Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Successful Endodontic Management Using Er,Cr:YSGG Laser Disinfection of Root Canal in a Case of Large Periapical Pathology

Dr. Ambica Khetarpal, Dr.Ramanathan Ravi, Dr. Sarika Chaudhary, Dr. Sangeeta Talwar, Dr Mahesh Verma, Dr. Ambica Kathuria*

Department of Conservative Dentistry and Endodontics, Maulana Azad Institute of Dental Sciences, Bahadur Shah Zafar Marg, New Delhi, Delhi, India

Abstract: Total elimination of bacteria from infected root canal systems remains the most important objective of endodontic therapy. Biomechanical instrumentation of the root canal system has been suggested to achieve this task. However, because of the complexity of the root canal system, it has been shown that the complete elimination of debris and achievement of a sterile root canal system is still an ongoing challenge. The task of cleaning and disinfecting a root canal system which contains microorganisms gathered in a biofilm is very difficult; certain bacterial species become more virulent when harbored in biofilm, demonstrating stronger pathogenic potential and increased resistance to antimicrobial agents since biofilm has the ability to prevent the entry and action of such agents. The use of lasers in the field of endodontology represents an innovative approach to match these requirements. In general, dental lasers provide greater accessibility of formerly unreachable parts of the tubular network, due to their better penetration into dentinal tissues. The ability of lasers to remove smear layer and debris from the root canal wall and to open up the orifices of dentinal tubules can be exploited for disinfection of the root canal systems. This article describes the successful management of a case of lower anteriors with large periapical pathology. Er,Cr:YSGG laser was used as an adjunct to conventional root canal preparation that resulted in remarkable and faster healing of the periradicular lesion in lower anteriors.

Keywords: endodontics, root canal, Er,Cr:YSGG laser, disinfection, healing, anterior

Received September 05, 2013; Revised December 07, 2013; Accepted December 15, 2013

Citation: Dr. Ambica Khetarpal, Dr.Ramanathan Ravi, Dr. Sarika Chaudhary, Dr. Sangeeta Talwar, Dr Mahesh Verma, Dr. Ambica Kathuria, Successful Endodontic Management Using Er,Cr:YSGG Laser Disinfection of Root Canal in a Case of Large Periapical Pathology. International Journal of Dental Sciences and Research, 1 (3). 63-66. January 2013. doi:10.12691/ijdsr-1-3-6

1. Introduction

One of the most critical and fundamental stages of endodontic therapy is the root canal disinfection in its three-dimensional network of dentinal tubules. It is generally accepted that microorganisms tend to remain in the root canal even after proper preparation and are responsible for flare-ups, after the completion of the endodontic therapy [1]. The complicated root canal system has accessory features, microbes can survive within the root canals, dentinal tubules, accessory canals, canal ramifications, apical deltas, and fins, once the tooth become infected [2]. These microbial factors can lead to an endodontic failure. To prevent this, effective means of disinfection of root canals are required.

Disinfection and preparation of the root canal system effectively to allow the host response to be turn toward the healing of the periapical tissues [3]. Antibacterial rinsing solutions, like NaOCl, for example, can, on the other hand, only penetrate into the dentin to a depth of 100 µm [4]. Irrigants such as sodium hypochlorite and chlorhexidine also have demonstrated useful antimicrobial effects; however, infection of the root canal and adjacent dentin may persist owing to the inability of these agents to reach all the infecting microorganisms [5].

During the last years, laser irradiation has been additionally introduced in root canal preparation, trying to gain acceptance for its disinfection ability in comparison with the common mechanical instrumentation and irrigation procedures. The use of lasers in disinfection of the root canal has been demonstrated by many studies [6]. Lasers have bactericidal effect and can be used effectively for disinfection of the root canal system following biomechanical instrumentation. Many studies examined the effectiveness of Nd: YAG, diode, Er,Cr:YSGG and Er:YAG laser, when used in different wavelengths, independently, or in addition with various solutions in the bacterial elimination inside the root canals.

Periapical lesions of endodontic origin may develop asymptomatically and become large. In cases of large periapical lesions, non-surgical approach should be attempted first as many newer endodontic disinfection and instrumentation modalities are available to eradicate the existing microflora of infected root canal systems. Many studies confirm that such lesions can respond favourably to non-surgical treatment [7].

Since the introduction of lasers in endodontics during the early 1970s, there have been several studies regarding the application of this technology as an aid to improve not only the cleansing and disinfection [8] but also the sealing of the root canal system [9]. Treatment of the radicular dentinal walls with the laser has been shown to promote cleaner surfaces when compared with a combination of sodium hypochlorite and ethylenediaminetetraacetic acid (EDTA), which might result in better adaptation of the filling material to the root canal walls [10]. Thus, the application of the Cr, Er:YSGG laser has been shown to provide superior cleanliness of the canals when compared with instrumentation alone [11]. A study by Schoop et al [12] illustrated the bactericidal potential of the Er,Cr:YSGG laser applied to root dentine samples. In this case report, laser therapy was used as an adjunct to endodontic irrigants and biomechanical preparation for complete disinfection of root canal system. This could achieve adequate healing even in the presence of large periapical lesion. This case report highlights the importance of Er,Cr:YSGG laser disinfection as nonsurgical management for the resolution of the large periapical lesion present in mandibular anterior teeth.

2. Case Report

A 30-year-old female patient visited the dental office with pain and swelling in the lower anterior region Figure 1. On examination there was a soft tissue swelling in relation to 31, 41. Patient had a history of traumatic injury to the same region 1 year back. She experienced intermittent pain and swelling in the lower anterior region since then. Clinical examination revealed an intraoral abscess in relation to mandibular central incisors. There was severe anterior deep bite with gross attrition of mandibular incisors. Electric (Parkell Inc, Edgewood, NY) pulp test was negative for both mandibular central incisors and right lateral incisor. An intraoral periapical radiograph Figure 1 revealed a large radiolucent lesion in relation to both central incisors and right lateral incisor. Based on clinical and radiographical ﬁndings, a diagnosis of acute exacerbation of chronic apical abscess in relation to both the mandibular central incisors and pulp necrosis in relation to both the mandibular lateral incisors were made. Treatment was planned as an emergency access opening in both the central incisors followed by root canal treatment in all four incisors. An emergency access cavity was prepared in both the central incisors with safety tip carbide bur. As soon as the canals were explored, copious, mucopurulent ﬂuid was drained through the root canals. Below protocol was followed for the disinfection of root canal:

1. Access cavity was prepared in the lower anterior teeth under rubber dam isolation.

2. Working length was estimated using apex locator and was conﬁrmed using radiography Figure 2. Biomechanical preparation was done with standardized technique using hand K ﬁles (Mani Inc., Tochigi Japan). Cleaning and shaping was done up to size 35 file, irrigation was done copiously and intermittently with 5% sodium hypochlorite and normal saline.

3. C100-Z3-25 mm endo tips in a sterilized laser handpiece were used to disinfect the root canals. Disinfection phase (0.75 W; 20 Hz; 10 % air; 0 % water) of Er,Cr:YSGG laser was employed for the same. We moved the laser tip by hand up and down in the canal in a cervical-apical and apical-cervical direction at a rate of 1 mm per second (that is, 10 seconds to traverse the full 5mm length of the canal in both directions). During this procedure, we kept the tip as close to the canal wall as possible.

Figure 1. preoperative radiograph

Figure 2. working length radiograph

After laser radiation, canals were dried and obturation was done using lateral compaction of gutta-purcha (Densply Maillefer) and AH Plus resin sealer (Maillefer Densply, Konstanz, Germany). During the ﬁrst follow up after one week resolution of the acute symptoms were noticed. A ﬁnal radiograph was taken to determine the quality of obturation Figure 3. Remarkable healing was observed at the 6 month recall visit radiograph Figure 4.

3. Discussion

The long-term success of root canal treatment attributes to an effective elimination of bacteria that cause an inflammation in the root canal and in the dentin tubules. The contamination of root canals with bacteria and its subsequent propagation in remnants of necrotic soft tissue are considered one of the main reasons for failure in endodontic treatment [13]. The success rate of teeth that give a negative culture for bacterial growth at the time of a root canal filling is higher than teeth that are culture positive [14]. In addition to mechanical instrumentation of the root canal system, irrigating the canal with disinfectant chemicals has been proposed to enhance the removal of vital and non-vital tissue remnants, tissue breakdown products, and bacteria and bacterial by products [15]. Sodium hypochlorite [16] and calcium hydroxide [17] have a limited ability to penetrate and disinfect the root canal system (approximately 130 µm penetration). Chlorhexidine and iodine-potassium-iodine are more effective in dentinal tubules than pure Ca(OH)2 in a water vehicle, but complete disinfection has not been demonstrated [18].

Figure 3. postoperative radiograph

Figure 4. healing evident after 6 months

It has been shown that bacteria colonize the periluminal dentine up to a depth of 1,100μm [19]. Berutti et al [20] stated that chemical disinfectants penetrate only 100μm into the dentine. In addition, curved root canals or lateral canals can be a hinderance in the endodontic treatment. The use of lasers helps to combat this problem. The high penetration efficacy of the laser light in the dentinal tissue seems to be the most appropriate solution for the appropriate bactericidal effect of different laser wavelengths. The high penetration depth of the laser beam in the dentinal tissue seems to be the best explanation of the satisfying bactericidal effect of different laser wavelengths. Since most currently used intra-canal medicaments have a limited anti-bacterial spectrum and a limited ability to diffuse into the dentinal tubules, it was suggested that newer treatment strategies designed to eliminate microorganisms from the root canal system should be considered. These, must include agents that can penetrate the dentinal tubules and destroy the microorganisms, located in an area beyond the host defense mechanisms, where they cannot be reached by systematically administered antibacterial agents [21]. It has been proved in numerous studies that an emission of laser light directly in the root canal does have such a bactericidal effect. The laser radiation may be transmitted through quartz optical fibers, a property that could facilitate introducing laser light around canal curvatures and irregularities [22]. Vaarkamp and colleagues [23] and Odor and colleagues [21] provide a possible explanation for this kind of light propagation; they describe the ability of enamel prisms and dentin tubules to act as optical fibers. The monochromatic, coherent, and directional characteristics of laser light, and the fact that direct contact between target and fiber tip is not required, raise the possibility that emission of laser energy could provide a means to disinfect areas deep within the dentin [24].

Perin et al [25] evaluated the antimicrobial effect of Er:YAG laser irradiation versus 1% NaOCl irrigation for root canal disinfection. The study found that both methods were effective to working length against all microorganisms. Wang et al [26] evaluated the bactericidal effect of the Er,Cr:YSGG laser and the Nd: YAG laser in straight root canals that were inoculated with E faecalis for 3 weeks. After laser irradiation, the number of bacteria in each root canal was determined. The study found that the Er,Cr:YSGG laser irradiation resulted in a reduction in bacteria of 77% after irradiation at 1 W, and a reduction of 96% after irradiation at 1.5 W, but there was no significant difference. Schoop et al [27] found that the disinfecting effect of the chromium: yttrium-scandium-gallium-garnet Er,Cr:YSGG (2,780 nm) laser in root dentin samples was dependent on the output power but was not specific for the bacterial species investigated. Gordon et al [28] investigated the ability of an Er,Cr:YSGG laser with radial emitting tips to disinfect dentin infected with Enterococcus faecalis. The study found that bacterial recovery decreased when laser irradiation duration or power increased. Schoop et al [29] evaluated the use of the Er,Cr:YSGG laser with radial-firing tips in terms of bacteriology, morphology, and temperature measurements in root canals. The canals were inoculated with 2 test strains of bacteria and were irradiated with power settings of 0.6 W and 0.9 W and a repetition rate of 20 Hz. The bacteriological evaluation revealed a decisive disinfectant effect. It was also observed that the smear layer was homogeneously removed from the root canal walls, and temperature elevation at the root surface during irradiation was moderate. The study concluded that in conjunction with radial-firing tips, the Er,Cr:YSGG laser is a suitable device for eliminating bacteria in root canals and for the removal of smear layer.

Technique for the disinfection phase is the same as the cleaning phase but with different laser settings in the dry mode. The penetration of the laser into the root dentin is governed by several factors. At the wavelength of the Er,Cr:YSGG laser (2.78 µm), there is absorption by dentin owing to the presence of hydroxide and interstitial water (dentin matrix and intratubular). On the basis of the fact that each laser pulse is composed of approximately 150 micropulses and each micropulse is responsible for the penetration of this energy of about 3 µm into water, depending on fluence, it is possible to achieve expansion of intratubular water and the collapse of water vapor as deep as 1,000 µm or more. This effect, known as “micropulse-induced sequential absorption,” with expansion and collapse of water vapor, is capable of producing acoustic waves strong enough to disrupt intratubular bacteria.

In this case, significant bactericidal effect and disinfection of the root canals were achieved using Er,Cr:YSGG laser, that resulted in substantial healing in a short period of time. The large periapical lesion present was hence dealt with nonsurgical management, which was otherwise deemed for surgical intervention. The laser energy emitted from the Er,Cr:YSGG laser is highly absorbed by water in tissue and micro-organisms, resulting in instantaneous photo-ablation. In addition, the resulting micro-pulse expansion and collapse of intratubular water produce acoustic waves sufficiently strong to disrupt and kill intratubular bacteria. This effect is most effective in a dry mode, as the laser energy is not absorbed by the water spray and can exert its full effect on the bacteria. This was confirmed by Gordon et al [28], who achieved a 99.7% kill rate for E. faecalis in the dry mode.

References

[1]   | Gomes B, Jacinto R, Pinheiro E, Sousa E, Zaia A, Ferraz C et al. Porphyromonas gingivalis, Porphyromonas endodontalis, Prevotella intermedia and Prevotella nigrescens in endodontic lesions detected by culture and by PCR. Oral Microbiol Immunol 2005; 20(4):211-215.
[2]   | Haapasalo M, Endal U, Zandi H, Coli JM. Eradication of endodontic infection by instrumentation and irrigation solutions. Endodont Topics 2005; 10: 77-102.
[3]   | Clegg MS, Vertucci FJ, Walker C, Belanger M, Britto LR. The effect of exposure to irrigant solutions on apical dentin biofilms in vitro. J Endod 2006; 32: 434-37.
[4]   | Orstavik D, Haapasalo M. Disinfection by endodontic irrigants and dressings of experimentally infected dentinal tubules. Endod Dent Traumatol 1990; 6, 124-149.
[5]   | White RR, Hays GL, Janer LR. Residual antimicrobial activity after canal irrigation with chlorhexidine. J Endod 1997; 23(4): 229-31.
[6]   | Gutknecht N, Franzen R, Schippers M, Lampert F. Bactericidal effect of a 980-nm diode laser in the root canal wall dentin of bovine teeth. J Clin Laser Med Surg 2004; 22: 9-13.
[7]   | Oztan MD. Endodontic treatment of teeth associated with a large periapical lesion. Int Endod J. 2002; 35(1):73-8.
[8]   | Altundasar E, Ozcelik B, Cehreli ZC, Matsumoto K. Ultramorphological and histochemical changes after Er,Cr:YSGG laser irradiation and two different irrigation regimes. J Endod 2006; 32:465-8.
[9]   | Sousa-Neto MD, Silva Coelho FI, Marchesan MA, Alfredo E, Silva-Sousa YT. Ex vivo study of the adhesion of an epoxy based sealer to human dentine submitted to irradiation with Er:YAG and Nd:YAG lasers. Int Endod J 2005; 38:866-70.
[10]   | WangX, SunY, KimuraY, KinoshitaJ, IshizakiNT, MatsumotoK. Effects of diode laser irradiation on smear layer removal from root canal walls and apical leakage after obturation. Photomed Laser Surg 2005; 23: 575-81.
[11]   | Yamazaki R, Goya C, Yu DG, Kimura Y, Matsumoto K. Effects of erbium, chromium: YSGG laser irradiation on root canal walls: a scanning electron microscopic and thermographic study. J Endod 2001; 27:9-12.
[12]   | Schoop U, Kluger W, Moritz A, Nedjelik N, Georgopoulos A, Sperr W. Bactericidal effect of different laser systems in the deep layers of dentin. Lasers Surg Med 2004; 35:111-116.
[13]   | Gomes BP, Lilley JD, Drucker DB. Clinical significance of dental root canal microflora. J Dent 1996; 24:47-55.
[14]   | Sjogren U, Figdor D, Persson S, Sundqvist G. Influence of infection at the time of root filling on the outcome of endodontic treatment of teeth with apical periodontitis. Int Endod J 1997; 30:297-306.
[15]   | Siqueira Jr JF, Rocas IN, Favieri A, Lima, KC. Chemomechanical reduction of the bacterial population in the root canal after instrumentation and irrigation with 1%, 2.5%, and 5.25% sodium hypochlorite. J Endod 2000; 26:331-4.
[16]   | Berutti E, Marini R, Angerreti A. Penetration ability of different irrigants into dentinal tubules. J Endod 1997; 23:725-727.
[17]   | Haapasalo M, Orstavik D. In vitro infection and disinfection of dentinal tubules. J Dent Res 1987; 66:1375-1379.
[18]   | Vahdaty A, Pitt Ford TR, Wilson RF. Efficacy of chlorhexidine in disinfecting dentinal tubules in vitro. Endod Dent Traumatol 1993; 9:243-248.
[19]   | Kouchi Y, Ninomiya J, Yasuda H, Fukui K, Moriyama T, Okamoto H. Location of streptococcus mutans in the dentinal tubules of open infected root canals. J Dent Res 1980; 59:2038-46.
[20]   | Berutti E, Marini R, Angeretti A. Penetration ability of different irrigants into dentinal tubules. J Endod 1997; 23:725-727.
[21]   | Odor TM, Chandler NP, Watson TF, Ford TR, McDonald F. Laser light transmission in teeth: a study of the patterns in different species. Int Endod J 1999; 32:296-302.
[22]   | Stabholz A, Sahar-Helft S, Moshonov J. The use of lasers for cleaning and disinfecting of the root canal system. Alpha Omegan 2008; 101(4):195-201.
[23]   | Vaarkamp J, ten Bosch JJ, Verdonschot EH. Propagation of light through human dental enamel and dentine. Caries Res 1995; 29:8-13.
[24]   | Bergmans L, Moisiadis P, Teughels W, et al. Bactericidal effect of Nd: YAG laser irradiation on some endodontic pathogens ex vivo. Int Endod J 2006; 39:547-557.
[25]   | Perin FM, França SC, Silva-Sousa YT, et al. Evaluation of the antimicrobial effect of Er:YAG laser irradiation versus 1% sodium hypochlorite irrigation for root canal disinfection. Aust Endod J 2004; 30:20-22.
[26]   | Wang QQ, Zhang CF, Yin, XZ. Evaluation of the bactericidal effect of Er,Cr:YSGG and Nd: YAG lasers in experimentally infected root canals. J Endod 2007; 33:830-832.
[27]   | Schoop U, Goharkhay K, Klimscha J, et al. The use of the erbium, chromium:yttrium-scandium-gallium-garnet laser in endodontic treatment: the results of an in vitro study. J Am Dent Assoc 2007; 138:949-955.
[28]   | Gordon W, Atabakhsh VA, Meza F, et al. The antimicrobial efficacy of the erbium, chromium:yttrium-scandium-galliumgarnet laser with radial emitting tips on root canal dentin walls infected with Enterococcus faecalis. J Am Dent Assoc 2007; 138:992-1002.
[29]   | Schoop U, Barylyak A, Goharkhay K, et al. The impact of an erbium, chromium:yttrium-scandium-gallium-garnet laser with radial-firing tips on endodontic treatment. Lasers Med Sci 2009; 24:59-65.