Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Ultrasonic-assisted Extraction, Purification, Antioxidant and Antibacterial Activity of Polysaccharide from Cornus officinalis Leaves

Jian-Rui Sun*, Da-Hong Wang, Jun-Feng Zhao, Shao-Bin Gu

College of Food and Bioengineering, Henan University of Science and Technology, 471023, Luoyang, China

Abstract: The ultrasonic-assisted extraction process of polysaccharide from Cornus officinalis leaves (COLP) was optimized. After isolation and purification, the antioxidant and antibacterial activities of polysaccharide were studied in vitro. The extraction rate was highest under conditions of ultrasonic power 340 W, solvent to solid ratio 26:1(v/w), extraction temperature 71 °C and extraction time 2.3 h, reaching 7.04%, which was consistent with the model predicted value. The crude polysaccharide was isolated and purified by DEAE-52 cellulose chromatography column, and four components COLP-1, COLP-2, COLP-3 and COLP-4 were obtained. Then, Sephadex G-100 chromatography column was used to purify COLP-1 and COLP-3, and two components COLP-1-1 and COLP-3-2 were obtained. COLP-1-1 had strong scavenging ability against DPPH free radicals, against hydroxyl radical, and superoxide anion radical, with the highest clearance rate reaching 81.48%, 79.48% and 72.87% respectively. COLP-3-2 also had strong scavenging ability against DPPH free radicals, against hydroxyl radical, and superoxide anion radical, with the highest clearance rate reaching 88.57%, 76.64% and 86.08% respectively. The results indicated that COLP-1-1 and COLP-3-2 had higher antioxidant activity, and the antioxidant activity of COLP-3-2 was stronger than COLP-1-1. The results of antibacterial activity showed that COLP-1-1 had the highest antibacterial activity on Bacillus subtilis and weaker antibacterial activity on Escherichia coli, Salmonella typhimurium and Staphylococcus aureus; COLP-3-2 had a certain antibacterial activity on Escherichia coli, Pseudomonas aeruginosa, Salmonella typhimurium and Bacillus subtilis.

Keywords: cornus officinalis leaves, polysaccharide, ultrasonic-assisted extraction, antioxidant activity, antibacterial activity

Received August 11, 2020; Revised September 14, 2020; Accepted September 23, 2020

Citation: Jian-Rui Sun, Da-Hong Wang, Jun-Feng Zhao, Shao-Bin Gu, Ultrasonic-assisted Extraction, Purification, Antioxidant and Antibacterial Activity of Polysaccharide from Cornus officinalis Leaves. Journal of Food and Nutrition Research, 8 (9). 496-505. January 2020. doi:10.12691/jfnr-8-9-6

1. Introduction

The traditional Chinese medicine cornel dogwood is dried and ripe fruit of Cornus officinalis Sieb.et Zucc., which is first published in “Sheng Nong's herbal classic”. It has the function of tonifying liver and kidney, astringent and solidifying, and is effective in treating vertigo, tinnitus, waist and knee pain, impotence and spermatorrhea, urination frequency, heart shaking powder, great sweat collapse, internal heat quench thirst and so on [1]. The fruit of Cornus officinalis is one of the traditional Chinese medicines with homologous medicine and food, which is a commonly used medicine in traditional Chinese medicine prescriptions [2]. Modern researches have found that the components of Cornus officinalis are complex and diverse, which not only contain abundant active ingredients such as iridoids, saponins, polysaccharides, tannins, organic acids, flavonoids, esters, but also contain a variety of essential trace elements for human body [3,4,5,6]. Modern pharmacological studies have also found that it is not only effective in protecting liver, anti-inflammatory, antioxidant, anti-fatigue, anti-tumor, protecting myocardium, hypoglycemic, enhancing immunity, regulating heart rate, but also effective in the treatment of senile dementia and infertility [7,8,9].

Polysaccharide is an important active ingredient in Cornus officinalis, which has physiological functions such as anti-aging, hypoglycemic, antioxidant, anticancer, anti-virus, and enhancing immunity, which can be widely used in medicine and health food [8,10]. Wang found that a polysaccharide from Fructus Corni showed significant hypoglycemic and hypolipidemic effects [11]. Sun found that polysaccharide extracted from Cornus officinalis could improve secondary hippocampal damage of epileptic rats due to its antioxidation and antiapoptosis effects [12]. Wang found that polysaccharide of Fructus corni could regulate ovarian function-related hormone levels in aging mice, indicating that it had significant anti-aging effects [13].

Fruits are the traditional medicinal part of Cornus officinalis, while the cores and leaves are abundant, which are basically discarded. In recent years, studies had shown that the cornel kernels were rich in tannins, unsaturated fatty acids, ursolic acid, gallic acid, amino acids, vitamins and so on, which were also effective in anti-inflammatory, anti-tumor, myocardial protection, anti-aging, anti-fatigue, etc. [8]. At present, there have been no reports on polysaccharide from Cornus officinalis leaves. In this study, the ultrasonic-assisted extraction process of polysaccharide from Cornus officinalis leaves was optimized by response surface methodology, and its antibacterial and antioxidant activities were studied in order to provide theory gist for the comprehensive utilization of Cornus officinalis leaves.

2. Materials and Methods

2.1. Materials and Reagents

Cornus officinalis leaves were gathered from mountainous area of western Henan Province, which were sieved using a 40 mesh screen after drying and crushing.

Chemical reagents such as trichloromethane, butyl alcohol, phenol, pyrogallol, ethanol, ascorbic acid (VC), 1,1-diphenyl-2-picrylhydrazyl (DPPH), H₂O₂ were analytical grade, and they were purchased from Tianjin Deen Chemical Reagent Co., Ltd.

2.2. Extraction of Polysaccharide

Quantitatively weighed the ground Cornus officinalis leaves, and put them in a Soxhlet extractor degreasing with petroleum ether, and then dried out. Added an appropriate amount of distilled water as the extraction medium and mixed well. Ultrasonic crushed, and then heated in a water bath at a certain time. Centrifuged at 8000 r/min for 10 min and collected the supernatant. Three times the volume of anhydrous ethanol was added to the supernatant, and then it was allowed to stand overnight. The precipitation was centrifuged at 8000 r/min for 15 min. Sevage method was used to remove the protein [14], H₂O2 method to remove the pigment [15], and then vacuum freeze-dried to obtain crude polysaccharide.

2.3. Determination of Polysaccharide Extraction Rate

The concentration of polysaccharide was determined by phenol-sulfuric acid colorimetry [16]. The polysaccharide concentration was calculated using a linear equation: Y = 11.93X - 0.0462, R² = 0.9972 (Using glucose as the standard curve to get the relationship between sugar concentration and absorbance value).

2.4. Single Factor Test

The effects of ultrasonic power (150, 250, 350, 450, 550, 650 W), solvent to solid ratio (15:1, 25:1, 35:1, 45:1, 55:1 (v/w)), extraction temperature (40, 50, 60, 70, 80, 90°C) and extraction time (0.5, 1.0, 1.5, 2.0, 2.5, 3.0, 3.5, 4.0 h) on the extraction effect of polysaccharide from Cornus officinalis leaves were investigated.

2.5. Response Surface Test Design

On the basis of single factor test results, the four-factor and three-level central composite design (CCD) was performed: ultrasonic power (X₁), solvent to solid ratio (X₂), extraction temperature (X₃) and extraction time (X₄) (Table 1).

Table 1. Factors and levels of central composite design

2.6. Separation and Purification of Polysaccharide

The crude polysaccharide from Cornus officinalis leaves was prepared as a 5 mg/mL solution, and DEAE-52 chromatography column (2.6 cm×30 cm) was used for chromatography. The sample quantity was 10 mL, and flow rate was 1.25 mL/min. Distilled water, 0.10, 0.20, 0.30, 0.40 mol/L NaCl solution was used for gradient elution respectively. One tube was collected every 5 mL by the automatic fraction collector. Phenol-sulfuric acid method was used to measure the absorbance at 490 nm, and the elution curve was plotted. The peak eluate samples were combined, dialyzed against deionized water for 2 d, and freeze-dried in vacuo.

Lyophilized groups collected from DEAE-52 column chromatography were distributed to make 5 mg/mL solutions, and 2 mL was loaded. Sephadex G-100 column was used for chromatography, and flow rate was 0.5 mL/min with distilled water as eluent. The eluate was collected by automatic fraction collector, and the absorbance was measured to plot elution curve. The peak eluate samples were combined, dialyzed, and vacuum freeze-dried to obtain refined polysaccharide.

2.7. Determination of DPPH Radical Scavenging Ability

According to the method of Yuan [17]: 1.0 mL polysaccharide solution was taken, adding 4 mL 0.004% DPPH solution, and mixed evenly. Then, it was standing in the dark for 30 min. The absorbance was measured at 517 nm. Absolute ethanol was used as blank control and VC of corresponding concentration was used as the positive control. Each sample was measured 3 times in parallel and the average value was taken. The clearance formula could be expressed as:

In the formula, A₁ was the sample solution or positive control absorbance, A₂ was the blank control absorbance.

2.8. Determination of Hydroxyl Radical Scavenging Ability

According to the method of Yuan [18]: 0.4 mL pH 7.4 PBS, 0.25 mL redistilled water, 0.5 mL FeSO₄ (7.5 mmol/L) and 0.15 mL phenanthroline solution (5 mmol/L) were added into the test tube, and mixed evenly. Then, 1.0 mL polysaccharide solution and 0.1 mL 1% hydrogen peroxide solution was added at last. The absorbance was measured at 536 nm after a water bath at 37°C for 60 min. VC of corresponding concentration was used as the positive control, the damaged tube with no sample, the control tube with no sample and hydrogen peroxide, and the blank tube with no hydrogen peroxide. Each sample was measured 3 times in parallel and the average value was taken. The clearance rate formula could be expressed as:

In the formula, Asample was the sample tube absorbance, Adamaged was the damaged tube absorbance, Acontrol was the control tube absorbance, Ablank was the blank tube absorbance.

2.9. Determination of Superoxide Anion Radical Scavenging Ability

According to the method of Yuan [18]: 0.1 mL polysaccharide solution with different mass concentrations was taken, and 2.8 mL Tris-HCl buffer solution (0.05 mol/L), 0.1 mL pyrogallol (3 mmol/L) were added. The control group was distilled water, while the blank group was 2.8 mL Tris-HCl buffer solution, 0.1 mL distilled water, and 0.1 mL HCl (0.01mol/L). The positive control was VC. After reaction for 30 s, the absorbance was determined at 320 nm every 30 s, and the reaction was performed for 5 min.

In the formula, Acontrol was the control grouphe absorbance; Asample was the sample solution absorbance.

2.10. Bacteriostatic Experiment

The test bacteria were inoculated on the bacterial medium, incubated in a constant temperature incubator at 37°C for 24 h. The activated bacteria were picked up by inoculating loop and placed in sterilized distilled water, and then mixed to make a bacterial suspension.

Filter paper method [19] was used for the bacteriostatic test: the sterilized round filter paper (Φ 6 mm) was dried and immersed in the prepared polysaccharide solution for 12 h. Then, the prepared various bacterial suspensions (200 μL) were placed on the solid medium surface and spread evenly. The soaked filter paper was pasted on the medium surface with sterilized forceps, and incubated in a constant temperature incubator at 37°C for 18~24 h. The inhibition zone was observed and its diameter was measured. The blank control was treated with sterile water.

3. Results and Discussions

3.1. Single Factor Test Results

With the increase of ultrasonic power, the extraction rate of polysaccharide first increased and then decreased (Figure 1a). When the ultrasonic power was 250 W, the extraction rate of polysaccharide reached the highest 4.96%; then decreased gradually. Due to the mechanical and cavitation effect of ultrasonic waves, the cell wall and membrane structure of Cornus officinalis leaves would be destroyed, so that polysaccharide could be dissolved more easily. Moreover, the more fully cell wall was destroyed with the increase of ultrasonic power, the more fully the polysaccharide would be dissolved. However, high ultrasonic power would not only change the structure of polysaccharide, but also break the bonds between polysaccharide molecules, and cause degradation. Moreover, sound intensity would also increase with the increase of power, leading to the generation of numerous vacuoles, and the energy transmission would be reduced by reflecting acoustic waves, which was not conducive to the extraction process, resulting in a decline of polysaccharide extraction rate [20]. Therefore, the ultrasonic power was chosen to be 250 W.

The extraction rate of polysaccharide increased gradually with the decrease of solvent to solid ratio (Figure 1b). When solvent to solid ratio was 25:1(v/w), the extraction rate was 5.04%, and then gradually stabilized. This was probably because the total amount of dissolved polysaccharide in Cornus officinalis leaves would increase with the increase of extract solution amount. In addition, the concentration of protein in the whole extraction system would decrease with the increase of extract solution amount, which would reduce the adsorption effect of protein deposition on polysaccharide and the loss of polysaccharide [21]. However, an overtop solvent to solid ratio would increase raw materials and reagents amount, cause waste and increase costs, as well as increase the difficulty of post-treatment process. Therefore, solvent to solid ratio was chosen to be 25:1(v/w), which could ensure a high extraction rate and reduce the extraction solution amount.

The extraction rate of polysaccharide increased rapidly and then reduced gradually with the rise of extraction temperature (Figure 1c). The extraction rate of polysaccharide reached the highest 5.52% when the temperature was 70°C. This was probably because the solubility of polysaccharide would increase with the extraction temperature rise, and the dissolution amount of polysaccharide would increase, leading to the rise of extraction rate. However, the color of extracted polysaccharide was darker when the extraction temperature was too high, which might be because the high temperature would lead to the destruction of polysaccharide structure, and the degradation of polysaccharide [19]. Moreover, high temperature would accelerate the release rate of impurities in leaves, leading to a reduction in polysaccharide yield. Therefore, 70°C was a suitable extraction temperature.

Figure 1. Effects of different factors on the extraction rate of polysaccharide. a ultrasonic power, b solvent to solid ratio, c extraction temperature, d extraction time

Within 0.5~2.5 h, the extraction rate of polysaccharide gradually rose (Figure 1d). The extraction rate reached the maximum value of 5.66% when the extraction time was 2.0 h. However, the extraction rate gradually decreased after 2.0 h. The longer the extraction time was, the more beneficial it was to polysaccharide dissolution, which resulting in the rise of the extraction rate within a certain period. However, a large amount of viscous substances in the leaves would be dissolved if the extraction time is too long, and the impurities and viscosity of the solution would increase, which would affect the dissolution of polysaccharide. In addition, and prolonged heating could break polysaccharide molecular chains into small molecules and degrade the polysaccharide, increasing the loss of polysaccharide during alcohol precipitation process, leading to a decline in polysaccharide extraction rate. Therefore, 2.0 h was a suitable extraction time.

3.2. Results and Analysis of CCD

3.2.1. Results of CCD

Design-expert 8.0 was used to design the four-factor and three-level central combination test. The response value was extraction rate of polysaccharide. The design scheme and results of the 27 experimental combinations were shown in Table 2.

3.2.2. Model Establishment and Significance Test

The Design-expert software was used to analyze the experimental results, and the fitted equation was as follows:

At the same time, the variance analysis results of the regression equation by analysis software were shown in Table 3.

As could be seen from Table 3, the model was highly significant (p<0.01). At the same time, the p values of X₁, X₂, X₄, X₁X₃, X₂X₃, in the model were all less than 0.05, indicating that they were all significant; in other words, they had significant effects on the extraction rate of polysaccharide. The lack of fit was 0.1924, and it's not significant (p﹥0.05), which indicated that the model was properly selected.

In addition, correlation coefficient R² of the model was 0.9491, which could explain 94.91% of experimental results, indicating that the model had a good correlation. C.V. of the model was 3.98%, which indicated that the experimental operation was reliable and could accurately reflect the experimental results. In conclusion, the model had good fitting degree and small experimental error, which could be used to analyze and predict the extraction rate of polysaccharide.

Among the four factors, the influence of solvent to solid ratio was significant, and ultrasonic power and extraction time was extremely significant. The order of four factors affecting the extraction rate was as follows: X₄ > X₁ > X2 > X₃.

Table 2. Scheme and results of central composite design

Table 3. Variance analysis (ANOVA) of test results

3.2.3. Response Surface Analysis

In order to analyze the interaction between various factors and determine the best experimental point, response surface graph was drawn by Design-expert software to evaluate the interaction of each factor on the extraction effect. The response surface graph could visually see the interaction between various factors and the optimal parameters [22]. Figure 2 was the response surface graph of the interaction between various factors. The response surface slopes of 2b and 2d were both relatively steep, indicating that the interaction between X₁ and X₃, X₂ and X₃ had a significant effect on the extraction rate. However, the response surface slopes of 2a, 2c, 2e, and 2f were relatively gentle, indicating that the interaction among other factors had no significant influence on the extraction rate.

3.2.4. Confirmatory Experiment

Through further analysis of software, the corresponding values of each factor (X₁, X₂, X₃, X₄) at the maximum response value (Y) were: X₁= 341.01 W, X₂= 26.23:1 (v/w), X₃= 70.64°C, X₄= 2.27 h. Under these conditions, the theoretical extraction rate of polysaccharide was 7.1104%.

Figure 2. Influence of various factors on extraction rate of polysaccharide

The reliability of the results was verified according to the optimal value of each factor determined by response surface. According to the feasibility of actual operation, the optimal process conditions were modified to ultrasonic power 340 W, solvent to solid ratio 26:1 (v/w), extraction temperature 71°C, and extraction time 2.3 h. Under the modified optimal experimental conditions, multiple repeated experiments were performed, and the average extraction rate of polysaccharide was 7.04%, which was very close to theoretical value, and the relative error was only 0.99%, indicating that the regression model was high accuracy.

3.3. Separation and Purification of Polysaccharide

The separation and purification result of crude polysaccharide by DEAE-52 was shown in Figure 3a. Due to the existence of some charged groups such as sulfuric acid group and uronic acid in polysaccharide components, the components with single charge were preliminarily separated according to ionic strength. COLP-1, COLP-2, COLP-3 and COLP-4 were eluted by 0, 0.10, 0.20, and 0.30 mol/L NaCI solution respectively. Due to the low content of COLP-2 and COLP-4, the components COLP-1 and COLP-3 were dialyzed, vacuum freeze-dried and further purified.

COLP-1 and COLP-3 were further purified by Sephadex G-100 column. Two components, COLP-1-1 and COLP-1-2, were obtained from COLP-1, but the content of COLP-1-2 was very low (Figure 3b). Similarly, two components, COLP-3-1 and COLP-3-2, were eluted from COLP-3, but the content of COLP-3-1 was very low (Figure 3c). COLP-1-1 and COLP-3-2 were dialyzed and vacuum freeze-dried to obtain refined polysaccharide.

3.4. Antioxidant activity of COLP-1-1 and COLP-3-2

DPPH radical is a nitrogen-centered free radical with stable chemical properties, which is relatively difficult to remove. If it can be removed by the subject, it indicates that the subject has strong scavenging ability. The scavenging ability of COLP-1-1 and COLP-3-2 to DPPH radical increased with the rise of sample concentration (Figure 4a). When the sample concentration was 1.2 mg/mL, the clearance rate of COLP-1-1 and COLP-3-2 to DPPH radical reached 81.48% and 88.57%, respectively. COLP-1-1 and COLP-3-2 had lower scavenging ability to DPPH radical than VC, while COLP-3-2 had stronger scavenging ability than COLP-1-1. The results showed that COLP-1-1 and COLP-3-2 had strong ability to scavenge DPPH radical.

Figure 3. Elution curve of polysaccharide by chromatographic column. a elution curve of DEAE-52 cellulose column; b, c elution curve of Sephadex G-100

Figure 4. Scavenging ability of polysaccharide. a scavenging ability to DPPH radical, b scavenging ability to hydroxyl radical, c scavenging ability to superoxide anion radical

Hydroxyl radical can cause serious damage to macromolecules such as proteins and nucleic acids, so the scavenging effect of test substances on hydroxyl radical is also an important indicator to measure its antioxidant capacity [23]. The scavenging ability of COLP-1-1 and COLP-3-2 to hydroxyl radical increased with the rise of sample concentration (Figure 4b). When sample concentration was 1.2 mg/mL, the clearance rate of COLP-1-1 and COLP-3-2 to hydroxyl radical reached 79.48% and 76.64%, respectively. COLP-1-1 and COLP-3-2 had lower scavenging capacity to hydroxyl radical than VC, while COLP-1-1 had stronger scavenging ability than COLP-3-2. The results showed that COLP-1-1 and COLP-3-2 had strong scavenging ability to hydroxyl radical.

The scavenging ability of COLP-1-1 and COLP-3-2 to superoxide anion radical increased with the rise of sample concentration, and showed a good dose-effect relationship (Figure 4c). When sample concentration was 1.2 mg/mL, the clearance rate of COLP-1-1 and COLP-3-2 to superoxide anion radical reached 72.87% and 86.08%, respectively. Both COLP-1-1 and COLP-3-2 had lower scavenging capacity to superoxide anion radical than VC, while COLP-3-2 had stronger scavenging ability than COLP-1-1. The results showed that COLP-1-1 and COLP-3-2 had strong scavenging ability to superoxide anion radical.

3.5. Antibacterial Activity of COLP-1-1 and COLP-3-2

COLP-1-1 had the strongest antibacterial activity on B. subtilis, and the diameter of inhibition zone could reach 20.52 mm; besides, it also had a certain antibacterial activity on E. coli, S. typhimurium and S. aureus, but the inhibition zone was small and the antibacterial activity was weak; it had no inhibitory effect on P. aeruginosa and P. mulfocida (Table 4). COLP-3-2 had weak antibacterial activity on E. coli, P. aeruginosa, S. typhimurium and B. subtilis, but no inhibitory effect on S. aureus and P. mulfocida (Table 4).

Table 4. Antibacterial activity of COLP-1-1 and COLP-3-2

In conclusion, COLP-1-1 had stronger inhibitory effect on gram-positive bacteria and weak inhibitory effect on gram-negative bacteria. While, COLP-3-2 had stronger inhibitory effect on gram-negative bacteria than gram-positive bacteria.

4. Conclusions

In this study, the ultrasonic-assisted extraction process of COLP was optimized by response surface method. Then, antioxidant and antibacterial activities of polysaccharide were studied after isolation and purification. The correlation coefficient of the optimal regression mathematical model for the extraction of polysaccharide was 0.9491 through the central combination design, which indicated that the model had a good correlation and could accurately predict the extraction rate. Among the four factors, ultrasonic power and extraction time had extremely significant effects on the extraction rate, and solvent to solid ratio had significant effect, and the order of four factors affecting the extraction rate was extraction time > ultrasonic power > solvent to solid ratio > extraction temperature. After optimization, the optimal solution for polysaccharide extraction was as follows: ultrasonic power 340W, solvent to solid ratio 26:1(v/w), extraction temperature 71°C and extraction time 2.3h. Under these conditions, the extraction rate was 7.04%, which was basically consistent with the theoretical value.

DEAE-52 cellulose chromatography column was used to isolate and purify crude polysaccharide, and four components, COLP-1, COLP-2, COLP-3 and COLP-4, were obtained. Then, COLP-1 and COLP-3 were further purified by Sephadex G-100 chromatography column, and two components COLP-1-1 and COLP-3-2 were obtained.

Antioxidant activity experiment results showed that COLP-1-1 and COLP-3-2 had strong antioxidant activity, and COLP-3-2 was higher than COLP-1-1. COLP-1-1 had strong scavenging ability against DPPH free radicals, against hydroxyl radical, and superoxide anion radical, with the highest clearance rate reaching 81.48%, 79.48% and 72.87% respectively. COLP-3-2 also had strong scavenging ability against DPPH free radicals, against hydroxyl radical, and superoxide anion radical, with the highest clearance rate reaching 88.57%, 76.64% and 86.08% respectively. The biological activity of polysaccharide is closely related to its primary and advanced structure. The antioxidant activity of polysaccharide is not only related to composition of monosaccharides, type of glycosidic bonds, type, number and position of substituents, and length of branch chains, but also influenced by molecular weight and advanced structure [24]. Therefore, it is necessary to analyze the structure of polysaccharide from Cornus officinalis leaves in the follow-up study.

Results of bacteriostatic experiment showed that COLP-1-1 had the strongest antibacterial activity on B. subtilis and weaker antibacterial activity on E. coli, S. typhimurium and S. aureus; COLP-3-2 had weak antibacterial activity on E. coli, P. aeruginosa, S. typhimurium and B. subtilis.

This study provides theory gist for the comprehensive utilization of of Cornus officinalis leaves resources, and a certain theoretical basis for screening natural antibacterial and antioxidant substances.

Acknowledgements

This work was supported by the National Natural Science Foundation of China (NO. 31401672).

Conflicts of Interest

The authors declare no conflict of interest.

References

[1]   | Huang, J., Zhang, Y., Dong, L., Gao, Q., Yin, L., Quan, H., Chen, R., Fua, X., Lin, D, “Ethnopharmacology, phytochemistry, and pharmacology of Cornus officinalis Sieb. et Zucc”, J Ethnopharmacol, 213, 280-301, 2018.
[2]   | Ma, W., Wang, K., Cheng, C., Yan, G., Lu, W., Ge, J., Cheng, Y., Li, N, “Bioactive compounds from Cornus officinalis fruits and their effects on diabetic nephropathy”, J Ethnopharmacol, 153 (3), 840-845, 2014.
[3]   | Li, Y., Yang, J., Li, J., Liang, X., Sun, J, “Two new secoiridoid glucosides from the twigs of Cornus officinalis”, Chem Nat Compd, 52 (4), 647-650, 2016.
[4]   | Wang, X., Liu, C., Li, J., Zhang, B., Ji, L., Shang X, “Iridoid glycosides from the fruits of Cornus officinalis”, J Asian Nat Prod Res, 20(10), 934-942, 2018.
[5]   | Arielle, S., Alexis, C., Catherine, M., Melissa, K., Clare, Z., Brant, B, “Compositional analysis and biological characterization of Cornus officinalis on human 1.1B4 pancreatic β cells”, Mol Cell Endocrinol, 494, 110491, 2019.
[6]   | Zhang, W., He, J., Xu, Y., Xu, J., Ye, X, “Cornusglucosides A and B, two new iridoid glucosides from the fruit of Cornus officinalis Sieb. et Zucc”, Chem Biodivers, 16(11), e1900421, 2019.
[7]   | Czerwińska, M., Melzig, M, “Cornus mas and Cornus Officinalis-analogies and differences of two medicinal plants traditionally used”, Front Pharmacol, 9, 894-921, 2018.
[8]   | Dong, Y., Feng, Z., Chen, H., Wang, F., Lu, J, “Corni Fructus: a review of chemical constituents and pharmacological activities”, Chin Med, 13(1), 34-53, 2018.
[9]   | Ji, L., Wang, X., Li, J., Zhong, X., Zhang, B., Juan, J., Shang, X, “New iridoid derivatives from the fruits of Cornus officinalis and their neuroprotective activities”, Molecules, 24(3), 625-632, 2019.
[10]   | Wu, Y., Wang, X., Shen, B., Kang, L., Fan, E, “Extraction, structure and bioactivities of the polysaccharides from Fructus corni”, Recent Pat Food Nutr Agric, 5 (1), 57-61, 2013.
[11]   | Wang, D., Li, C., Fan, W., Yi, T., Wei, A., Ma, Y, “Hypoglycemic and hypolipidemic effects of a polysaccharide from Fructus Corni in streptozotocin-induced diabetic rats”, Int J Biol Macromol, 133 (15), 420-427, 2019.
[12]   | Sun, X., Kong, L., Zhou, L, “Protective effect of Fructus corni polysaccharide on hippocampal tissues and its relevant mechanism in epileptic rats induced by lithium chloride-pilocarpine”, Exp Ther Med, 16 (1), 445-451, 2018.
[13]   | Wang, Y., Wu, J., Li, Y., Qi, X, “Polysaccharides of Fructus corni improve ovarian function in mice with aging-associated perimenopause symptoms”, Evid-based Compl Alt, 3s, 1-8, 2019.
[14]   | Wang, X., Zhang, Y., Liu, Z., Zhao, M., Liu, P, “Purification, characterization, and antioxidant activity of polysaccharides isolated from Cortex Periplocae”, Molecules, 22(11), e1866, 2017.
[15]   | Hu, H., Liang, H., Li, H., Yuan, R., Sun, J., Zhang, L., Han, M., Wu, Y, “Isolation, purification, characterization and antioxidant activity of polysaccharides from the stem barks of Acanthopanax leucorrhizus”, Carbohyd Polym, 196, 359-367, 2018.
[16]   | Babamoradi, N., Yousefi, S., Ziarati, P, “Optimization of ultrasound-assisted extraction of functional polysaccharides from common mullein (Verbascum thapsus L.) flowers”, J Food Process Eng, 41, e12851, 2018.
[17]   | Yuan, J.F., Wang, T.T., Chen, Z.Y., Wang, D.H., Gong, M.G., Li, P.Y., “Microwave irradiation: impacts on physicochemical properties of red wine”, CyTA-J Food, 18(1):281-290, 2020.
[18]   | Yuan, J.F., Liu, X., Yang, J.X., Cui, X, “Forsythia suspense leaves, a plant: extraction, purification and antioxidant activity of main active compounds”, Eur Food Res Technol, 238, 527-533, 2014.
[19]   | Sun, J.R., Zhao, J.F., Fu, D.D., Gu, S.B., Wang, D.H, “Extraction, optimization and antimicrobial activity of IWSP from oleaginous microalgae Chlamydomonas sp. YB-204”, Food Sci Technol Res, 23(6), 819-826, 2017.
[20]   | Liu, Y.H., Zeng, Y., Hu, X.Y., Sun, Y., “Effect of ultrasonic power on water removal kinetics and moisture migration of kiwifruit slices during contact ultrasound intensified heat pump drying”, Food Bioprocess Tech, 13, 430-441, 2020.
[21]   | Fabregas, J., Garcia, D., Fernandez-Alonso, M., Rocha, A., Gómez-Puertas, P., Escribano, J., Otero, A., Coll, J, “In vitro inhibition of the replication of haemorrhagic septicaemia virus (VHSV) and African swine fever virus (ASFV) by extracts from marine microalgae”, Antivir Res, 44(1),67-73, 1999.
[22]   | Yu, G., Zhang, S., Fan, M., Sun, Y., Hu, X., Li, W, “Ultrasound-assisted extraction and comparison of extraction methods based on antioxidant activities of polysaccharides from Flammulina velutipes”, J Food Meas Charact, 11, 1752-1760, 2017.
[23]   | Guo, H., Zhang, W., Jiang, Y., Wang, H., Chen, G., Guo, M, “Physicochemical, structural, and biological properties of polysaccharides from Dandelion”, Molecules, 24(8), e1485, 2019.
[24]   | Zhu, R., Zhang, X., Wang, Y., Zhang, L., Zhao, J., Chen, G., Fan, J., Jia, Y., Yan, F., Ning, C, “Characterization of polysaccharide fractions from fruit of Actinidia arguta and assessment of their antioxidant and antiglycated”, Carbohyd Polym, 210, 73-84, 2019.