Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Formulation and Characterization of Fast Dissolving Tablet of Salbutamol Sulphate

Meenakshi Bharkatiya*, Santosh Kitawat, Kalpesh Gaur

B. N. Institute of Pharmaceutical Sciences, Udaipur-313001, Rajasthan, India

Abstract: There is an increasing demand for more patient compliant dosage form and a novel method is the development of orally disintegrating tablets which dissolve or disintegrates instantly on the patient tongue or buccal mucosa. It is suited for tablets undergoing high first pass metabolism and is used for improving bioavailability with reducing dosing frequency to minimize side effect and make it more cost effective. Oral route having the highest patient compliance is regarded as the most convenient, safest and also the most economical method of drug delivery. Fast dissolving tablets are one such most advantageous example of the oral drug delivery. These tablets readily dissolve or disintegrate in the saliva i.e. within less than 60sec without the need for water. In the present study fast dissolving tablet of Salbutamol Sulphate was formulated, prepared and evaluated. The objective was to fabricate the fast dissolving tablet for rapid release of drug, their characterization, and in-vitro drug release studies. Salbutamol Sulphate being a water soluble drug would be readily available in a dissolved form for rapid oral uptake. The rapid dissolving concept in case of Salbutamol Sulphate could be of a great importance in reliving acute asthmatic shocks. The drug was analyzed by UV, IR and DSC studies. The drug sample was found to comply with all the specifications. The tablets were formulated by using different super disintegrants, in different ratio by various techniques like direct compression, sublimation and solid dispersion. The blends were evaluated for mass volume relationship, flow properties and for compressibility properties. The tablets were evaluated for various physicochemical characteristics like color, odor, thickness, diameter, visual inspection for any defects, weight variation, hardness, friability, disintegration time and wetting time. The tablets were also evaluated for uniformity of drugs content and in-vitro drug release. In conclusion, the tablets prepared by solid dispersion method with crospovidone as a superdisintegrant shows better release profile as compared to other techniques.

Keywords: orally disintegrating tablets, Salbutamol, acute asthmatic shocks, superdisintegrant

Citation: Meenakshi Bharkatiya, Santosh Kitawat, Kalpesh Gaur, Formulation and Characterization of Fast Dissolving Tablet of Salbutamol Sulphate. American Journal of Pharmacological Sciences, 6 (1). 1-6. January 2018. doi:10.12691/ajps-6-1-1

1. Introduction

Fast dissolving tablets (FDTs) are solid single-unit dosage forms that are placed in mouth, allowed to disperse/dissolve in the saliva without the need of water and provide a quick onset of action. Some drugs are absorbed from mouth, pharynx and oesophagus as the saliva passes down into the stomach. In such cases, bioavailability of drug is significantly greater than those observed from conventional tablet dosage form. FDTs are appreciated by a significant segment of population, particularly children and elderly, which have difficulty in swallowing conventional tablets or capsules [1,2,3]. FDTs are prepared by various techniques, mainly direct compression, lyophilization and moulding. The simplicity and cost effectiveness of the direct compression process have positioned this technique as an attractive alternate to traditional granulation technologies [4]. Usually superdisintegrants are added to a drug formulation to facilitate the break-up or disintegration of tablet into smaller particles that can dissolve more rapidly than in absence of disintegrants [5].

US Food and Drug Administration Center for Drug Evaluation and Research (CDER) defines, in the “Orange Book,” an ODT as “a solid dosage form containing medicinal substances, which disintegrates rapidly, usually within a matter of seconds, when placed upon the tongue.” European Pharmacopoeia described ODTs as “uncoated tablets intended to be placed in the mouth where they disperse rapidly before being swallowed” and as tablets which should disintegrate within 3 minutes [6]. Fast disintegrating tablets (FDTs) are also known as “fast dissolving,” “mouth dissolving,” “rapid dissolve,” “quick disintegrating,” “orally disintegrating,” “rapimelt,” “fast melts,” “orodispersible,” “melt in mouth,” “quick dissolving,” “porous tablets,” “EFVDAS,” or “effervescent drug absorption system” [7].

The bioavailability of drugs may be increased due to absorption of drug in oral cavity and also due to pregastric absorption of saliva containing dispersed drugs that pass down into the stomach. Moreover, the amount of drug that is subjected to first-pass metabolism is reduced as compared to standard tablet [8]. The target populations for these new fast-dissolving/disintegrating dosage forms have generally been pediatric, geriatric, and bedridden or mentally disabled patients. Patients with diarrhea, persistent nausea, or vomiting,who are traveling, or who have little or no access to water are also good candidates for FDTs [9].

The basic approach in development of FDT is the use of super disintegrates like cross linked carboxymethyl cellulose (croscarmellose), sodium starch glycolate (primogel, explotab), polyvinylpyrollidone (polyplasdone) etc, which provide instantaneous disintegration of tablet after putting on tongue, their by release the drug in saliva. The bioavailability of some drugs may be increased due to absorption of drug in oral cavity and also due to pregastric absorption of saliva containing dispersed drugs that pass down into the stomach. More ever, the amount of drug that is subjected to first pass metabolism is reduced as compared to standard tablet [10].

2. Methods

2.1. Preparation of Fast Dissolving Tablets of Salbutamol Sulphate

The critical parameters to formulate a fast dissolving tablet are choice of super disintegrants and optimization of concentration of superdisintegrants. The super disintegrant (Crospovidone, Sodium Starch Glycolate, Ac di sol) in varying concentration (4 and 6 mg) were used to develop the tablets. Fast dissolving tablets were prepared by direct compression, sublimation and solid dispersion methods. 4 mg Salbutamol sulphate was taken in all the formulations. The compositions of tablets were shown in Table 1, Table 2 and Table 3 respectively.

Table 1. Formulation of fast dissolving tablets of Salbutamol Sulphate by direct Compression Technology

Table 2. Formulation of fast dissolving tablets of Salbutamol Sulphate by Sublimation Technology

Table 3. Formulation of fast dissolving tablets of Salbutamol Sulphate by Solid dispersion Technology

3. Evaluation of Blends

Tablets were made from blends by direct compression method. There are many formulation and process variables involved in mixing step and all these can affect the characteristics of blends produced. The various characteristics of blends tested are as given below:

3.1. Bulk and Tapped Density [11]

The bulk density was determined by filling the processed base powders into a tared graduated cylinder to the 100 ml mark. The graduated cylinder was weighed and the bulk density (VB) was calculated as the ratio of the sample weight to the sample volume. The graduated cylinders were then tapped from a height of above 2 inches till constant volume was obtained. The tap density (VT) was calculated as the ratio of the sample weight to the final sample volume. The trial was carried out on triplicate and the mean values were calculated.

3.2. Haussner Ratio [11]

Haussner factor (HF) was calculated from the following equation,

Where, VT and VB are tapped and bulk densities.

3.3. Percent Compressibility [11]

It is an important measure obtained from bulk density and is defined as,

If the bed of particles is more compressible will be less flowable and vice versa. Materials having “C” values less than 20 -21% is termed as free flowing materials.

3.4. Angle of Repose [11]

The frictional force in a loose powder can be measured by the angle of repose. It is defined as, the maximum angle possible between the surface of the pile of the powder and the horizontal plane. The angle of repose was determined by the funnel method suggested by Newman. Angle of repose is determined by the following formula

Therefore

Where θ = Angle of repose

h = height of the cone

r = Radius of the cone base.

4. Evaluation of Fast Dissolving Tablets [12]

4.1. Tablet Thickness

Tablet thickness is an important characteristic in reproducing appearance and also in counting by using filling equipment. Ten tablets were taken and their thickness was recorded using micrometer.

4.2. Uniformity of Weight

I.P. procedure for uniformity of weight was followed, twenty tablets were taken and their weight was determined individually and collectively on a digital weighing balance. The average weight of one tablet was determined from the collective weight.

4.3. Tablet Hardness

Hardness of tablet is defined as the force applied across the diameter of the tablet in the order to break the tablet. The resistance of the tablet to chipping, abrasion or breakage under condition of storage transformation and handling before usage depends on its hardness. Hardness of the tablet of each formulation was determined using Monsanto Hardness tester.

4.4. Friability

It is measured of mechanical strength of tablets. Roche fribalator was used to determine the friability by following procedure. A preweighed tablet was placed in the fribalator. Fribalator consist of a plastic chamber that revolves at 25 rpm, dropping that tablet at a distance of 6 inches with each revolution. The tablets were rotated in the friabalator for at least 4 minutes. At the end of test tablets were dusted and reweighed, the loss in the weight of tablet is the measure of friability and is expressed in percentage as

4.5. Disintegration Time

The test was carried out on the 6 tablets. Artificial saliva at 37°C ± 2°C was used as a disintegration media and the time taken for complete disintegration of the tablet with no palpable mass remaining in the apparatus was measured in seconds.

4.6. Wetting Time

The method reported by yunixia et al., was followed to measure tablet wetting time. A piece of tissue paper (12 cm X 10.75 cm) folded twice was placed in a small petridish (ID = 6.5 cm) containing 6 ml artificial saliva. A tablet was put on the paper, and the time for complete wetting was measured. Three trials for each batch were performed and the standard deviation was also determined

4.7. Drug Content

Five tablets were powdered and the blend equivalent to 4mg of Salbutamol Sulphate was weight and dissolved in suitable quantity of buffer pH 6.8. Solution was filtered and diluted and drug content was analyzed spectrophotometrically at 276 nm.

4.8. In-vitro Dissolution Study

The release of Salbutamol Sulphate from the tablet was accomplished in artificial saliva (pH 6.8) with a USP dissolution paddle assembly at 75 rpm and a temperature of 37°C ± 0.5°C. 900ml was used as dissolution medium. Aliquot of dissolution medium (5 ml) was withdrawn at specific time intervals (1 minute) and was filtered. The amount of drug release was determined spectrophotometrically at 276 nm. An equal volume of fresh medium after each sampling to maintain the constant volume thought the test.

4.9. Stability Studies

Stability Studies of formulated tablets were carried out at 40 C and 75% RH using a stability chamber for one month. The effect of temperature and the time on the physical characteristics of tablets were evaluated for assessing the stability of prepared formulations. The different parameters tested were disintegration time, hardness, friability, drug content and dissolution rate.

5. Results and Discussion

5.1. Characterization of Blend

The characterization of mixed blend is shown in Table 4. The result shows that the Bulk density depends on the particle size, shape and tendency of particles to adhere together. It is also important in size hoppers and receivers for milling equipment and for size blending equipment. The results indicate good packaging capacity of tablets. The tapped density was found in the range of 0.365 to 0.525 gm/cm³. The powder blends of all the formulation had hausners ratio of 1.2 or less indicating the excellent flowability. The % compressibility index was found between 5.690 % to 7.261 %. The % compressibility was below 16 % showed excellent flow property of the powder was also evidenced by the angle of repose. The angle of repose was below then 30° showed excellent flow properties of powder. Lower the friction occurring within the mass and better flow rate. This indicates the excellent flow property of the mixed blends.

5.2. Characterization of Salbutamol Sulphate Fast Dissolving Tablets

The prepared tablets were evaluated for diameter, Thickness, Hardness, weight variation, Friability, Disintegration time, wetting time. The results were tabulated in Table 5. The average weight of the prepared tablet by direct compression, sublimation and solid dispersions was found 100.18 to 101.61mg, 100.09 to 102.21mg and 100.05mg to 103.05mg respectively. The thickness of the tablet was found to be 2.5 mm. The diameter of the tablets was found to be 7.1 mm. The hardness of the prepared tablet varied from 3.08 to 4.71 kg/cm² which have satisfactory strength to withstand the mechanical shocks. The friability of all the formulation was found to be less than 0.5 %. The results shows resistance to loss of weight indicates the tablet’s ability to withstand abrasion in handling, packaging and shipment. The disintegration time of the tablets was varied from 17 to 53 seconds. The wetting time of all the formulations were varied between 10 to 28 seconds.

Table 4. Characterization of blend

Table 5. Characterization of Salbutamol Sulphate fast dissolving tablets

5.3. In Vitro Drug Release Profile

In vitro drug release experiments were performed at 37±1°C in six basket dissolution rate apparatus. The data obtained in vitro drug release study are tabulated. The result showed that all the formulation releases the drug in 5 to 6 minutes. The maximum drug release was found in formulation C4. The data from C1 to C6 formulations are represented graphically showing C4 as the best formulation.

Table 6. In vitro release data of Salbutamol Sulphate from A1 to A6

Table 7. In vitro release data of Salbutamol Sulphate tablet of B1 to B6

Table 8. In vitro release data of Salbutamol Sulphate tablet of C1 to C6

Figure 1. Zero order plot for different formulations (C₁-C₆)

Table 9. Stability study data of the tablet formulations

5.4. Stability Studies

Stability studies were conducted of the selected formulation (A4, B4, C3, C4). The formulation were stored at accelerated (40±20 / 75±5%RH) conditions in stability chamber for 1 month. After the stability period tablets were tested for thickness, weight, hardness, friability, disintegration time and wetting time.

The results show that both disintegration and hardness values decreased significantly indicating that tablets have lost the mechanical integrity leading to more friability loss. At higher relative humidity, tablet containing high concentration of super disintegrants gets softened and hence, must be protected from atmospheric moisture.

6. Conclusion

The objective of the present investigation was to formulate and evaluate fast dissolving tablet of Salbutamol Sulphate. The water soluble drug would be readily available in a dissolved form for rapid oral uptake. The rapid dissolving concept in case of Salbutamol Sulphate could be of a great importance in reliving acute asthmatic shocks. From the above experimental findings it can be concluded that Fast dissolving tablets prepared by solid dispersion technique using Crospovidone as a superdisintegrant shows less disintegration time compared with others.

References

[1]   | Bradoo R, Shahani S, Poojary S, Deewan B, Sudarshan S. Fast Dissolving Drug Delivery Systems. JAMA 2001; 4: 27-31.
[2]   | Dobetti L. Fast-Melting Tablets: Development and Technologies. Pharm Tech 2001; 37: 44-50.
[3]   | Lorenzp Lamosa ML, Cuna M, Vila-Jato JL, Torres D. Fast Dissolving Drug Delivery Systems: An Update. J Microencapsul 1997; 14: 607.
[4]   | Chang RK, Guo X, Burnside BA, Couch RA. Fast-dissolving Tablets. Pharm Tech 2000; 24: 52-58.
[5]   | Caraballo I, Fernandez-Arevalo M, Millan M. Superdisintegrants in Tablet Formulations. Drug Dev Ind Pharm 1997; 23: 665-669.
[6]   | Nayak AK, Manna K. Current developments in orally disintegrating tablet technology. Journal of Pharmaceutical Education and Research 2011; 2(1): 21-34.
[7]   | Sreenivas SA, Dandagi PM, Gadad AP, Orodispersible tablet: new drug delivery system-a review. Indian Journal of Pharmaceutical Education and Research 2005; 39(4): 177-181.
[8]   | Bhowmik D, Chiranjib B, Pankaj K, Chandira MR, Fast dissolving tablet: an overview. Journal of Chemical and Pharmaceutical Research 2009; 1(1): 163-177.
[9]   | Prajapati BG, Ratnakar N. A review on recent patents on fast dissolving drug delivery system. International Journal of PharmTech Research 2009; 1(3): 790-798.
[10]   | Chandira MR, Bhowmik DC, Gosh NS, Sahu SR. Studies on resent aspect of mouth dissolving tablet- an overview. Life science 2009; 1:1-19.
[11]   | Liberman H.A, Lachman L. In Pharmaceutical Dosage Form: Tablets, 2, Marcell Dekker, Inc, New York.1991; 123: 209-215.
[12]   | Sunada H, Yonezawa Y, Danjo K. Studies on evaluation of rapidly disintegrating tablets prepared by direct compression method. Drug Dev Ind Pharm 1999; 25: 571-581.