Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

The Effect of External Stimulus Produced by Vibration Stimulus Instrument on Body Sway

Hiroshi Hirai*, Shinichi Demura, Tamotsu Kitabayashi, Yoshimasa Matsuura

Faculty of Liberal Arts and Sciences, Osaka Prefecture University, Osaka, Japan

Abstract: This study aimed to examine the effect of right-left or front-back vibration stimulus during standing on body sway. Subjects were 10 healthy young male adults. They had no evidence or known history of a gait, posture or skeletal disorder. After a weak vibratory stimulus (20 Hz) for 1 min, subjects stood under the strong stimulus (70 Hz) of front-back or right-left vibratory for 1 min. The subjects were measured body sway for 1 min before and after the above vibratory stimulus. Four body-sway factors (unit time sway, front-back sway, left-right sway, and the high frequency band power) were used as evaluation parameters. A significant decrease was found only in a unit time sway factor after vibratory stimulus. A significant difference between front-back and right-left vibratory stimuli was found only in a left-right sway factor and the latter stimulus produced a large change. In conclusion, even in the vibratory stimulus with the same intensity, body sway decreases after front-back stimulus, but increases after right-left stimulus. In short, the effect of vibratory stimulus on posture control system may differ by the vibratory direction.

Keywords: body sway, vibration stimulus, external stimulus

Citation: Hiroshi Hirai, Shinichi Demura, Tamotsu Kitabayashi, Yoshimasa Matsuura, The Effect of External Stimulus Produced by Vibration Stimulus Instrument on Body Sway. American Journal of Sports Science and Medicine, 5 (2). 38-43. January 2017. doi:10.12691/ajssm-5-2-4

1. Introduction

People maintain a collapsing posture normally by integrating vestibular, visuosensory and somatosensory information from the central nervous system [1,2]. Postural adjustment function works when maintaining static upright posture without changing a support base and controls weak body sway within the base range. The information detected from muscle spindle which reacts muscle extension is sent to the central nervous system through sensory nerve fibers of centrality. The information from the central nervous system transmits command signal to muscles through α-motor neuron and γ-motor neuron. The former controls extrafusal muscle fibers which exist in ventral spinal cord roots and the latter controls intrafusal muscle fibers.

As the above-stated, the mechanism of static postural adjustment transmits the information from proprioceptor of muscle spindle or tendon organ of Golgi when disturbance occurred, into the central nervous system, and performs postural adjustment based on information. To examine this mechanism, the equilibrium reaction test using a disturbance stimulus has been conducted [3,4,5]. Mille & Mouchnino [3] reported that back excursion of body sway occurs when imposing forced vibration on triceps muscle during standing. However, the vibratory stimulus is not necessarily to be given only from one direction. In front-back vibration that tiptoe and heel parts go up and down alternately, posture is relatively easy controlled by the feed-forward control based on the prediction of the load quantity adding to ankle joins.

In a case of right-left vibration that right and left feet go up and down alternately as compared with a front-back one, vibratory stimulus affects also a head part and occurs "the reverse pendulum sway" that the head sways largely because a support basal surface is small and range of motion of ankle joints is also small. In short, it is considered that effect on postural adjustment differs by a stimulus direction.

In addition, also postural adjustment strategy to the vibration may differ if effect of vibration stimulus on postural adjustment differs. When giving front-back or right-left vibratory stimulus to a plantar within the range without exceeding a support basal surface (disturbance stimulus), from the above reason, it is hypothesized that effect on postural adjustment is larger in right- left vibration than in front-back one.

This study aimed to examine the effect on body sway when giving right-left or front-back vibration stimulus during standing.

2. Methods

2.1. Subjects

Subjects were 10 healthy young male adults (age: 24.3 ± 2.0 years, height: 171.6 ± 5.3 cm, weight: 71.0 ± 7.0 kg). They had no evidence or known history of a gait, posture, or skeletal disorder. The purpose and procedure of this study were explained to them. Informed consent was obtained from all subjects. The experimental protocol was approved by the Ethics Committee on Human Experimentation of Faculty of Human Science, Kanazawa University (No.2012-03).

2.2. Experimental Instrument

The perfect body (Meisei, Inc.: MS-20) was used for the disturbance stimulus by vibration. This instrument can set vibrational frequency within a range of 20 Hz- 70 Hz. Frequency of vertical vibration can be adjusted with a range of 155-710 for 1 min (see Figure 1). Front-back vibration (condition1) and right-left one (condition2) was selected as disturbance stimulus. Center of body gravity sway was measured by an Anima’s stabilometer G5500. This can calculate the COP of vertical loads from values of three vertical load sensors, which are located in the corners of an isosceles triangle on a level surface. The data sampling frequency was 20 Hz.

Figure 1. Experimental instrument in this study

2.3. Experimental Procedure

Subjects were divided into two groups who started from front-back (condition1) or right-left (condition2) vibration stimulus. Center of foot pressure movement was measured after participants sat quietly on a chair for 30 min to stabilize breathing and heart rates. After that, the measurement procedure followed a method prescribed in the standardization of the stabilometry test [6]. The subjects maintained a static upright posture with closed feet (Romberg posture) for 1 min. After performing one condition, subjects performed another condition several days later. The intensity of disturbance stimulus was selected 70 Hz in which keeping standing position for 1 min is possible under both conditions based on results of the exploratory experiment. This vibration stimulus can be given about 710 times for 1 min. It was judged that the intensity over the 70 Hz is difficult to measure because of violent head sway. After being used to weak vibratory stimulus (20 Hz) for 1 min, subjects received the strong vibratory stimulus (70 Hz) of front-back vibratory stimulus or right-left vibratory stimulus for 1 min. During measurement, it was confirmed whether subjects have subjective symptoms such as a fall risk or vomiting by vibratory stimulus or not (see Figure 2).

Figure 2. Experimental procedure in this study

2.4. Evaluation Parameters

This study used four body-sway factors (unit time sway, front-back sway, left-right sway and, the high frequency band power) proposed by Kitabayashi et al [7]. They reported that the above 4 factors are high reliability and adequately can evaluate body sway [7,8]. Table 1 shows mean and standard deviation (SD) of 30 parameters selected in this study.

Table 1. Mean and Standard Deviation(SD) of Parameters

2.5. Data Analysis

Two-way ANOVA (condition × before-after) was used to test differences among means of vibratory stimulus conditions (factor 1) and before-after stimulus (factor 2) for body sway parameters. When showing significant interaction or main effect, multiple comparisons were performed by Tukey’s HSD method. Effect size (ES) was calculated to examine the size of mean differences. A t-test was used to examine mean difference of change-rate ((after value- before value) ×100/ (before value)) before and after vibratory stimulus. An ES is generally interpreted as follows: under 0.2 is a small difference and over 0.8 is a large one. Factor scores of each factor were used the total of standard scores of parameters with high factor loadings followed the method of Kitabayashi et al [9]. The level of statistical significance (α) was set p < 0.05.

Table 2 shows results of two-way ANOVA and change-rates of four body-sway factors. Significant interaction was found in unit time sway and left-right sway factors. A significant increase after vibratory stimulus was found only in unit time sway factor.

Table 2. Results of two-way ANOVA and change-rates of four body-away factors

A significant difference between conditions (front-back and right-left vibratory stimuli) was found only in left-right sway factor, and right-left vibratory stimulus showed a larger value. In addition, the following tendency was found, but non-significant difference was found: unit time sway factor declines after front-back vibratory stimulus, left-right sway factor increases after left-right vibratory stimulus and declines after front-back vibratory stimulus. The high frequency band power factor declines after left-right vibratory stimulus and increases after front-back vibratory stimulus.

3. Results

Table 3 shows the test results between means of change rate for four body-sway factors. Significant difference was found only in unit time sway factor, and being larger in right-left vibratory stimulus (ES=1.18).

Table 3. Results between means of change rate for four body-sway factors

4. Discussion

Kitabayashi, et al. [7] reported that body sway of healthy young people can be explained by four sway factors (unit time sway, front-back sway, left-right sway and high frequency band power) and they are useful parameters to evaluate their body sway. Hence, this study examined effects of external stimulus (right-left or front-back vibration) produced by vibration stimulus instrument on body sway using the above-stated sway factors. A significant change was found in unit time sway factor after both vibration stimuli, but was not found in 3 factors of front-back sway, left-right sway and high frequency band power. This unit time sway factor evaluates mainly a size of body sway [7]. It is considered that body sway stabilized because this factor value declined after vibration stimulus. Fujiwara et al. [10] reported that reflection involves when giving disturbance stimulus. It is inferred that control by recovery reflection to make standing posture stable worked after both vibratory stimulus. In addition, a significant difference between conditions was found only in left-right sway factor, and front-back stimulus was a larger value than right-left one. This sway factor is related to the function of the labyrinthine recovery reflection which recovers standing posture to right position or maintains it [7]. In short, it is considered that recovery reflection works greatly after right-left vibratory stimulus and controls body sway. Although insignificant change was found, left-right sway factor increased markedly after the above stimulus. Also from the above, when giving right-left vibratory stimulus, it is inferred that body sway to an opposite direction increases and body sway to right and left direction is repeated greatly to recapture right standing posture. Mille and Mouchnino [11] reported that when vibrating the gastrocnemius compulsorily during standing, back displacement of center of body gravity occurs and after being released from vibration, the rapid forward displacement appears. In addition, Ouchi et al [12] reported that after stopping vibration, transient recovery arises and the following also occurs: the peak magnitude of front-back ingredient becomes large, body sway distance does not change regardless of a size of stimulus and the vibration stimulus of low frequency shows a large change. It is inferred that vibratory stimulus gave destabilizing effect to the proprioceptive sensation of the antigravity muscles during standing also in this study. Previous studies [3,4,5] regarding the effect of vibratory stimulus on COP regulation clarified that the posture can be held within a range of ±20% of targets after the stimulus. In addition, when adding stimulus which produces a posture change, change of body sway is well reproduced by the intermittent control model rather than the control model. By suitable stimulus, the feedback input regarding inclination of the posture obtained from feet is reinforced [13]. From now, it will be necessary to examine the vibratory stimulus amplitude, stimulus time, etc., according to age and whether vibratory stimulation is effective as balance re-learning or a sensory feedback function of postural adjustment.

5. Conclusion

In conclusion, even in the vibratory stimulus with the same intensity, body sway decreases after front-back vibratory stimulus, but increases after right-left vibratory one. In short, the effect on posture control system may differ by direction of the vibratory stimulus.

References

[1]   | Brooke-Wavell, K., Perrett, L. K., Howarth, P. A., & Haslam, R. A. Influence of the visual environment on the postural stability in healthy older women. Gerontology, 48, 293-297, 2002.
[2]   | Pyykko, I. Evaluation of postural stability. Equilibrium Research, 59, 401-407, 2000.
[3]   | Mille ML, Mouchnino L. Are human anticipatory postural adjustments affected by a modification of the initial position of the center of gravity? Neurosci Lett 242: 61-64, 1998.
[4]   | Testerman, T & Vander, R. Evaluation of ankle instability using the Biodex Stability System．Foot Ankle Int 20, 5, 317-321, 1999.
[5]   | Madurreria, M. Balance training program ishighly effective in improving functional statusand reducing the risk of falls in elderly womenwith osteoprosis: a randomized controlled trial. Osteoporos Int 18,419-425, 2007.
[6]   | Japan Society for Equilibrium Research. A fact of equilibrium research. Nanzando, Japan. 1994. [in Japanese].
[7]   | Kitabayashi, T., Demura, S., & Noda, M. Examination of the factor structure of center of foot pressure movement and cross-validity. Journal of Physiological Anthropology and Applied Human Science, 22, 265-272, 2003.
[8]   | Demura, S., Kitabayashi, T., Noda, M., Yamada, T., & Imaoka, K. Proposal for a convenient evaluation method of center of foot pressure. Equilibrium Research, 63, 215-223, 2004. [in Japanese].
[9]   | Kitabayashi, T., Demura, S. Proposal for a new body sway evaluation method. Perceptual and motor skills, 113, 1, 1-12, 2011.
[10]   | Fujiwara K, Ikegami H. The characteristics of postural response in upright stance to floor vibration. Jpn J Phys Educ 29: 251-261, 1984. [In Japanese with English Abstract].
[11]   | L. Mouchnino, M.-L. Mille, M. Cincera A., Bardot A., Delarque A., Pedotti J., Massion. Postural reorganization of weight-shifting in below-knee amputees during leg raising. Experimental Brain Research June 1998, Volume 121, Issue 2, 205-214, 1998.
[12]   | Ouchi, Y., Okada, H., Yoshikawa, E., Nobezawa,S., Futatsubashi, M. Brain activation duringmaintenance of standing postures in humans.Brain. 122 (Pt 2), 329-338, 1999.
[13]   | Brandt,T Krafczyk, S and Malsbenden, I. Postural imbalance with head extension: Improvement by training as a model for ataxia therapy. Annals of the New York Academy of Science 374, 636-49, 1981.