Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Label_Title

Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Label_Title

Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Label_Title

Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Optimizing Surgical Access for Patients: A Systematic Review of Operating Room Coordination Strategies

Talal A. Al-Zaharani, Nahed G. Aldossary, Maryam A. Alkhalaf*

Group Supervisor of Nursing research and evidence-based EHC, Saudi Arabia MSc in Health Research and Social science

Abstract: Background: Timely access to surgical care remains a global challenge. Inefficient operating rooms (ORs) result in prolonged wait times, cancellations, and wasted resources. This study highlights effective strategies to optimize OR coordination. Methods: A systematic review was conducted following PRISMA guidelines. Five databases—PubMed, Scopus, Web of Science, Cochrane Library, and CINAHL—were searched for English-language studies published between 2013 and 2025, including key earlier works. Results: The studies included (n = 34) were grouped into a few main themes related to improving the operating room. Six studies focused on scheduling and planning strategies, including models for resource allocation and optimization. Five studies examined workforce-related factors, including staffing levels, workload, and nursing competencies, while an additional five studies focused on coordination and communication within surgical teams. Four studies examined digital and AI-driven methods, which are a growing yet still emerging field. Three studies examined lean and process improvement methods. The remaining studies (n = 11) examined broader issues, including patient safety, surgical outcomes, and organizational performance. Conclusion: Strategies to coordinate ORs can increase efficiency and access. However, no single approach is universally effective. For Saudi hospitals, a customized model incorporating Lean principles, digital innovations, extended hours, and team engagement is most promising. Recommendations: Policymakers are encouraged to consider standardizing operating room performance metrics across hospitals and piloting extended evening and weekend operating lists at tertiary centers to maximize capacity and access. These efforts could be supported by routine monitoring, expanded Lean training programs for sustained improvement, and decisive investment in integrated digital and AI-driven scheduling tools aligned with Saudi Vision 2030.

Keywords: Operating room, surgical access, Coordination, Utilisation, Scheduling

Received May 24, 2026; Revised June 28, 2026; Accepted July 05, 2026

Citation: Talal A. Al-Zaharani, Nahed G. Aldossary, Maryam A. Alkhalaf, Optimizing Surgical Access for Patients: A Systematic Review of Operating Room Coordination Strategies. American Journal of Nursing Research, 14 (2). 37-43. January 2026. doi:10.12691/ajnr-14-2-3

1. Introduction

Global health systems struggle to provide timely surgical care. Shortages and queues for elective surgeries have become a serious problem. This leads to increased patient frustration and poorer health outcomes. As a result, ensuring surgical access—where patients can receive operative care without needless delay—is a pressing goal for hospital administrators and health services researchers.

A critical bottleneck to access to the operating room (OR), a high-tech, resource-intensive setting, is surgical capacity. Suboptimal utilization of the OR can result in time voids, lost resources, and further prolongation of wait times for surgery. Hence, improving the efficiency of scheduling and operating room use is essential to increasing patient access to surgery.

To address these pressures, health care organizations have investigated several different approaches to coordinating operating room scheduling to improve throughput and minimize delays.

The three approaches can be classified into three aspects: OR scheduling, lean methodology and improvement, and Digital and AI-driven innovation.

Operating room (OR) coordination optimizes time and resources for surgical timetables, personnel, communication, and workflow, ensuring surgeries start and finish on time.

Most Gulf nations, including Saudi Arabia, Qatar, and the United Arab Emirates (UAE), are still developing their OR coordinating strategies. A linear workweek of time spent in the operating room (OR) has historically been established at public hospitals in various nations (e.g., 5 days/week of ~8 hours/day was the standard). The majority of Saudi hospitals are understaffed, and demand for surgery outpaces the number of available OR slots, resulting in long wait times.

Worldwide, several countries have used various strategies to increase access, such as having ORs running in extended periods, such as at night or on weekends and an after-hours scheme .In Canada, the UK, and Australia, introducing extra weekday evening/weekend operations; such attempts resulted in significant waiting list reductions (e.g., 20–30% over a year), but they also faced problems, including staff mental fatigue and heavy overtime costs [1].

Public hospitals in Saudi Arabia have trailed evening and weekend elective lists to try to clear the backlog. One public hospital in Dammam has documented the possibility of increasing OR slots on weekends and weekday evenings [2].

The second approach is Lean Methodology and Process Improvement in ORs. Lean selectively addresses highly inefficient in-process problems (long turnaround times, late first-case starts and too many moves through the preoperative process).

A Lean project at the Mayo Clinic also resulted in a higher percentage of on-time first-case starts, a lower proportion of case overruns, and better workflow and communication [3].

The third approach is the incorporation of digital technologies and AI into OR management, a new trend aiming to revolutionize surgical scheduling. Advanced decision-making models, based on data analytics, machine learning and quantitative methods, are being used in hospitals to improve the accuracy of scheduling and resource allocation. The machine learning models could predict surgical case duration with up to 90% accuracy. Studies have shown that implementing real-time OR management systems can reduce average waiting times, improve OR coordination, and drive digital innovation [4].

Measuring OR performance is fundamental to identifying coordination problems and tracking improvements. However, the literature lacks consensus on standard definitions and benchmarks for many OR metrics. It was noted that while utilization rate (the percentage of available OR time that is actually used), turnover time, first-case start delay, and cancellation rate are among the most commonly reported indicators, different studies and institutions define these metrics in varying ways [5].

Other organizational factors in Saudi hospitals include unnecessary cancellations and incomplete preoperative work-ups. In the Jeddah study, the creation of a separate preoperative anesthesia clinic reduced day-of-surgery cancellations due to medical reasons – a reminder of how intra-departmental coordination (between surgery and anesthesiology preoperative assessment) can directly benefit OR efficiency.

The purpose of this study is to systematically review the published evidence and summaries recent findings relevant to optimizing OR use. This research also aims to provide healthcare organizations focused on improving surgical access with a clearer picture of these strategies through enhanced coordination.

The main aim of this research is to conduct a systematic investigation of OR coordination strategies described in the literature as helpful in ensuring optimal surgical access.

In addition, this research assessed the outcomes and success of these coordination efforts, accounting for environmental constraints and highlighting gaps or inconsistencies in the literature.

The findings of this research will contribute significantly to better coordination of the operating room to improve surgical access, an objective of paramount importance for patients, healthcare providers, and health systems. This study will provide a clearer picture for healthcare institutions seeking to improve surgical access through better coordination.

2. Methods

This study used a systematic review, following PRISMA guidelines.

An extensive literature search was conducted across the following databases: PubMed (MEDLINE), Scopus, Web of Science, Cochrane Library, and CINAHL (Cumulative Index of Nursing and Allied Health Literature).

The search was restricted to English-language articles from January 2013 to 2025 to ensure comprehensive coverage of the literature. Peer-reviewed articles were only selected to ensure the quality of work. References were also hand-searched for other eligible papers.

The search period covered January 2013 to December 2025 to capture evidence of current rather than past research, but this may have skewed some seminal studies published before that date. Such works (e.g., Lingard, 2004; Gillespie, 2011; Cima, 2011) are seminal in OR coordination and have introduced concepts and practices that are still employed today. Their addition provides a historical continuum for the review.

A total of 1,237 articles were found, and 34 were included in the review after filtering, as shown in the selection overview (Table 1).

Table 1. PRISMA Flowchart – Overview of the selection process of the studies

The data were uploaded to Rayyan QCRI to check for potential literature review and quality control.

Title and abstract screening, as well as full-text review, were carried out independently by two reviewers. Any discrepancies were settled by consensus, and a third reviewer was consulted.

3. Results

A typical data extraction form was created for the following items related to the outcomes from Studies on OR Coordination Strategies, as in Table 2. [6,7,8,9,10] [11,12,13,14,15] [16,17,18] [19,20,21]

Table 2. Summary of Outcomes from Studies on OR Coordination Strategies (included in the systematic review)

Narrative synthesis was employed. When analyzing the included studies collectively, several key themes emerged concerning operating room (OR) coordination strategies.

Technology as a Powerful Enabler

Digital tools and AI-driven scheduling systems helped hospitals minimize cancellations. These technologies optimize the use of operating rooms. For example, predictive models more accurately forecast surgery times. This reduces last-minute delays and results in more regular daily schedules. Real-time dashboards also give staff immediate insight. They can better understand what is happening and know when to take action.

Lean Improvements—Effective but Fragile

Lean and Six Sigma projects demonstrate that process redesign can have a significant impact. Several hospitals reported sharper starts to the day’s first cases and faster turnovers between surgeries. But if there is no culture of continuous monitoring and leadership support, things often revert. In other words, Lean works only if it becomes part of how the hospital thinks and acts, not just a temporary project.

The Human Factor Matters Most

Communication failures, turnover among teams and unavailability of surgeons continued to surface as significant causes of inefficiency. These problems are particularly evident in Saudi hospitals, where audits on cancellations have shown that consultant unavailability is now the leading cause of delays, surpassing patient-related causes. This underlines that OR coordination is not only purely technical, but also profoundly social and organizational.

Synthesis of Model Comparisons

A clear pattern emerges when comparing the three models. Manual systems still crop up in resource-constrained settings, but they are almost always accompanied by higher cancellation rates and wasted time. Transitioning to digital OR coordination represents a paradigm shift that many healthcare systems have adopted over the last two decades. In an entirely digital system, all managed by specialized software, surgeons or their offices enter case requests, and a central scheduling team enters the allocated OR time. Enhanced efficiency and utilization are first-order benefits; for example, U.S. hospital systems that deployed a predictive scheduling platform (powered by AI) reported OR block utilization increases of 6–11% and prime-time utilization of ∼7%, driven by better allocation of unused blocks.

Many organizations operate with a hybrid OR coordination model, particularly during transitional phases. In these systems, certain scheduling tasks are digitized, while others remain manual. For instance, in hospitals in the Gulf region that are currently modernizing, a basic digital OR scheduling module may be part of the hospital information system. However, surgeons may still call the OR desk to request notable schedule changes or ask a coordinator to manually sanction adjustments. This hybrid approach enables gradual staff adaptation to digital systems without immediately abandoning established manual processes.

The advantage of the hybrid model is its value as a transitional step, which helps staff become familiar with digital tools while still using manual methods as needed. For example, some Gulf hospitals have implemented hybrid models by clearly defining operational processes. In one case, a centralized digital system plans OR time across a hospital cluster weeks in advance, while local OR managers may manually adjust the daily list each morning to account for staff availability and emergencies. This layered approach supports both consistency and flexibility during technology adoption.

It is crucial to recognize that the success of any OR coordination strategy is not determined solely by technology or process changes. Cultural, organizational, and administrative factors play a pivotal role in the implementation and sustainability of these strategies.

Good communication among surgeons, anesthesiologists, OR nurses, and administration is vital for scheduling. Whenever surgical schedules change or there are delays for any reason (e.g., other late-running procedures), the staff involved must report them immediately. Studies have demonstrated that poor communication among OR team members leads to errors, delays, and patient harm. In operating rooms with a multicultural workforce, such as expatriate surgical nurses, language and communication differences can create daily challenges. Simple practices, such as using a common language during briefings or providing visual aids, can help bridge these gaps.

Ultimately, creating a culture that supports timely, efficient care and encourages staff to speak up and challenge outdated routines is essential. Leaders must take proactive steps to foster these values, ensuring that every staff member feels empowered to drive improvement. Without this commitment, even advanced coordination mechanisms may lose their effectiveness. This reinforces the importance of fostering a culture that supports continuous improvement.

Management decisions and coordination mechanisms can be standardized and replicated across sites within a cluster, such as a waitlist management system for surgery (whether state-wide or relocated). For example, some health systems have introduced additional surgical programs without expanding physical OR capacity to redistribute surgical volume.

Another factor is the existence of special coordination positions /committees. Another common strategy is a deep, specific focus on efficiency: Hospitals that create an OR management committee achieve better outcomes because the committee focuses on tracking metrics, troubleshooting scheduling conflicts, and iterating on process improvements.

The process alignment between departments is essential. If the admissions department correctly handles the scheduling of surgical cases (with or without anesthesia), patients may present to ORs for cases that are improperly cleared, or beds may not be available post-surgery, leading to cancellations. For instance, one study introduced a nurse-led pre-operative assessment clinic a week before surgery and found that it reduced cancellation rates and even halved their no-show rate for a particular type of procedure. This highlights the concept that optimizing upstream operations (a system-level process change) has an in-kind impact on OR scheduling, as only ready patients are scheduled.

Additionally, as interdepartmental preparation is a hybrid organizational culture/process variable, scheduling ORs is influenced by radiology, the lab, and the ICU. For example, if ICU beds are unavailable for post-operative patients, the case may be delayed or cancelled. Effective coordination strategies may require organizational solutions, such as a protocol that no elective cardiac surgery is performed unless ICU bed availability is confirmed 24 hours in advance.

In conclusion, the strength of coordination strategies often lies in the organizational foundation, specifically in how clearly roles and processes are defined. To achieve the highest standards in surgical care, priorities cross-departmental interventions and actively restructure scheduling and care workflows. This supports improved team performance and coordination outcomes

In addition to culture and intra-organizational dynamics, operational policies have a significant impact on OR utilization.

In Saudi Arabia, national initiatives now provide financial incentives to hospitals to reduce surgical backlogs, including funding for extended OR hours or weekend surgeries. These efforts have proven effective in lowering wait times, although sustainability remains a concern if incentives are not consistently maintained.

Hospitals within the cluster must specify specific access goals (such as maximum wait times for elective surgeries), and administrators are held accountable. This policy context incentivizes hospital administrators to pursue improvements in OR coordination. In the Gulf, a reliance on expatriate labor means that visas and contracts are required to make any temporary staffing arrangements feasible– bringing in extra temporary staff to clear a backlog could be more bureaucratically cumbersome. Quality and safety concerns are also relevant, as any alignment design must be consistent with surgical safety criteria. At times, administrators worry that performing more surgeries or hastening turnover may increase risks. However, findings from studies, such as the weekend surgery feasibility study in Riyadh, which showed that patient safety was not compromised with extended timing (with no higher mortality or complications), can provide policymakers with evidence that innovations are compatible with good care. Ultimately, effective monitoring and evaluation mechanisms are crucial for sustaining quality improvement.

In summary, flexible scheduling rules and regulations provide support mechanisms to meet coordination targets. Adequate funding and resource allocation are essential to support sustainable OR coordination. These findings highlight the importance of team empowerment and organizational support, and position the organization to break through the improvement ceiling and deliver on its coordination goals.

4. Discussion

Optimal use of the operating room (OR) to improve surgical access is now a critical priority for health systems worldwide. This systematic review examines models aimed at enhancing OR efficiency, specifically identifying that multidisciplinary scheduling, improved communication protocols, and real-time monitoring have been shown to reduce cancellations and shorten patient waiting times. Studies from Saudi Arabia, Australia, and other Gulf countries highlight opportunities to increase surgical productivity, improve patient flow, and enhance hospital performance through coordinated strategies.

Organizational strategies, such as e-Booking, extended hours planning, and lean process re-engineering, drive improvements in KPIs. In Saudi Arabia and Australia, digital scheduling tools and OR workflow optimization projects have increased OR utilization and reduced waiting times [27]. Extending OR hours to include evening and weekend sessions in Dammam increased surgical capacity by 30%. This change enabled 1,550 additional cases annually [2].

While some reports do not show statistically significant increases in post-intervention utilization, key secondary outcomes—specifically faster first-case starts, fewer overruns, and shorter turnover times—clearly demonstrate the practical value of these interventions. Though sometimes considered minor, these gains are pivotal in surgical systems. Within the Complex Adaptive Systems framework, they represent 'small wins' that help build momentum for larger accomplishments during the day.

These findings matter especially in Saudi Arabia, where late first-case starts and surgeon unavailability are persistent bottlenecks. Addressing these secondary issues can increase throughput and uncover hidden capacity, improving patient flow beyond utilization ratios.

Improving timely first-case starts offers immediate gains in Saudi hospitals. Focusing on punctuality and efficiency, as Eastern Health Cluster audits show, yields tangible patient flow improvements through simple behavioral changes, even without major utilization leaps.

Digital OR scheduling systems transform surgical scheduling. They reduce idle time and promote transparency by algorithmically pairing procedures with open slots.

These systems enhance operational efficiency by generating performance metrics, identifying system bottlenecks, and supporting preoperative safety protocols (e.g., electronic checklists). When integrated with AI and predictive analytics, they can also predict demand and staffing levels.

Nevertheless, despite these clear advantages, practicalities are context-specific. From a constraint management perspective, digital booking cannot resolve issues such as consultant availability and anesthesia coverage.

These challenges remain notable in Saudi Arabia. Some hospitals have used e-Booking for years, yet Eastern Health Cluster audits reveal that staff still use manual rostering, causing duplication and issues.

Staff capacity remains the main requirement for effective OR scheduling. Even with digitization, surgical throughput depends on adequate numbers of nurses, anesthetists, and surgeons, as well as available theatre time. Without these essential resources, advanced scheduling techniques cannot realize their benefits.

The non-availability of consultants, a shortage of nurses, and inflexible rostering also limit capacity. This is true regardless of infrastructure or technology investment. Additionally, workforce availability intersects with organizational norms. Rigid cut-off times for service delivery persist, despite theoretical 24-hour capacity (e.g., ending elective sessions by 4 PM). The urgency is even more evident in Saudi Arabia. Dependence on expatriate staff, nursing team shortages, and hierarchical decision-making are common contributors to variation in OR scheduling.

To address these barriers, reform strategies need to move beyond scheduling solutions. Workforce stabilization strategies, with flexible policies and leadership-led cultural change, are needed. Without managing these root issues, improvements in OR coordination are likely to be only incremental and short-lived.

The economic implications of OR coordination strategies are complex and multifaceted. Importantly, system-wide savings result from smoother patient flow and fewer complications, rather than just immediate cost reductions.

Stakeholders in Saudi Arabia should view costs within a broader value framework, balancing direct expenses against long-term efficiency, better access, and health priorities.

Paper-based and manual scheduling tools still dominate in LMICs. These settings are resource- and infrastructure-constrained and understaffed. This leads to high cancellation rates and historically poor utilization of OR time. Even simple process interventions, such as structured preoperative checklists, can significantly improve utilization and patient safety [22]. However, more sophisticated solutions—like Lean methods or digital scheduling tools—remain uncommon due to financial constraints and pre-digital mindsets.

When viewed through the Theory of Constraints, these systems have multiple bottlenecks. These include money, trained staff, and hardware.

Recent digital reforms mark a transitional phase for OR scheduling in Saudi Arabia. Before these reforms, most scheduling was manual, leading to unpredictable staffing and preparation. Current changes under Vision 2030 aim to reduce waste and embed digital tools for improved efficiency.

Effective OR coordination requires integrating structural, technological, and behavioral solutions. For Saudi Arabia under Vision 2030, this synergy aims to meet growing surgical demand and efficiency within a context-specific framework.

Limitations

The present review has several limitations. The included studies varied in design, outcome measures, and healthcare settings, which limits comparability and generalisability. These limitations underscore the need for researchers to conduct more rigorous, multicentre, longitudinal studies to evaluate the sustainability and workforce impact of OR coordination interventions.

Conclusion and Recommendations

This review shows that effective operating room (OR) coordination is a strategic factor for surgical access, efficiency, and patient safety. It extends beyond a purely logistical function. No single solution is sufficient; instead, sustainable improvement is achieved through an integrated approach that builds stable, multidisciplinary OR teams, applies Lean and Six Sigma process redesign, uses flexible scheduling, adopts digital coordination tools, and focuses on patient-centred practices.

Saudi hospitals may benefit from extending OR hours in high-demand specialities, improving workforce stability, and scaling digital platforms with proper training.

Statement of Ethics

This Study is a systematic review and no approval is needed.

Conflict of Interest Statement

“The authors have no conflicts of interest to declare.”

Funding Sources

"This study was not supported by any sponsor or funder."

Author Contributions

Author 1 and author 2 prepared the research proposal and did the literature review and analyzed the data. Author 2 and author 3 prepared the manuscript. All authors approved the final manuscript.

Data Availability Statement

The data that support the findings of this study are available on request from Author 1.

References

[1]   | Oliveira, M., et al. (2023). A systematic literature review on the utilization of extended operating room hours. Frontiers in Public Health, 11, 1118072.
[2]   | Eastern Health Cluster. (2024). Operating room optimisation project report (Unpublished internal document).

[3]  
Cima, R. R., Brown, M. J., Hebl, J. R., Moore, R., Rogers, J. C., Kollengode, A., Amstutz, G. J., Weisbrod, C. A., Narr, B. J., & Deschamps, C. (2011). Use of lean and Six Sigma methodology to improve operating room efficiency in a high-volume tertiary-care academic medical center. Journal of the American College of Surgeons, 213(1), 83–92.

[4]   | Merghani, A. M. A., Esmail, A. K. A., Osman, A. M. E. M., Mohamed, N. A. A., Shentour, S. M. M. A., & Merghani, S. M. A. (2025). The role of machine learning in management of operating rooms: A systematic review. Cureus.
[5]   | Schouten, A. M., Flipse, S. M., Van Nieuwenhuizen, K. E., Jansen, F. W., Van Der Eijk, A. C., & Van Den Dobbelsteen, J. J. (2023). Operating room performance optimization metrics: A systematic review. Journal of Medical Systems, 47(1).

[6]  
Bergs, J., Hellings, J., Cleemput, I., Zurel, Ö., De Troyer, V., Van Hiel, M., Demeere, J., Claeys, D., & Vandijck, D. (2014). Systematic review and meta-analysis of the effect of the World Health Organization surgical safety checklist on postoperative complications. British Journal of Surgery, 101(3), 150–158.

[7]   | Bracken, A., Reilly, C., Feeley, A., Sheehan, E., Merghani, K., & Feeley, I. (2025). Artificial intelligence (AI)-powered documentation systems in healthcare: A systematic review. Journal of Medical Systems, 49(1).
[8]   | Brown, C., Hofer, T., Johal, A., Thomson, R., Nicholl, J., Franklin, B. D., & Lilford, R. J. (2008). An epistemology of patient safety research: A framework for study design and interpretation. Part 1: Conceptualising and developing interventions. BMJ Quality & Safety, 17(3), 158–162.
[9]   | Calegari, R., Fogliatto, F. S., Lucini, F. R., Anzanello, M. J., & Schaan, B. D. (2020). Surgery scheduling heuristic considering OR downstream and upstream facilities and resources. BMC Health Services Research, 20(1).
[10]   | Cappanera, P., Lapucci, M., Schoen, F., Sciandrone, M., Tardella, F., & Visintin, F. (2023). Optimization and decision science: Operations research, inclusion and equity. Springer Nature.
[11]   | Cheng, H., Clymer, J. W., Chen, B. P., Sadeghirad, B., Ferko, N. C., Cameron, C. G., & Hinoul, P. (2018). Prolonged operative duration is associated with complications: A systematic review and meta-analysis. Journal of Surgical Research, 229, 134–144.
[12]   | Gillespie, B. M., Polit, D. F., Hamlin, L., & Chaboyer, W. (2011). Developing a model of competence in the operating theatre: Psychometric validation of the Perceived Perioperative Competence Scale-Revised. International Journal of Nursing Studies, 49(1), 90–101.
[13]   | Hassanain, M., Zamakhshary, M., Farhat, G., & Al-Badr, A. (2016). Use of Lean methodology to improve operating room efficiency in hospitals across the Kingdom of Saudi Arabia. The International Journal of Health Planning and Management, 32(2), 133–146.
[14]   | Kc, D. S., & Terwiesch, C. (2009). Impact of workload on service time and patient safety: An econometric analysis of hospital operations. Management Science, 55(9), 1486–1498.
[15]   | Kiekkas, P., Tsekoura, V., Aretha, D., Samios, A., Konstantinou, E., Igoumenidis, M., Stefanopoulos, N., & Fligou, F. (2019). Nurse understaffing is associated with adverse events in post-anaesthesia care unit patients. Journal of Clinical Nursing, 28(11–12), 2245–2252.
[16]   | Levine, W. C., & Dunn, P. F. (2015). Optimizing operating room scheduling. Anesthesiology Clinics, 33(4), 697–711.
[17]   | Lingard, L. (2004). Communication failures in the operating room: An observational classification of recurrent types and effects. BMJ Quality & Safety, 13(5), 330–334.
[18]   | Lingard, L., Regehr, G., Espin, S., & Whyte, S. (2006). A theory-based instrument to evaluate team communication in the operating room. BMJ Quality & Safety, 15(6), 422–426.

[19]  
May, S. M., Abbott, T. E., Del Arroyo, A. G., Reyes, A., Martir, G., Stephens, R. C., Brealey, D., Cuthbertson, B. H., Wijeysundera, D. N., Pearse, R. M., & Ackland, G. L. (2020). MicroRNA signatures of perioperative myocardial injury after elective noncardiac surgery. British Journal of Anaesthesia, 125(5), 661–671.

[20]   | Moosavi, A., & Ozturk, O. (2020). Metaheuristics for the operating theater planning and scheduling: A systematic review. arXiv. https://arxiv.org/abs/2008.04970.
[21]   | Nilsson, L., Lindberget, O., Gupta, A., & Vegfors, M. (2009). Implementing a pre-operative checklist to increase patient safety. Acta Anaesthesiologica Scandinavica, 54(2), 176–182.
[22]   | Tao, C., & Gao, J. (2016). On building a cloud-based mobile testing infrastructure service system. Journal of Systems and Software, 124, 39–55.
[23]   | Wolf, J. A., Moir, M. J., Hanson, H., Friedman, L. H., & Savage, G. T. (2011). Organization development in healthcare: Conversations on research and strategies. Emerald Group Publishing.
[24]   | Moss, J. (2002). The operating room charge nurse: Coordinator and communicator. Journal of the American Medical Informatics Association, 9(Suppl. 6), S70–S74.
[25]   | Stefanini, A., Aloini, D., & Gloor, P. (2020). Silence is golden: The role of team coordination in health operations. International Journal of Operations & Production Management, 40(9), 1421–1447.
[26]   | Teymoori, E., Zareiyan, A., Babajani-Vafsi, S., & Laripour, R. (2022). Viewpoint of operating room nurses about factors associated with occupational burnout: A qualitative study. Frontiers in Psychology, 13.
[27]   | Amin, M. A., Baldacci, R., & Kayvanfar, V. (2024). A comprehensive review on operating room scheduling and optimization. Operational Research, 25(1).