more or less accurate determination of basic characteristics used in this dielectric substrates – their permittivity . Knowledge of this value is the key to building, for example, frequency selective microwave devices, where even small mistakes in the definition (in the third decimal place) lead to a substantial care device parameters from those projected. It is not possible to achieve the basic design parameters of these devices – the bandwidths of passband or stopband frequencies and required parameters of amplitude-frequency (AFC), phase-frequency (PFC) characteristics and the characteristics of group delay time (GDT). Thereby, the determination of the permittivity of dielectric substrates for microwave HIS is relevant in our time the widespread introduction of monolithic microwave circuits. Task carried out in the present work was to study the measurement of the permittivity of the substrate to create “policor” (95% Al₂O₃) frequency selective devices used in HIS of decimeter wavelength range.

2. Resonant Method

2.1. Measurement System

Modern systems for measuring characteristics of the dielectric substrates in the microwave range, as a rule, contain a vector network analyzer include a microwave circuit, the processing results of two-port scattering parameter measurements at microwave frequencies (so-called "technology network analysis"). With this approach becomes unimportant, which parameter of dielectric will be calculated (calculated, to recover from the values of the scattering matrix) vector analyzer – the complex dielectric constant or magnetic, or their components. The accuracy of measurement in this case is a few percent over a very wide frequency bands. However, these systems have a significant disadvantage – they are very expensive (price level device – hundreds of thousands of dollars), making them inaccessible in practice. Due to the high cost of measuring systems, which include vector network analyzers firms – manufacturers instrumentation produce cheaper meters dielectric parameters, the principle of which is described as "impedance analysis". The one of the typical examples of such meters can serve as instrument E4991A-002 of Agilent Technologies company [5]. The essence of the impedance analysis is to measure the reactance (conduction) parallel plate capacitor formed by the cylindrical clamping device, with further calculation of the resulting capacitor capacitance (so this method is also called capacitive). With the appropriate processing of the measurements can be active and reactive components of the complex dielectric constant of the dielectric. However, the magnitude of measurement errors impedance (capacitance) using vary within wide limits and may be from 0,1 % to 90 % depending on the measured permittivity values of dielectric and the ratio of the thickness to the size of the gap [5].

Due to the fact that former of microwave devices should not know the value of the permittivity of the substrate, but he must know the value of the electromagnetic wave velocity factor in a transmission line, realized on the substrate, we cannot directly measure the value and use magnitude for practical developments "velocity factor" of electromagnetic wave in a transmission line. The magnitude called the "velocity factor" is the square root of the effective dielectric constant, which indicates how many times the wavelength of the electromagnetic wave in transmission line is reduced in relation to the wavelength in free space. To determine the velocity factor, in our opinion, the most effective method is "resonant method", which is based on the change in resonant frequency when changing the electrical properties of materials.

The studies were conducted in the following order. In the beginning we determined the dielectric constant εAg of the substrate material "polycor" by using the impedance method (capacitive) with use instrument E4991A-002 manufacturer Agilent Technologies [5] on the frequency 1 GHz. Results showed that they essentially depend on the clamping force of the sample in the measurement system and differ considerably from the passport data. For this reason we decided to measure the velocity factor of an electromagnetic wave in a microstrip transmission line using resonator method [6] instead of measuring the permittivity of the substrates by using the impedance (capacitive) method [5].

As a basis we took the known resonance measurement method, which is described in [6]. We have developed a measurement system containing a metal base, on which is attached measured dielectric substrate. On the dielectric substrate superimposed the measuring microstrip resonator, which is pressed against the substrate with a calibrated weight. Resonator configured as a ring to eliminate the influence on the measurement results of the end capacity. The measuring resonator is formed on Foiled Dacron LFR 50-018 (thickness 0.1 mm and the relative permittivity of about 2). Importantly that the permittivity of Dacron significantly below the expected value of the measured permittivity dielectric substrates (for "polycor" this value is about 9). The resonant frequency of the measurement resonator was chosen 1 GHz (this is the frequency limit of the capacitive method implemented for the device E4991A-002 of Agilent Technologies company). The measurements of the resonant frequency of the measuring microstrip resonator was performed on the scalar network analyzer P2M-04 manufactured by CJSC "SPC" Mikran "(Tomsk town of Russia).

Figure 1 shows a photograph of our measuring system. It marked: 1 – the laptop to display the results of measurements; 2 – the scalar network analyzer R2M-04; 3 – the measuring model; 4 – the SWR sensor ДГ1-04-01R; 5 – the head detector Д32-04; 6 – calibrated weight.

Purpose of equipment elements 1-5 in Figure 1 of our measuring system is well known. The purpose of cargo 6 is to reduce the influence of air gaps in a layered design metal base-measured dielectric substrate-measuring resonator. A special place occupies the process of selection quantities of cargo weight 6. Weight of cargo 6 is selected so that the resonance frequency was as low as possible. In this case, the resonator will be most tightly and uniformly adhere to the surface of the substrate and the air layer between them will be minimal. Thus, we expect that at this value of load weight 6 on the resonator obtained the resonant frequency will be closest to the truth.

Figure 1. Measurement system assembly

Purpose of equipment elements 1-5 in Figure 1 of our measuring system is well known. The purpose of cargo 6 is to reduce the influence of air gaps in a layered design metal base-measured dielectric substrate-measuring resonator. A special place occupies the process of selection quantities of cargo weight 6. Weight of cargo 6 is selected so that the resonance frequency was as low as possible. In this case, the resonator will be most tightly and uniformly adhere to the surface of the substrate and the air layer between them will be minimal. Thus, we expect that at this value of load weight 6 on the resonator obtained the resonant frequency will be closest to the truth.

2.2. The Measurements Results

Influence of cargo weight 6 (Figure 1) on resonant frequency of the measuring resonator are demonstrate Figure 2 and Figure 3. On these figures shows the measured dependences of the modulus of transmission coefficient (lower curves) and modulus of reflection coefficient (upper curves) from frequency for measuring resonator with different values of the load weight (pressing force).

Figure 2 shows the frequency dependences of the measuring resonator when installing the first load weight of 1 kg, Figure 2 – when installing the second load weight 2 kg. A further increase in cargo weight, according to our observations, did not cause a significant change in the resonance frequency of the measuring resonator.

Figure 2. Experimental frequency dependences of the measuring resonator when installing the first load weight of 1 kg: upper curve – modulus of the reflection coefficient, the lower curve – modulus of the transfer coefficient

Figure 3. Experimental frequency dependences of the measuring resonator when installing the first load weight of 2 kg: upper curve – modulus of the reflection coefficient, the lower curve – modulus of the transfer coefficient

The results show significant differences in the values of the velocity factor of an electromagnetic wave in a transmission line for the three values of shortening this quantity: for the velocity factor of the length of the electromagnetic wave in the line obtained in the present study the resonance method , for the expected value , and the velocity factor is obtained from the nameplate data on the substrate, which can be considered maximum possible value for the substrate. Such a large difference in the values of the coefficients of shortening is likely to involve the use of significantly different between methods of measuring the relative permittivity of the material under study. Furthermore, for different applications must be used different measured parameters of materials. For example in the science of materials must be used measuring of the relative permittivity (these include passport data value and the measurement results of the same magnitude instrument Agilent E4991A-002). The constructive-technological and topological aspects of materials used in these devices in this case are not considered.

It is the most best solution that the velocity factor of an electromagnetic wave length in the line will be measured because exactly it magnitude is used in microwave technique for practical realization of the devices based on these or other dielectric materials.

The difference in the velocity factor and relative dielectric constant values for the case of using expected (passport) value and the case of measure the relative dielectric constant value by use instrument Agilent E4991A-002 and the case of measure by use our resonant method value also conventional by the structure of our resonator. This is due to its rectangular topology and proximity of conducting microstrips polikor the edge of the substrate or the practical realization of the devices based on the used dielectric material is the best measured velocity factor magnitude of an electromagnetic wave in the line because this value is heavily dependent on the design parameters of the microwave device.

3. Conсlusion

We believe that the practical use should primarily take into account the magnitude of the velocity factor , obtained by the resonant method measuring.

References

[1]   | Jin, C., Chen, Z. “Compact Triple-Mode Filter Based on Quarter-Mode Substrate Integrated Waveguide”, IEEE Transactions on Microwave Theory and Techniques, 62 (1). 37-45. Jun. 2014.
[2]   | Chretiennot, T., Dubuc, D., Grenier, K. “A Microwave and Microfluidic Planar Resonator for Efficient and Accurate Complex Permittivity Characterization of Aqueous Solutions”, IEEE Transactions on Microwave Theory and Techniques, 61 (2). 972-978. Feb. 2013.
[3]   | Farzami, F., Norooziarab, M. “Experimental Realization of Tunable Transmission Lines Based on Single-Layer SIWs Loaded by Embedded SRRs”, IEEE Transactions on Microwave Theory and Techniques, 61 (8). 2848-2857. Aug. 2013.
[4]   | Kirshin, E., Oreshkin, B., Zhu, G.K., Popovic, M., Coates, M. “Microwave Radar and Microwave-Induced Thermoacoustics: Dual-Modality Approach for Breast Cancer Detection”, IEEE Transactions on Biomedical Ingineering, 61 (2). 354-360. Feb. 2013.
[5]   | Agilent. Solutions for Measuring Permittivity and Permeability with LCR Meters and Impedance Analyzers. Application Note 1369-1.
[6]   | Bernard, P. A., Gautray, J. M. “Measurement of Dielectric Constant Using a Microstrip Ring Resonator”, IEEE Transactions on Microwave Theory and Techniques, 32 (3). 974. March 1991.