Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Analysis of the Operation of the Systems with Distributed Parameters with the Adjusting System Objects

Musayev Vidadi Hasan*, Huseynov Natig Etibar

Department Computer Systems and Networks, Azerbaijan Technical University, Baku, Azerbaijan

Abstract: An analysis of the trunk oil pipeline mode with multiple adjustable intermediate pumping stations is conducted on the example of the trunk oil pipeline basing on the developed computational models of transient processes in the systems with distributed parameters with the adjusting system objects.

Keywords: trunk pipeline, distributed parameter, discrete method, adjusting devices, initial and boundary conditions

Received April 21, 2015; Revised July 01, 2015; Accepted August 06, 2015

Citation: Musayev Vidadi Hasan, Huseynov Natig Etibar, Analysis of the Operation of the Systems with Distributed Parameters with the Adjusting System Objects. International Transaction of Electrical and Computer Engineers System, 3 (1). 30-33. January 2015. doi:10.12691/iteces-3-1-4

1. Introduction

The studies show that multi-level control systems with distributed parameters, an exact example of which is a complex oil pipeline systems, which are designed for and transportation of oil and oil products, have specific requirements for the development of decision-making tactics and strategy at all levels of the hierarchical management structure in order to provide reliability of technological problem solutions. Defining the duration of restoring the pressure in the end point, as well as at any point in the pipeline after turning off intermediate pumping stations and some other disturbances, is of practical importance in the issues of automation of pipeline control [1,2].

The study of transient processes also enables the development of the practical methods suitable for determination by relatively simple computations of hydrodynamic characteristics of pipelines and physical properties of pumped products. The calculation and study of transient processes in trunk pipelines with intermediate control elements, when the pumps are disabled at one of the intermediate pumping stations or the pumping, as well as entire pump station is enabled (disabled), is a complex mathematical task.

Knowledge of the characteristics of unsteady flow in dynamic processes is necessary to address the complex automation of trunk oil pipelines. Information about dynamic processes in various disturbing effects, enables to prevent the accidents, to determine the response of the remote control system for data collection, and to choose a rational system of automatic adjusting. Detailed information about the state of technological control object enables to develop a complete set of files required to generate a database, as well as for the identification and management, both in vertical and horizontal hierarchical control system [2].

2. Relevance

The definition of the system state, its objects, identification of its parameters, adapting them to real operating conditions play the major role in the decision-making. The problem solution is actually confined to the restoration of the parameters on the system performance observed in the past. Obviously, decision-making on providing required system parameters or its separate objects, which are adapted to the previous state of the system, is unreliable. The theory system control with distributed parameters mainly includes the tasks associated with the identification of affecting functions in order to provide the required outlet parameters of the objects or the system as a whole [2,3].

Solution of such practical problems is of great theoretical and practical interest and importance in the theory and practice of the exploitation of the systems with distributed parameters.

Regarding to the intensive development and specific technological features, complex pipeline systems for the transportation of oil and oil products, which is of great importance, is considered in the paper as a research object.

3. Problem Statement

Basing on all abovementioned issues, the study of transient processes resulting from the enabling and disabling the pump unit (PU) is essential for the analysis of transient modes in the trunk pipelines. Due to the changes in the performance of the pumping station (PS), when it is enabled or the separate units are disabled, the pressure in the pipe changes before and after oil-pumping station (OPS). Pressure change after disturbance source will affect the performance of the following OPS. In this task formulation, it is important to take into account the dynamic characteristics of two pipeline sections adjacent to OPS, in addition, at the beginning and at the end of pipeline sections the amount of the pressure change must be agreed with characteristics of related OPSs [4].

A discrete method of production control, as one of the methods to control the operation mode at PS, applied in domestic trunk pipelines of oil and oil products [1,5].

In this context, the paper analyzes the operation mode of trunk oil pipeline with multiple adjustable intermediate pumping stations basing on the proposed computational models for the study of dynamic processes in trunk pipeline systems (TP), and discrete regulation of OPC productivity [3].

4. Solution Methods

In this paper, double and discrete transformation is used as a mathematical device. Recurrence relations are applied in the transition from the image to the original functions [7]. It is known that the study of dynamic processes in the trunk pipeline is reduced to the solution of the equations of motion and continuity, with appropriate initial and boundary conditions [4].

One of the main objectives of management of oil transportation over a long distance in the present stage of development of pipeline transport is the optimization of the operating modes of TP. Obviously, to some extent it is provided by the circuits (methods) for regulating, features of regulatory devices, and their setting parameters. The choice of regulatory devices must be based on the processes in TP, when the mutual influence of OPS is taken into account.

Let’s review the section of TP with two OPCs (Figure 1) in the regulation of operating mode of pumping stations with zero initial and boundary conditions:

if ,

[picture] | (1)

if

if ,

wherein denotes the relative change in pressure and flow in the pipeline; denote НС characteristics; denotes controlling impact of regulatory authorities.

Figure 1. Structural scheme of the sections of TP with two OPSs

The boundary conditions given in the form (1) denotes that the interface conditions are specified in the PS sections, i.e. the conditions, given by PS and regulatory devices on it, and a stepwise change in the flow at the end of the pipeline is specified.

In this case, the problem solution is reduced to the solution of equation systems

[picture] | (2)

which describe the dynamics in the corresponding sections of the trunk pipeline at the indicated zero and boundary conditions of the form (1).

In this case, the boundary conditions (1) in the operator form can be presented:

if

if

[picture] | (3)

if

if .

Solution of the equation system according to [3], under these initial and boundary conditions in the operator form is

[picture] | (4)

[picture] | (5)

for the first section,

[picture] | (6)

[picture] | (7)

[picture] | (8)

for the second section,

[picture] | (9)

[picture] | (10)

[picture] | (11)

The originals of these functions are defined in the image table [3,10]. For example, the function original ,

, , denote constant coefficients.

These functions have a common characteristic equation of

[picture] | (12)

Table 1. Results of experimental calculations

For the evaluation of the developed computational model of transient processes in TP [3], the change in pressure was calculated at the input and outlet of disabled OPS, next NPC, as well as at various sections by using the experimental data obtained on operating pipelines. For example, Figure 2 shows the calculated and experimental curves of pressure changes at the input and the outlet of disabled OPS. The results of the pressure change at the input and outlet of disabled OPS -2, at the input and outlet of OPS-1, as well as at 15 and 57 km from OPS-2 flow are summarized in Table 1 and shown in Figure 3. The results of calculations of pressure change in the disabled OPS are given in Figure 3.

Figure 2. Calculated and experimental curves of pressure change in the pipeline

Figure 3. The pressure change curves at the inlet (2) and output (1) OPS (Solid lines experimental, dashed calculated)

References

[1]   | Zaitsev L.A. Regulation of operation modes of trunk pipelines. M .: Nedra, 1982, 136 pp.
[2]   | Musayev V.H. Dynamic processes in complex systems with distributed parameters. LAP LAMBERT Academic Publishing. 2014, 127 pp.

[3]  
Musayev V.H. Development of computational models of transient processes in the systems with distributed parameters with the adjusting system objects. Міжнародний науково-технічний журнал “Інформаційні технології та комп’ютерна інженерія” (International scientific-technical journal “Information Technology and computer engineering”), 2013, No 2, 46-63 pp.

[4]   | Musaev V.H. Discrete method and system-structural analysis for dynamic problem solutions in the trunk pipeline systems // Machine building news M.: 2007, No10, 29-33pp.
[5]   | Akhmadullin K.R. Methods of calculation and regulation of pumping stations of trunk pipelines // Oil industry, 2005, No 3,100-103 pp.
[6]   | Lisafin V.P. Study of the efficiency of stepwise control modes of OPS / Problems of the West Siberian fuel and energetic complex. Theses of the First Union Scientific-technical conference. Ufa: 1982, 103-104 pp.
[7]   | Kadymov Y.B. Transient processes in the systems with distributed parameters. M .: Nauka, 1968, 192 pp.
[8]   | Zhidkova M.A. Pipeline transportation of gas. Kiev, Naukova Dumka, 1973, 142 pp.
[9]   | Charny I.A. Unsteady flow of real fluid in pipes. Moscow: Nedra, 1975, 296 pp.
[10]   | Ditkin V.A., Prudnikov A.P. Handbook of operational calculations. M .: Higher School, 1965, 465 pp.