Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Label_Title

Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Label_Title

Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Label_Title

Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Label_Title

Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Label_Title

Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Assessment of Metal Pollution in Drinking Water in Villages Near the Mine of Ity (Côte d’Ivoire)

HE Linda Isabelle*, DAKOUO Semite Jokebed, GBAGBO Tchapé, KPAIBE Sawa André, AMIN N’cho Christophe

Département des Sciences Analytiques et Santé Publique, UFR des Sciences Pharmaceutiques, Université Félix Houphouët-Boigny, Côte d’Ivoire

Abstract: Zouan-Hounien is a town in western Côte d'Ivoire, West Africa, and serves as the administrative seat of the Tonkpi region. The following villages are located within a 10 km radius of the town: Biétouo, Floleu, Krozialeu, Meantouo, Ouyatouo, Trogleu, and Ity a hamlet of approximately 1,600 inhabitants that is home to the Ity gold mine. Following a technical incident at the mine, a study was initiated to assess the potential impact of the incident on the physicochemical and bacteriological quality of drinking water in the aforementioned villages. Thirty-six water samples collected from wells, and boreholes equipped with hand pumps were analyzed using AFNOR methods. The results revealed a marked and multifaceted deterioration in the quality of water from hand-operated pumps and traditional wells. The physico-chemical parameters showed significant acidification (pH 4.1–6.5), high turbidity (up to 89 UNT), and high levels of ammonium and organic matter, reflecting a massive intake of particles and contaminants. The microbiological analyses revealed severe fecal contamination, with loads of total coliforms, E. coli, and Enterococcus faecalis well above the standards, making the water unfit for consumption. Heavy metal concentrations, particularly for lead (up to 95.54 μg/L) and cadmium (up to 45.4 μg/L), were well above international potability standards, indicating acute contamination compatible with a mine tailings release or an acid mine drainage event. The presence of cyanides at significant levels, although below regulatory limits, confirmed the direct influence of cyaniding activities. All the results highlight a mixed contamination of mining and environmental origin, affecting more strongly the wells than the manual pumps. These observations highlight the need for urgent health risk management, water treatment and environmental remediation measures, as well as enhanced analytical monitoring to prevent long-term impacts on riparian populations.

Keywords: drinking water potability,mining pollution,heavy metals

Received July 27, 2026; Revised August 29, 2026; Accepted September 06, 2026

Citation: HE Linda Isabelle, DAKOUO Semite Jokebed, GBAGBO Tchapé, KPAIBE Sawa André, AMIN N’cho Christophe, Assessment of Metal Pollution in Drinking Water in Villages Near the Mine of Ity (Côte d’Ivoire). American Journal of Water Resources, 14 (3). 63-67. January 2026. doi:10.12691/ajwr-14-3-2

1. Introduction

The water supply to rural communities relies heavily on groundwater from wells and hand-pumped pumps, especially where safe alternatives are limited [1,2,3].

In mining areas, this resource becomes particularly vulnerable, as extraction activities, discharges, runoff, and infiltration can simultaneously alter the physicochemical, metallic, and microbiological parameters of water [4,5,6].

Several studies also show that poorly protected structures, particularly hand-dug wells, are more exposed to contaminant transfers and may have an unsafe quality for consumption [3,4].

Microbiological contamination is a second major signal in these contexts. Thermotolerant or total coliforms regularly exceed the zero norm in rural catchments, and several studies in mining areas describe a coexistence between bacterial pollution and metal contamination, with a risk often more marked for children [1,7].

This microbiological vulnerability, frequently observed in rural areas and further accentuated in the mining context, highlights the importance of carefully examining water sources used by populations. It falls within a particular territorial framework: that of Zouan-Hounien, a locality in western Côte d'Ivoire comprising several villages including Biétouo, Floleu, Krozialeu, Méantouo, Ouyatouo, Trogleu and Ity, the latter being home to the industrial gold mine of Ity. In these communities dependent on wells and boreholes for their drinking water supply, the technical incident at the mine has legitimately raised concerns about a possible deterioration of these essential resources, in a context where gold-bearing activities can rapidly modify the physico‐chemical and microbiological balance of waters.

The objective of this study is to assess the impact of the incident on the quality of drinking water by analyzing the physico-chemical and microbiological parameters of the main water sources, to detect any contaminants related to gold-mining activities and assess the health risks in order to guide environmental protection and monitoring measures.

2. Materials and Methods

2.1. Equipment and Supplies

The analyses were carried out using a set of analytical quality laboratory equipment. The main device included an Agilent 55 AA atomic absorption spectrometer associated with an Agilent VGA 77 hydride generator. The physico-chemical parameters were measured using an Hanna® probe pH meter (United Kingdom), a WAGTECH 7100 Se® photometer (United Kingdom), a TURB 430 IR® turbidity meter (France), an HACH HQ 11d® pH meter (France) and an HACH HQ 14d® conductivity meter (France).

The filtration operations were carried out using a SARTORIUS Goettingen® (Germany) filtration ramp, while the drying and conditioning steps of the samples were carried out in a LABNET® oven (United States).

All the glassware used was of analytical quality, ensuring measurement reliability and accuracy.

2.2. Reagents

All reagents used were of analytical quality. The solutions and chemicals included distilled water, concentrated nitric acid (65%), concentrated hydrochloric acid (37%) and stock standard solutions of Hg, Pb, Co, As and Cd at a concentration of 1000 mg/L.

For the determination of nitrates, nitrites and ammonium, Nitratest, Nitricol, Ammonia No. 1 and Ammonia No. 2 tablets, as well as zinc powder were used; these were Wagtech® reagents (United Kingdom).

The microbiological analyses were carried out using Bio Rad® culture media (France), notably Rapid E. coli 2 agar for coliform detection, Bile Esculine Azide agar (BEA) for the isolation of Enterococcus faecalis, and cetrimide agar for the culture of Pseudomonas aeruginosa.

2.3. Sampling

A total of 36 water samples were collected in villages around the Ity mining area: 30 wells and 6 hand -operated pumps.

-Physico-chemical and microbiological analyses

For each site, two types of samples were taken:

• a 1,000 mL Pyrex® glass bottle, filled to the brim, intended for physico-chemical analyses;

• a 500 mL Pyrex® glass vial, filled three-quarters full, intended for microbiological analysis.

The samples were taken in accordance with AFNOR standard FD T90 520 (2005), which defines the conditions for sampling, conservation, and transport of water. The vials were immediately placed in a cooler, protected from light, and transported under cold chain (4–8°C) using ice blocks to limit microbial growth.

Upon arrival at the laboratory, the samples were either analyzed directly or stored in a refrigerator (4–8°C) until processing.

-Metal analyses

For the determination of metals, samples were collected in 1 L polyethylene containers. In situ stabilization was carried out by addition of 10 mL of concentrated nitric acid (HNO 3), to prevent any physico-chemical modification before analysis.

2.4. Methods

The physico-chemical parameters (pH, electrical conductivity, turbidity) were determined according to the AFNOR standardized methods [8,9,10,11]. Concentrations of nitrates, nitrites, ammonium, chlorides, manganese, aluminum, fluorides, organic matter and iron were measured by photometry. For each analysis, 10 mL of sample was introduced into a tube and then a specific reagent pellet was added. After complete dissolution of the reagent by stirring with a glass rod, the tube was placed in the photometer and the program corresponding to the studied parameter was selected. The absorbance was measured at 520 nm.

The microbiological analysis focused on total coliforms, Escherichia coli, Enterococcus faecalis and Pseudomonas aeruginosa. The samples were membrane filtered, then the membranes were deposited on suitable culture media. After incubation for 18-24 h, characteristic colonies were enumerated according to reference protocols [11,12].

The data obtained were subjected to statistical analysis using methods described in the literature [12].

The metal parameters total mercury, arsenic, lead, cadmium, cobalt, and total cyanide were quantified by atomic absorption spectrometry. The results were compared to current drinking water quality standards.

3. Results

Table 1. Samples water of hand-operated pumps from villages near the mine of Ity

Table 1 and Table 2 show the exact location of drinking water collection points in villages located near the Ity mine, as well as the type of source associated with each site.

Table 2. Samples water of wells from villages near the mine of Ity

Table 3 lists the minimum and maximum values of physicochemical and bacteriological parameters for drinking water in the villages located near the Ity mine.

Table 3. Results of physicochemical and bacteriological parameters for drinking water from villages near the mine of Ity

From a physicochemical point of view, the waters showed high turbidity, particularly in the wells. Temperatures were consistently above 25°C. The acidic pH was more pronounced in the wells (4.1–5.4). Several nitrogen, nitrite, and ammonium parameters exceeded the required standards. Iron and fluoride levels also exceeded the recommended limits.

Total coliforms, Escherichia coli and Enterococcus faecalis reached very high levels. The absence of Pseudomonas aeruginosa was the only compliant parameter.

Mercury and arsenic were generally compliant with potability standards, with very low concentrations of mercury (<0.3 μg/L) and arsenic levels well below the 10 μg/L limit in all sources. By contrast, lead and cadmium showed significant exceedances, reaching 80.7 μg/L and 35.5 μg/L in pumps, and up to 95.54 μg/L and 45.4 μg/L in wells, respectively. Cobalt remained low overall, well below the 2 mg/L standard. Total cyanides, although below the 50 μg/L limit, had significant values (6–43 μg/L).

Table 4. Results of heavy metal concentrations in drinking water from for drinking water from villages near the mine of ity

4. Discussion

The analysis of physicochemical and microbiological parameters of drinking water from villages located near the Ity mine reveals a marked deterioration in their quality, particularly in traditional wells. The water has high turbidity, which makes it less drinkable because it reflects suspended particles from sediments, runoff, organic matter or metal hydroxides [13,14].

Indeed, highly turbid water can harbour germs or report other contaminants, which increases the health risk [15,16,17].

Several studies report exceedances of drinking water thresholds, for example 6.40 FTU in mining drainage areas, up to 9.99 NTU in some boreholes, and 61.54% of samples above the WHO limit in Ethiopia [18,19,20].

Regarding the pH, it should be noted that it affects potability because an abnormal pH alters the taste, corrosiveness, and chemical behavior of contaminants [16,21].

In a mining context, a pH of 7 often indicates acidity related to acid mine drainage [19].

Acidic waters were observed with averages around 5.34 to 5.48 in Chad, while other sites remained within the 6.5–8.0 interval compatible with drinking water [16,22].

The pH also controls the solubility of metals; several analyses show that its relationship with water quality changes when metals and suspended solids are taken into account [21,23].

The high value of total coliforms with the presence of E. coli and Enterococcus faecalis in the wells; indicated fecal contamination and a risk of pathogens [24].

In groundwater, 93.71% of samples exceeded the standard for total coliforms and 47.17% for E. coli [25].

Even when the chemical parameters comply with standards, contamination by E. coli and faecal coliforms may persist [26].

Hand-operated pumps water is not automatically safe; in Mali, microbial contamination during the rainy season has made this water unsuitable without treatment [27].

Lead and especially cadmium levels have exceeded the standards very sharply in both pumps and wells. This result is consistent with recent mining studies showing that Pb, Cd, As, and Hg are the metal contaminants most often linked to drinking water health risks [4,28,29].

Values of Pb up to 95.54 μg/L and Cd up to 45.4 μg/L suggested a severe contamination. In mining areas, metal concentrations are often higher in groundwater near active sites, and the contribution of mine drainage to metal loadings may be predominant [4,29].

Some mining areas remain heterogeneous; elsewhere, arsenic has remained below thresholds in most scenarios despite high Fe and Mn [6].

The most constant exceedances concern iron and manganese in several mining contexts [31,32,33].

Lead and cadmium also regularly exceed drinking water limits in some mining areas, sometimes with toxic levels or measurable health risks [19,34,35].

Total cyanide is consistent but their significant presence is consistent with gold-bearing activity (cyanidation).

Indeed, gold cyanidation is a well-established source of cyanide in effluents, tailings, and water from gold mining sites [36,37,38,39].

5. Conclusion

The analyses carried out after the mining incident show a significant deterioration in water quality in the villages near Zouan Hounien. Well and borehole water shows marked acidification, high turbidity, as well as significant fecal pollution, making it unfit for consumption. High concentrations of lead, cadmium and cyanides indicate a direct influence of mining activities, probably related to a leaching of residues or an acidic mine drainage. These results highlight a mixed contamination, more pronounced in the wells, and require urgent measures of health protection, water treatment and enhanced environmental monitoring to protect riparian populations.

References

[1]  
Lapworth, D., MacDonald, A., Kebede, S., Owor, M., Chavula, G., Fallas, H., Wilson, P., Ward, J., Lark, M., Okullo, J., Mwathunga, E., Banda, S. T., Gwengweya, G., Nedaw, D., Jumbo, S., Banks, E. W., Cook, P. G. and Casey, V. Drinking water quality from rural handpump-boreholes in Africa. Environmental Research Letters, 15.1-13. May 2020.

[2]   | Seidu, J. and Ewusi, A. Assessment of Groundwater Quality and Health Risk of Heavy Metals: A study from the Tarkwa Mining Area, Ghana. Ghana Mining Journal. 20 (1).1-10.December 2020.
[3]   | Kusi-Afrakoma, Z., Gyamfi, C., Laar, C., Gibrilla, A., Annan, K. K., Asante, O. and Anornu, G. Origin, hydrogeochemical evolution and human health risk assessment of surface and groundwater in the Densu Delta Ramsar site, Ghana. The Science of the total environment, 984, 179694. July 2025.
[4]   | Obasi, P. and Akudinobi, B. Potential health risk and levels of heavy metals in water resources of lead–zinc mining communities of Abakaliki, southeast Nigeria. Applied Water Science, 10, 1-23. July 2020.
[5]   | Xu, M., Zhang, K., Wang, Y., Zhang, B., Mao, K. and Zhang, H. Health Risk Assessments and Microbial Community Analyses of Groundwater from a Heavy Metal-Contaminated Site in Hezhou City, Southwest China. International Journal of Environmental Research and Public Health, 20.1-16. December2022.
[6]   | Wang, J., Zhang, H., Liu, J., Hu, S., Shi, J., Li, X., Song, D. and Niu, X. Distribution characteristics, source identification, and health risk assessment of heavy metals in surface water and groundwater: a case study in mining-affected areas. Frontiers in Water.17.1-15. October 2025.
[7]   | Batool, A., Ikram, J., Rehman, M. F. U. and Naveed, N.Heavy Metals, Microbial Contamination, and Health Risks in Groundwater of Coal Mining Regions: Carcinogenic and Noncarcinogenic Insights.Water Environment Research, 97(11). November 2025.
[8]   | AFNOR. NF T90-008: Water quality – Determination of pH [Internet]. Saint-Denis La Plaine: French Standardization Association; 2001 [cited 2025 May 14].
[9]   | AFNOR. NF EN 27888: Water quality – Determination of electrical conductivity [Internet]. Saint-Denis La Plaine: French Standardization Association; 1994 [cited 2025 May 14].
[10]   | AFNOR. NF EN ISO 7027-1: Water quality – Determination of turbidity – Part 1: Quantitative methods [Internet]. Saint-Denis La Plaine: French Standardization Association; 2016 [cited 2025 May 14].
[11]   | Seki ,T., Yapo, T., Kpaibé ,S., Meless, D. and Amin , N., Caractérisation physicochimique et microbiologique des eaux de puits à usage de boisson à Aboisso (sud-est de la Côte d’Ivoire), Int J Biol Chem Sci.,18(1).311–325,May 2024.
[12]   | Gbagbo, G., Bakayoko, A. and Agbessi, T.,Physicochemical and bacteriological characterisation of domestic drinking water sources in M'pody village (Côte d’Ivoire) during the four seasons of 2020, Int J Water Res Environ Eng, 17(2). 27–35. March 2025.
[13]   | Maw, A., Phyu, K., Aung, M. N., Mar, K. K., Khin, S. O., Khaing, K. K., Thura, A., Thu, A., Zin, P. W., Thin, K. M. and Thant, K. Approach to assessment of heavy metals contamination in drinking water, Mandalay region, Myanmar. IOP Conference Series: Earth and Environmental Science, 496. 2020.
[14]   | Hossain, M. N., Howladar, M. F., Ahammed, S., Haque, M. R., Khan, M. I., Hasan, M., Chowdhury, T. and Hosain, A. Application of multi-indexing approach within a GIS framework to investigate the quality and contamination of ground water in Barisal sadar, Bangladesh. Heliyon, 11(3). February 2025.
[15]   | Bhandari, H. and Sapkota, K. A Comprehensive Assessment of the Quality of Supplied Drinking Water in Galyang Municipality of Syangja, Nepal. Amrit Journal.3(1)1-24.November 2023.
[16]   | Dippong, T. and Resz, M.-A. Chemical Assessment of Drinking Water Quality and Associated Human Health Risk of Heavy Metals in Gutai Mountains, Romania. Toxics, 12.1-16.February 2024.
[17]   | Binibor, P. I., Nwachukwu, N. A., Ndulue, G. U., Ndukwe, D. U., Ngwu, A. O. V. and Usman, O. H. Investigating the effect of storage materials on the quality of potable water. European Journal of Sustainable Development Research, 9(3), 1-13.February 2025.
[18]   | Lewoyehu, M.Evaluation of Drinking Water Quality in Rural Area of Amhara Region, Ethiopia: The Case of Mecha District. Journal of Chemistry, 2021.1-11. June 2021.
[19]   | Sikakwe, G. U., Eyong, G. A. and Ojo, S. A. Geochemical modeling and hydrochemical analysis for water quality determination around mine drainage areas.Water Environment Research, 96(1). October 2023.
[20]   | Khan, S., Kamal, M., Noor, S. and Afzal, S. M. Assessment of heavy metals and its treatment through phytoremediation in groundwater along River Kabul in district Charsadda. Frontiers in Environmental Science.12.July 2024.
[21]   | Saalidong, B. M., Aram, S., Otu, S. and Lartey, P. O. Examining the dynamics of the relationship between water pH and other water quality parameters in ground and surface water systems. PLoS ONE, 17(1). January 2022.
[22]   | Nambatingar, N., Théophile, M.and Mianpeureum, T. Evaluation of Heavy Metals in Drinking Water Resources in the Department of Nyan, Province of Logone Oriental in Chad. American Journal of Applied Chemistry. 9(11) .1-8. January 2021.

[23]  
Zhang, K., Chang, S., Zhang, Q., Bai, Y.-D., Wang, E., Zhang, M., Fu, Q., Wei, L. and Yu, Y. Heavy metals in influent and effluent from 146 drinking water treatment plants across China: Occurrence, explanatory factors, probabilistic health risk, and removal efficiency. Journal of hazardous materials, 450, 131003. May 2023.

[24]   | Volf, G., Čule, I. S., Atanasova, N., Zorko, S. and Ožanić, N.Explaining and Predicting Microbiological Water Quality for Sustainable Management of Drinking Water Treatment Facilities. Sustainability. 17, 6659.1-26. July 2025.
[25]   | Shrestha, S., Bista, S., Byanjankar, N., Shrestha, S., Joshi, D. and Joshi, P. T. Groundwater quality evaluation for drinking purpose using water quality index in Kathmandu Valley, Nepal. Water Science, 37(1), 239-250. July 2023.
[26]   | Jailos, P., Chimtali, P. J. and Vunain, E. Assessment of Groundwater Quality in Areas Surrounding Thundulu Phosphate Mine, Phalombe District, Malawi. Tanzania Journal of Science. 47 (3). 1310-1321. August 2021.
[27]   | Touré, A. and Wenbiao, D. Physicochemical and microorganism analysis of some hand pump water in Pelengana, Segou, Mali. Applied Water Science, 10. 1-9. May 2020.

[28]  
Shams, M., Nezhad, N. T., Dehghan, A., Alidadi, H., Paydar, M., Mohammadi, A. and Zarei, A. Heavy metals exposure, carcinogenic and non-carcinogenic human health risks assessment of groundwater around mines in Joghatai, Iran. International Journal of Environmental Analytical Chemistry, 102. 1884 - 1899. March 2020.

[29]  
Akakuru, O., Eyankware, M., Aigbadon, G., Usman, A., Opara, A. I., Musa, K. O., Okon, M. A., Aghamelu, O. P., Odesa, G., Ofoh, I. J. and Obinna-Akakuru, A. U. Carcinogenic health risks and water quality assessment of groundwater around lead–zinc mining areas of Ebonyi state Nigeria: a data-driven machine learning approach. Discover Civil Engineering, 1.1-40. November 2024.

[30]   | Zhou, J.-M., Jiang, Z., Qin, X. and Zhang, L. Heavy Metal Distribution and Health Risk Assessment in Groundwater and Surface Water of Karst Lead–Zinc Mine.Water.16. July 2024.
[31]   | Khasanova, R., Suyundukov, Y., Semenova, I. and Rafikova, Y. Quality of drinking water in mining areas. Bulletin of Nizhnevartovsk State University. 2.98-104. April 2019.
[32]   | Wawrzonek, K., Wątor, K., Topolewski, M., Kasprzak, A. and Kmiecik, E. Groundwater potential in mining regions for drinking water supply: A case study of the Żelatowa intake (Chrzanów, Poland). Water Resources and Industry. 32.1-17.November 2024.

[33]  
Yang, S., Wei, D., Xie, Z., Tao, L., Chen, Q., Uddin, M. G., Wang, Y., Huang, X., Wang, Y. and Zhang, Y. Surface water and groundwater suitability assessment for drinking and irrigation in a coal-mining area of southwestern China: EWQI, IWQI, and sensitivity analysis. Journal of environmental sciences, 161, 622-637.March 2025.

[34]  
Belle, G., Fossey, A., Esterhuizen, L., and Moodley, R. Contamination of groundwater by potential harmful elements from gold mine tailings and the implications to human health: A case study in Welkom and Virginia, Free State Province, South Africa. Groundwater for Sustainable Development, 12, 100507. February 2021.

[35]  
Danso-Boateng, E., Adom, E., Owusu, P. and Kabange, R., Pollution and health risk assessment of drinking water sources within artisanal and small-scale gold mining areas: a case of Asankrangwa District in Ghana. Environmental Science and Pollution Research International, 33, 3310 - 3338. February 2026.

[36]   | Mamelkina, M. A., Herraiz-Carboné, M., Cotillas, S., Lacasa, E., Sáez, C., Tuunila, R., Sillanpää, M., Häkkinen, A. and Rodrigo, M. Treatment of mining wastewater polluted with cyanide by coagulation processes: A mechanistic study. Separation and Purification Technology. 237. 2020.
[37]   | Caicedo, D., Brum, I. and Betancourt Buitrago, L. A. Photocatalytic degradation of ferricyanide as synthetic gold mining wastewater using TiO₂ assisted by H₂O₂. REM - International Engineering Journal. 73(1), 99-107. March 2020.
[38]   | Freitas, J. and Horta, D. Impacts of cyanide in gold mining and cyanide removal methodologies in liquid waste from gold processing. Rev. Metal. 59(3). December 2023.
[39]   | Belay, G., Suarez, C., Paul, C. J. and Simachew, A. (2024). Biodegradation of Cyanide Using Soda Lake-Derived Alkaliphilic Microbial Consortia. Water. 16. October 2024.