Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Implication of Ultrasonography in Detection of Retained Soft Tissue Foreign Bodies in Children: a Hospital Based Study from Western Nepal

Prakash Sharma*, Prasanna Ghimire, Subita Lalchan

Department of Radiology and Imaging, Manipal Teaching Hospital, Pokhara, Nepal

Abstract: The purpose of this study was to evaluate the sensitivity of sonography for detection of soft tissue foreign body and the common locations of foreign bodies in children. Children up to 14 years presenting to Radio diagnosis and Imaging department between August 2013 and May 2015 with diagnosis of retained foreign bodies embedded in soft tissue at various locations were included. All patients had both radiographs and ultrasound done. Location, size, depth, orientation and the relation to the adjacent structures were noted. Foreign bodies were then removed either by ultrasound guidance or by surgical exploration. Mean age of the patient was 10±3.7 years. Time of presentation ranged from 1 day to 35 days. Mean duration was 10 days. Pain and swelling were the presenting symptoms in all the patients. Sensitivity of ultrasound in detecting foreign body was 100%. There was no statistical difference between the length of the foreign bodies as measured by ultrasound and scale, after removal. Ultrasound is a cheap, readily available and effective modality for evaluation of retained foreign body in children.

Keywords: Foreign Body, Children, Ultrasound

Received April 08, 2015; Revised April 29, 2015; Accepted June 16, 2015

Citation: Prakash Sharma, Prasanna Ghimire, Subita Lalchan, Implication of Ultrasonography in Detection of Retained Soft Tissue Foreign Bodies in Children: a Hospital Based Study from Western Nepal. American Journal of Public Health Research, 3 (4A). 41-44. January 2015. doi:10.12691/ajphr-3-4A-8

1. Introduction

Penetrating injury with pointed objects continues to be a common problem in Nepal. Retained foreign body following such injury in children is not very commonly encountered in clinical practice. Detection and removal of these foreign bodies are essential to prevent the complications like abscess, sinus formation, osteomyelitis and inflammation. Radiographs are routinely taken in many cases to rule out radio-opaque foreign body; however radiolucent foreign bodies, such as wood splint and thorn are usually missed by radiographs. Imaging modalities like ultrasound, CT and MRI can be used for this purpose. Retained foreign body in the pediatric population is not studied in our part of the world. Ultrasound is cheap and readily available in many hospitals and clinics, hence use of of ultrasound in the detection and removal of foreign body is increasing.

The purpose of this study was to evaluate the sensitivity of sonography for detection of foreign body embedded in soft tissue at the the common sites in children.

2. Materials and Methods

Fourteen children up to 14 years of age were referred to the Radio diagnosis and Imaging department of Manipal Teaching Hospital between August 2013 and May 2015 for diagnosis and localization of retained foreign bodies. All the patients had traditional radiographs and ultrasound done. Ultrasound was performed with either Sonoace X6 or GE Logiq P3 by a radiologist with seven years experience using high frequency (12 Mhz) transducer in sagittal, coronal and axial planes. All the radiographs were reviewed by the radiologist. An ultrasound was done; location, size, depth, orientation and the relation to the adjacent structures were noted. Exact site was marked with a permanent marker. Foreign body was then removed either by ultrasound guidance or by surgical exploration. Length of the removed foreign bodies were measured with a scale.

Written consent was obtained from all the guardians or parents of the patients.

The study protocol was approved by institutional research committee.

Data were analyzed by SPSS. Paired T test was used to calculate the statistical significance of length of foreign bodies by ultrasound and by scale.

3. Results

Fourteen children (10 males and 4 females) were included in the study. Mean age of the patient was 10±3.7 years. Age ranged from 3 years to 14 years. Time of presentation ranged from 1 day to 35 days. Mean duration was 10 days. Pain and swelling was the presenting symptoms in all the patients. History of the prick was noted in most of the patients (11 patients) as shown in Figure 1.

Figure 1. Penetrating injury on the sole of left foot

Three patients denied of having any history of prick. Patients without a history of prick presented later than patients with history of prick.

Five of the patients presented with a history of discharging wound. Conventional radiograph was normal in 13 patients. In one of the patients a glass piece was detected as a foreign body on radiographs. All the 14 patients were diagnosed to have a foreign body by ultrasound. One patient who had presented following road traffic accident was suspected to have a retained glass piece on the cheek. On ultrasound the diagnosis was a foreign body. But during ultrasound assisted surgical exploration no foreign body was found.

Length of the foreign body as given by ultrasound ranged from 0.6 cm to 4 cm (mean length was 1.82 ±0.91 cm). Actual length of the foreign body as measured after removal ranged from 0.6 cm to 3.6 cm (Figure 2). The mean length was 1.86±0.89 cm. There was no statistical significance between the length of the foreign body as measured by ultrasound and scale after removal (p = 0.57).

Figure 2. Wooden splinter after removal surgically

The smallest foreign body was a glass piece which measured 6 mm in length present in the sole of right foot. Surgery revealed the most common retained foreign body to be a wooden splinter (Table 1).

Table 1. Type of foreign body

There was a false positive case of retained foreign body in ultrasound. Sensitivity of ultrasonography in detection of foreign body was 100 %.

The most common location of foreign body was foot and ankle (Table 2).

Table 2. Locations of foreign bodies

All of the foreign bodies were hyperechoeic in ultrasonography as shown in Figure 3.

Figure 3. Linear echogenic structure oriented obliquely in the sole of left foot representing foreign body

A total of 9 patients had hypoechoeic halo. Posterior acoustic shadowing was seen in 9 out of 12 organic objects.

Collection was noted surrounding the foreign body in four patients as shown in Figure 4. There was no vascular injury in any case. Adjacent tendons in the hands and feet were normal.

Figure 4. Linear obliquely oriented foreign body on the sole of right foot with surrounding minimal collection

4. Discussion

Ultrasound is the first choice in diagnosing and localizing the radiolucent foreign body with a sensitivity of 90% to 100% and specificity of 96%. [1,2].

In this study overall sensitivity was 100%. Ultrasound has a positive impact in determining the presence or absence of foreign body. It can more precisely locate foreign body [3].

Sonography was first described for foreign body removal in 1978 [4].

Superficial foreign body can be grouped into the following categories:

Organic- e.g. wood, plant material like thorn

Inorganic- e.g. Glass, Plastic

Metallic- wire, needle.

Most common foreign body removed surgically was organic (wooden piece) which is similar to Mohammadi et al [5] and Crawford R et al [6]. In contrast to this Callegari et al [7] found a glass piece as a common foreign body. In our study only one case presented with a glass piece as foreign body.

Most of our patients were above the age of 10 years. This may be due to the reason that older children may be more involved in outdoor activities as compared to younger children. Male children were more commonly involved as compared to female children as male children are more active and involved in outdoor activities. In contrast to a study by Gustavo et al [8], where most of the patients were adult population, in our study children presented immediately (3 to 10 days) to seek medical attention.

According to the evolution of injury the condition may be classified into following stages: [8]

Acute: injury less than 3 days

Intermediate: 3 to 10 days

Chronic: Injury more than 10 days

Most of our patients were in the intermediate stage in contrast to a study by Gustavo et al [8], where most of the patients were adult population who presented in the later stage (more than 10 days).

The sonographic appearance of organic foreign bodies(FB) vary according to the evolution time [7,10].

In the acute phase, as in our case they appear as bright echogenic area with posterior acoustic shadowing. This is mainly due to the air that is trapped within the material.

At the end of this stage, there may be a hypoechoic rim surrounding the foreign body which may be due to edema, pus or granulation phenomena. In the intermediate stage (3 to 10 days) the halo becomes more marked, and the echogenicity of the material decreases.

In the chronic stage (after 10 days) dense granulation tissue is seen surrounding the foreign bodies which appears as a hypoechoeic halo [10].

Since most of the cases in this study presented in the intermediate and chronic phase, hypoechoeic halo was seen surrounding the foreign body in 9 cases.

Posterior acoustic shadowing was seen in 9 out of 12 organic objects that was similar to the previous study [5] that demonstrated posterior acoustic shadowing in 15 out of 17 patients of wooden foreign bodies.

Similarly, Gilbert et al [9] have shown posterior acousting shadowing in 11 patients out of 17 wooden foreign bodies. This is due to the orientation of the foreign bodies relative to the sound beam and chronicity of the retained FB. Retained wooden FB absorbs fluid, which alters its imaging characteristics [5].

Sometimes problem occurs due to near field acoustic dead space which can be overcome by using interposed liquids in latex gloves, intravenous bags, or a water bath [11,12,13].

Foreign body must be differentiated from hyperechoeic structure like scar tissue, bone, articular surface, gas bubble, intermuscular fascia etc. A thorough knowledge of the regional anatomy is also important to prevent false positive result. In the study, one false positive ultrasonography could be attributed to air trapping in the soft tissue following penetrating injury by glass piece during road traffic accident.

Foot and ankle were the most common location of retained foreign body which is similar to other studies [14].

There was no statistically significant difference between the size of the foreign bodies as measured by ultrasound and by scale after surgical removal.

5. Conclusion

Ultrasound is a cheap, readily available modality for evaluation of retained foreign body in children with an overall sensitivity of 100 %. Foot and ankle was the most common location with organic material being the commonest object.

Acknowledgement

The authors would like to thank Dr. Mahesh Pathak for his support in this study.

Declaration of Conflicting Interests

The authors declare that there is no potential conflicts of interest with respect to the research, authorship and /or publication of this article.

Funding

The authors received no financial support for the research, authorship and/or publication of this article.

References

[1]   | Jacobson JA, Powell A, Craig JG, Bouffard JA, van Holsbeeck MT. Wooden foreign bodies in soft tissue: detection at US. Radilogy 1998; 206 (1): 45-8.
[2]   | Bray PW, Mahoney JL, Campbell JP: Sensitivity and specificity of ultrasound in the diagnosis of foreign bodies in the hand. J Hand Surg Am 1995; 20:661-6.
[3]   | Horton LK, Jacobson JA, Powell A, Fessell DP, Hayes CW. Sonography and Radiography of Soft-Tissue Foreign Bodies. AJR Am J Roentgenol 2001; 176: 1155-9.
[4]   | Hassani SN, Bard RL. Real time ophthalmic ultrasonography. Radiology 1978; 127: 213-9.
[5]   | Mohammadi A, Ghasemi-Rad M, Khodabakhsh M: Non-opaque soft tissue foreign body: Sonographic findings. BMC Medical Imaging 2001; 11: 9.
[6]   | Crawford R, Matheson AB: Clinical value of ultrasonography in the detection and removal of radiolucent foreign bodies. Injury 1989; 20: 341-3.
[7]   | Callegari L, Leonardi A, Bini A, Sabato C, Nicotera P, Spano' E et al. Ultrasound-guided removal of foreign bodies: personal experience. Eur Radiol 2009; 19: 1273-9.
[8]   | Casadei GF, Romero K, Gomez V. Soft- tissue foreign bodies: Diagnosis and removal under ultrasound guidance. Age. 2011.
[9]   | Gibert FJ, Campbell RDS, Bayliss AP. The role of ultrasound in the detection of non- radiopaque foreign bodies. Clin Radiol 1990; 41 (2), 109-12.
[10]   | Gibbs ST. The use of sonography in the identification, localization, and removal of soft tissue foreign bodies. J Diagn Med Sonogr 2006; 22: 5-21.
[11]   | Blankenship RB, Baker T: Imaging modalities in wounds and superficial skin infections. Emerg Med Clin North Am 2007; 25: 223-34.
[12]   | Dean AJ, Gronczewski CA, Costantino TG: Technique for emergency medicine bedside ultrasound identification of a radiolucent foreign body. J Emerg Med 2003; 24: 303-8.
[13]   | Blaivas M, Lyon M, Brannam L, Duggal S, Sierzenski P. Water bath evaluation technique for emergency ultrasound of painful superficial structures. Am J Emerg Med 2004; 22: 589-93.
[14]   | Shrestha D, Sharma UK, Mohammad R, Dhoju D. The role of ultrasonography in detection and localization of radiolucent foreign body in soft tissues of extremities. JNMA J Nedical Med Assoc 2009. 48 (173): 5-9.