Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Measurement of Uranium Concentrations, Radium Content and Radon Exhalation Rate in Iraqian Building Materials Samples

Abdalsattar K Hashim*, Laith A. Najam

Department of Physics, College of Science, Kerbala University, Kerbala, Iraq

Abstract: Uranium, radium concentration and radon exhalation rate in twenty one building material samples collected from markets of Iraq were measured using the sealed-can technique based on the CR-39 SSNTDS. The values of effective radium content were found to vary from (0.037 to 4.986) Bq/kg with a mean value of 0.745Bq/kg. The values of mass exhalation rates of radon vary from (0.688 ×10⁻⁸ to46.910×10⁻⁸) Bq/kg.day with a mean value 7.012×10⁻⁸Bq/kg.day, while the surface exhalation rates of radon vary from (0.344×10⁻⁶to23.472×10⁻⁶)Bq/m².day with a mean value of 3.508×10⁻⁶Bq/m².day. Uranium content in these samples has been found, it is varying from 0.074 to 5.055 ppm with a mean value of 0.755ppm. The mean values of radon exhalation rate, radium content and uranium concentration in building material samples of study area were found well below the values of 57.600 mBq/m².h , 370 Bq/kg and 3ppm, respectively.

Keywords: uranium concentration, radium content, radon exhalation rates

Received May 31, 2015; Revised June 15, 2015; Accepted July 01, 2015

Citation: Abdalsattar K Hashim, Laith A. Najam, Measurement of Uranium Concentrations, Radium Content and Radon Exhalation Rate in Iraqian Building Materials Samples. International Journal of Physics, 3 (4). 159-164. January 2015. doi:10.12691/ijp-3-4-4

1. Introduction

Radiation plays an important role in our everyday life as the world is naturally radioactive and each of us is exposed to naturally occurring quantities of radiation. In fact, radioactivity can be in the air webreathe, the soil on which we walk the dwellings in which we live and even within our bodies [16].

The majority of exposure to radiation comes from natural sources that may be terrestrial and extra-terrestrial. Extraterrestrial radiation originates in outer space as primary cosmic rays and reaches the atmosphere. Terrestrial radiation is emitted from radioactive nuclides present in trace amounts throughout the earth's crust including soils and rocks. Such types of radiations are also emitted from those nuclides which get transferred to human beings through food chains or by inhalation and get deposited in their tissues. Human population is always exposed to ionizing radiation from natural sources [19].

The exposure of population to high concentration of alpha radioactivity mainly of radon for a long period leads to pathological effects like there respiratory functional changes and the occurrence of lung cancer [6]. Knowledge of radioactivity present in building materials enables one to assess any possible radiological hazard to mankind by the use of such materials. In the light of the above-mentioned facts, it is therefore, important to assess the radioactivity in common building construction materials. The measured values of radon concentration and radon exhalation rates for building materials are important from the radiation protection point of continue.

The alpha-emitting radioactive substance are harmful to normal tissues of the human body because of their high attenuation power. These alpha particles may cause damage to normal tissues of various organs by their chemical and radioactive toxicity effects [8].

The short lived decay products of radon are responsible for most of the hazards by inhalation. The hazard of radon comes from its radioactive progeny, which trapped in the lung and depositing their alpha-particle energies in the tissue, producing higher ionization density than beta particles or gamma-rays. Lung cancer, skin cancer, and kidney diseases are the health effects attributed to inhalation of radon-decay products [14].

The activity concentrations of radionuclides in the building materials and its components are important in the assessment of population exposures as most individuals spending 80% of their time indoors [5].

Inhalation of radon gas and its daughters will expose the lung tissue to short-lived alpha emitting radionuclides, which will increase the risk of lung cancer. One of the major factors of increasing skin cancer is radon gas, where it is due to the deposition of radon on the skin. Kidney related diseases have also been observed in some people exposed to radon. The reason is that kidney receives the highest dose compared to other body organs, after radon is transferred from the lung to the kidney by blood [10].

The dominant isotope, uranium-238, forms a long series of decay products that include the key radionuclides radium-226, and radon-222. Radon is the decay product of radium in the naturally occurring uranium series. As an inert gas, radon can move freely through the soil from its source to a distance which is determined by many factors such as rate of diffusion, effective permeability of the soil and its own half-life. Being a natural alpha emitter, radon can be detected by an alpha sensitive detector [3].

So, the measurement of alpha emitter's concentration in building material is necessary to investigate the role of alpha emitting in causing various diseases, especially cancer.

The purpose of this work is to study the uranium concentration, radium content and exhalation rates of radon from different building materials commonly used in the structure of Iraqian houses.

2. Materials and Methods

The uranium concentration, effective radium content and exhalation rate of radon were detected by a passive technique of solid state nuclear track detectors using the "sealed can technique" [7,12,17,18,28].

2.1. Sampling and Samples Preparing

Twenty one building material samples were collected from different markets in Iraq. These samples (see Table 1) were dried in oven, milled, crushed, sieved by 2-mm mesh, 48.14 gm of each sample which was placed inside a plastic cylindrical container facing a CR-39 track detector into a diffusion chamber Figure 1. In this technique, the same weight of the building material sample was placed in an emanation chamber, which was then closed for a period of four weeks in order to get equilibrium between radium and radon.

Table 1. Track density, Sample concentration, Radium effective concentration, surface and mass exhalation rates and uranium concentration for building material samples of the same mass

Figure 1. A test tube technique used in the study

CR-39 detectors of thickness (250µm) and area of (1×1cm²) were placed at the closed top end of a plastic cup (diameter 3.5 cm and length 6.5 cm). While the sample- detector distance 3 cm were kept in plastic cans as shown in Figure 1.

2.2. Etching and Scanning Process

The detector records the tracks of -particles emitted by radon gas produced through the -decay of radium contents of the samples. The detectors were exposed for a period of about 76 days. After exposure, the detectors were retrieved and etched for six hours in 6.25N NaOH solution maintained at a temperature of (70 ± 1)°C in a constant temperature water bath to reveal the tracks. The detectors were washed and dried. Subsequently, -tracks were counted using an optical microscope (kruss-mbl 2000) at a magnification of 400x.

3. Theoretical Considerations

3.1. Radon Concentration

The track densities were measured using the following equation [20]:

[picture] | (1)

Where: A=The area of the field of view, Ni is the total number of tracks and n is the total number offields of views.

The track density ρ (in track/cm²) is related to the radon activity concentration CRn (Bq/m³) and the exposure time T by the formula [9]:

[picture] | (2)

Where K is the sensitivity factor of CR-39 plastic track detector, the value of K equal to .

Since the half-life of ²²⁶Ra is 1600 years and that of ²²²Rn is 3.82 days, it is reasonable to assume that an effective equilibrium (about 98%) for radium-radon members of the decay series is reached in about four weeks. Once the radioactive equilibrium is established, one may use the radon alpha analysis for the determination of steady state activity concentration of radium. The activity concentration of radon increase with time T, after the closing of the can, according to the relation [26]:

[picture] | (3)

Where CRa is the effective radium content of the sample and is the decay constant of ²²²Rn. Since a plastic track detector measures the time-integrated value of the above expression, i.e. the total number of alpha disintegrations in unit volume of the can with a sensitivity K during the exposure time T, hence the track density observed is given bythe relation [27]:

[picture] | (4)

where Te denotes, by definition, the effective exposure time given by [4];

[picture] | (5)

The dissolved radon concentration in building material samples was calculated using equation (2) used by various researchers such as [29]:

[picture] | (6)

Where is radon concentration in ambient air (Bq/L), λ is Decay constant for radon (0.1814d⁻¹), h is the distance from the surface of building materials to detector (3.5 cm), T is time of exposure (81day) and L is the depth of the sample (3 cm).

3.2. Effective Radium Content

The effective radium content of the building materials sample can be calculated by the formula [2,17,18,27]:

[picture] | (7)

Where M is the mass of the building materials sample in kg, A is the area of cross-section of the can in m²; h is the distance between the detector and top surface of the building material samples in meter (0.03m).

3.3. Radon Exhalation Rates

The mass exhalation rate of the sample for the release of the radon can be calculated by using the expression [13]:

[picture] | (8)

and are the decay constants of radiuam and radon .

The surface exhalation rate of the sample for release of radon can be calculated by using the expression [13]:

[picture] | (9)

[picture] | (10)

3.4. Uranium Concentration

The concentration of uranium CU of building material samples can be calculated by using the formula [1,22]:

[picture] | (11)

where is the weight of uranium in sample and is the weight of sample.

4. Results and Discussion

In this work, twenty one different samples of building materials were analyzed using closed can technique. Table 1 shows the values of the effective radium content, uranium concentrations, surface and mass exhalation rates.

From these data, we found that the value of effective radium content in collected samples varies from 0.073 to 4.986 Bq /kg with a mean value of 0.745Bq /kg.

Also, the mass exhalation rates has been found to vary from with a mean value of , whilethe surface exhalation rates has been found to vary from , with a mean value of .

The uranium concentration is tabulated in Table 1 for different building material samples in Iraq. It has been shown that thehighest uranium concentration was 5.055 ppm in SA (Sand A), while the lowesturanium concentration was 0.074ppm in GP (Gypsum) with mean value 0.755 ppm. In most of the places, the uranium concentration is lower than the average concentration of uranium in soil of 3 ppm [23,30,31]

Figure 2 and Figure 3 have shown the distribution of radium content and uranium concentration in the different building material samples of Iraq, While Figure 4 and Figure 5 have shown the distribution values of mass and surface exhalation rates of radon for all building material samples, respectively.

Figure 2. Effective radium content for different building material samples(Bq/kg)

Figure 3. Uranium concentrations for different building material samples

The values of mass and surface exhalation rates of radon reported in Table 1 are less than the values reported by many researchers [11,12,15,32]. Radon exhalation rates observed in the present study are well below the world average of 57 600 mBqm⁻² h⁻¹(0.016 Bqm⁻² s⁻¹) and hence do not pose any health hazards to the residents [30,31].

The values of radium content reported in Table 1 less than the values reported by many researchers [24,25]. The values of effective radium content are less than the permissible value of 370 Bq/kg as recommended by Organization for Economic Cooperation and Development [21]. Hence, the result shows that this building materials is safe as for as the health hazards of radium are concerned.

It means that the building material samples from these locations cannot produce dangerous levels of indoor radon when used as building materials.

We found the uranium concentration in the building material samples was low and not significant from a health hazard point of view.

Figure 4. Mass exhalation rate of radon for different building material samples

Figure 5. Surface exhalation rate of radon for different building material samples

5. Conclusions

CR-39 detectors are widely for radon exhalation rate, radium content and uranium concentration measurements in building material samples under different conditions.

The study of radon in bulding material samples showed that , all samples tested had radon exhalation rate well below the world average value of 57.600 mBq/m² h (0.016 Bq/m² s). it is concluded that the studied buliding materials can be used in construction safely from the radioprotection point of view.

The radon exhalation study is important for understanding the relative contribution of the building material to the total radon concentration found in the dwellings. The total values of radon exhalation rate and the radium contcentration are found below the safe limit recommended by Organization for Economic Cooperation and Development.

References

[1]   | Abbas, J. Al- Saadi., Abdal-Sattar, K. Hashim., Fadhil, M. Hussein., (2013), “Measurement Of Radon And Uranium Concentrations In The Dates And Their Seeds Of Different Regions In Karbala Governorate”, Journal Of Babylon University/Pure And Applied Sciences, 21(6), P. 2134-2147.
[2]   | Ali, K., Alsaedi, B., Almayahi, A., Alasadi, A. H., (2013), “Cement Rn And Ra Concentration Measurements In Selected Samples From Different Companies”, Asian Journal Of Natural And Applied Sciences (AJSC), 2 (4), P. 95-100.
[3]   | Archer, V. E., Gillam, J. D., Wagoner, J. K., (1976), “Respiratory Disease Mortality Among Uranium Miners”, Ann. N.Y. Acad. Sci. 271, P. 280-293.
[4]   | Azam, A., Naqvi, AH., Srivastava, DS., (1995), Radium Content And Radon Exhalation Measurement Using LR-115 Type II Plastic Track Detectors: Nuclgeophys, 9 (6), P. 653-657.
[5]   | Badhan, K., Mehra, R., Sonkawade, R. G., Singh, S., (2009), “Use Of Gamma-Ray Spectrometry For Assessment Of Natural Radioactive Dose In Some Samples Of Building Materials”, Asian Journal Of Chemistry 21 (10), P. S207-211.
[6]   | BEIRVI, (1999), (Report Of The Committee On The Biological Effects Of Ionizing Radiation), Natl. Res. Council. Natl. Acad. Press, Washington, DC.
[7]   | Chen, J., Rahman, N. M., And Itiya, I. A., (2010), “Radon Exhalation From Building Materials For Decorative Use”, J. Of Environ. Radioactivity 101, P. 17-22.
[8]   | Fleisch, R. L., Price, P. B., Walker, R.M., (1975), “Nuclear Tracks In Solids: Principle And Application''. University Of California Press, Berkelely, P 210-215.
[9]   | Hamza, V. Z., Mohankumar, M. N., (2009), “Cytogenetic Damage In Human Blood Lymphocytes Exposed In Vitro To Radon”, Mutation Research, 661, Pp. 1-9.
[10]   | Henshaw, D. L., Eatough, J. P., Richardson, R. B., (1990), “Radon As A Causative Factor In Induction Of Myeloid Leukemia And Other Cancers”, Lancet, 335, P. 1008-1012.
[11]   | Ismail, A. M. O., Abumurad, K. M., Kullab, M. K., Al-Batanina, B. A., (1994), “Measurement Of Rn-222 Concentrations In Building Materials Used In Jordan”, Second Arab Conference On The Peaceful Uses Of Atomic Energy, Cairo5-9 Nov. P. 1119-1127.
[12]   | Khan, A. J., Rajendra, Prasad., Tyagi, R. K., (1992), “Measurement Of Radon Exhalation Rate From Some Building Materials”, Nucl. Tracks Radiat. Meas. 20(4) P. 609-610.
[13]   | Khan, M. S., Zubair, M., Verma, D., Naqvi, A. H., Azam, A., Bhardwaj, M. K., (2011a), “The Study Of Indoor Radon In The Urban Dwellings Using Plastic Track Detectors”, Environ Earth Sci 63, P. 279-282.
[14]   | Kumar, S., Chander, S., Yaday, G. S., Shama, A. P., (1986), “Some Environmental Effect Studies On The Response Of (CR-39) Plastic Track Detector”, Nuclear Tracks 12, P. 129-132.
[15]   | Laith, A. Najam., Nada, F. Tawfiq., Rana, Hesham. Mahmood., (2013), “Radon Concentration In Some Building Materials In Iraq Using CR-39 Track Detector”, International Journal Of Physics, 1( 3), P. 73-76.
[16]   | Lees, EM., Menezes, G., Finch, EC., (2004), “Naturalradioactivity In Building Materials In The Republic Ofireland”, Health Physics, 86, P. 378-385.
[17]   | Mahur, A. K., Khan, M. S., Naqvi, A. H., Prasad, R., Azam, A., (2008), “Measurement Of Effective Radium Content Of Sand Samples Collected From Chhatrapur Beach, Orissa, India Using Track Etch Technique”, Radiatmeas, 43: S520-S522 , 4829-9671 And 4829-9671.
[18]   | Mahur, A. K., Kumar, R., Sengupta, D., Prasad, R., (2008), “Estimation Of Radonexhalation Rate, Natural Radioactivity And Radiation Doses In Fly Ash Samples From Durgapur Thermal Power Plant, Westbengal, India”, Journal Of Environmental Radioactivity, 99, P. 1289-1293.
[19]   | Namibi, K. S. V., Bapat, V. N., David, M., Sundram, V. K., Sunta, C. M., Soman, S. D., (1986), Internal Report: Health Physics Division, B.A.R.C, Bombay.

[20]  
Nisar, Ahmad., Mohamad, Suhaimijaafar., Sohail, Aziz. Khan., Tabassum, Nasir., Sajjad, Ahmad., Muhammad, Rahim., (2014), “Measurement Of Radon Exhalation Rate, Radium Activity And Annual Effective Dose From Bricks And Cement Samples ollected From Dera Ismail Khan”, American Journal Of Applied Science 11 (2) P. 240-247.

[21]   | OECD, (1979), Exposure To Radiation From The Natural Radioactivity In Building Materials. Report By A Group Of Experts Of The OECD, Nuclear Energy Agency, Paris, France.
[22]   | Rasheed, M. Yousuf., Kamal, O. Abullah., (2013), “Measurement Of Uranium And Radon Concentrations In Resources Of Water From Sulaimany Governorate -Kurdistan Region-Iraq”, ARPN Journal Of Science And Technology, 3( 6), P.632-638.
[23]   | Robe, M. C., Labed, V., (1995), Explaining The Variation In Soil Radon Concentrations: A Study Of Influence Of Some Intrinsic Properties Of A Rock Matrix On The Radon Emission Factor. In: C. Dubois (Ed.), Gas Geochemistry, 16 (Suppl.), Environ. Geochem. Health. Science Reviews, Northwood, P.535-542.
[24]   | Singh, S., Kumar, A., Singh, B., (2002), “Radon Level In Dwellings And Its Correlation With Uranium And Radium Content In Some Areas Of Himachal Pradesh, India”, Environment International, 28, P. 97-101.
[25]   | Sharma, D. K., Kumar, A., Kumar, M., Singh, S., (2003), “Study Of Uranium, Radium And Radon Exhalation Rate In Soil Samples From Some Areas Of Kangra District, Himachal Pradesh, India Using Solid-State Nuclear Track Detectors”, Radiatmeas, 36, P. 363-366.
[26]   | Shakir, Khan. M., Srivastava, D. S., Ameer, Azam., (2012), “Study Of Radium Content And Radon Exhalation Rates In Soil Samples Of Northern India”, Environmental Earth Sciences, 67(5), P. 1363-1371.
[27]   | Shakir, Khan. M., Naqvi, A. H., Azam, A., Srivastava, D.S., (2011), “Radium And Radon Exhalation Studies Of Soil”, Iran. J. Radiat. Res., 8 (4), P. 207-210.
[28]   | Sonkawade, R. G., Kant, K., Muralithar, S., Kumar, R., Ramola, R. C., (2008), “Natural Radioactivity In Common Buildingconstruction And Radiation Shieldingmaterials”, Atmospheric Environment, 42, P. 2254-2259.
[29]   | Somogi, G., Hafez, A., Hunyadi, I., Toth- Szilagyi, M., (1986), “Measurement Of Exhalation And Diffusion Parametersof Radon In Solids By Plastic Track Detectors”, Nucl. Track Radiat. Meas. 12(1-6), P. 701-704.
[30]   | UNSCEAR, (2000), Source And Effects Of Ionizing Radiation. United Nations, New York.
[31]   | UNSCEAR, (2000), Report Of The United Nations Scientific Committee On The Effects Of Atomic Radiation To The General Assembly. ANNEX B Exposures From Natural Radiation Sources.
[32]   | Zikovsky, L., (1992), “Determination Of Radon Exhalation Rates From Canadian Building Materials With An Internal Proportional Counter”, Nucl. Tracks Radiat. Meas., 3, P. 525-527.