Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Kinetics of Photocatalytic Degradation of Methylene Blue in Aqueous Dispersions of TiO₂ Nanoparticles under UV-LED Irradiation

S. L. N. Zulmajdi, S. N. F. H. Ajak, J. Hobley, N. Duraman, M. H. Harunsani, H. M. Yasin, M. Nur, A. Usman*

Department of Chemistry, Faculty of Science, Universiti Brunei Darussalam, Jalan Tungku Link, Gadong BE1410, Negara Brunei Darussalam

Abstract: We investigated the degradation of methylene blue (MB) as an organic dye pollutant upon photocatalytic oxidation of TiO₂ nanoparticles under UV-LED (395 nm) light irradiation. Effect of different parameters, including initial concentration of dye and catalyst dosage on the degradation rate of the dye were evaluated. We found that the photonic efficiency of the photocatalytic degradation rate of the dye was determined by the ratio between the initial concentration of the dye and the number of TiO₂ nanoparticles in the colloidal solution. The optimum photocatalytic degradation rate was achieved when the TiO₂ nanoparticles in the solution are well covered by dye molecules, providing an interpretation that MB–TiO₂ molecular interactions play the key role in the photoinduced oxidation and reduction, leading to the photocatalytic degradation. We also demonstrated that the energy activation of the photocatalytic degradation is related to diffusion-controlled reaction, indicating that the photocatalytic degradation of the dyes is diffusion-controlled reaction of free hydroxyl radicals.

Keywords: photocatalysis, methylene blue, degradation, TiO₂ Nanoparticles, temperature effect

Citation: S. L. N. Zulmajdi, S. N. F. H. Ajak, J. Hobley, N. Duraman, M. H. Harunsani, H. M. Yasin, M. Nur, A. Usman, Kinetics of Photocatalytic Degradation of Methylene Blue in Aqueous Dispersions of TiO₂ Nanoparticles under UV-LED Irradiation. American Journal of Nanomaterials, 5 (1). 1-6. January 2017. doi:10.12691/ajn-5-1-1

1. Introduction

Environmental problems have been an increasing concern and worldwide issue, most of them related to the industrial wastes containing toxic and carcinogenic chemicals, such as heavy metal ions and dyes directly discharged into water streams or sewage systems [1]. Without removing the hazardous chemicals, when the polluted water streams go into rivers, the pollutants cause great risks to the aquatic ecosystem, water resources, and then the entire ecosystem inclusive of plants, animals, and humans. Among the hazard chemicals, those from textile dyeing effluents in wastewater have received great attention not only because of its toxicity but mainly due to its aesthetic effect, even at lower concentrations [2]. Therefore, adequate treatments, particularly, an effective removal of dyes from industrial wastes before discharging them into the sewage systems, water recycling systems, and water streams are indispensable.

There have been countless reports focused on the development of chemical, physical, and biological methods with high selectivity for the removal of dyes and other toxic substances from wastewater. The main approach is to utilize adsorption process by employing biosubstances or synthetic materials as adsorbents [3]. The most efficient and widely used adsorbent is activated carbon, but it is sometimes treated as a one-off adsorbent due to the high regeneration cost. On the other hand, biosubstances such as microorganisms and fruit skins have also been demonstrated to remove metal ions and dyes from water. This topic has been reviewed in detail, for instance, by Rafatullah et al. [4], Ngah et al. [5], and Crini [6].

Utilizing advanced oxidation processes, photocatalytic decomposition of the organic pollutants in water via their reactions with generated hydroxyl (OH•) radicals at or near the surfaces of semiconductors, has also received much attention [7-12]. In general, metal oxide semiconductors have been intensively used for photocatalytic applications due mainly to its suitable band energy to the visible light energy to excite their electrons from valence to the conduction band [13,14,15]. This photocatalytic oxidation is of particular interest due to its ability to use the solar, UV, or visible light irradiation, and it can be conveniently used for the complete degradation of various hazardous compounds, converting them into harmless mineral compounds. The pioneer research on this subject was the use of TiO₂ powder for the decomposition of highly polluting cyanide ions in water [16]. Following these studies, photocatalysis using TiO₂ for the degradation of wastewater pollutants has attracted a lot of attention due to its inherent photoactivity, chemical and biological stability, non-toxicity, low cost, and well known synthesis methods. It is known that large crystallites of TiO₂ show poor photocatalytic activities, but their activities are increased when their particle sizes is reduced down to nanometer-scales [17].

In this study, we focus on the degradation of methylene blue (MB) upon photocatalytic oxidation of TiO₂ nanoparticles under UV light irradiation. MB is mainly used as a biological stain due to its ability to color parts of cells and it is helpful in certain medical tests, but as an organic dye, MB is also one of the contaminants and pollutants in the environment which has many effects when it is in the body. Thus, we selected MB, as a model pollutant of cationic dyes. The photocatalytic performance of TiO₂ nanoparticles was assessed by the degradation rate of MB. As we anticipated, the degradation rate of MB depends on the ratio between MB molecules and the number of TiO₂ nanoparticles, providing an interpretation that MB–TiO₂ molecular interactions play the key role in the photoinduced oxidation and reduction.

2. Experimental Section

2.1. Materials

Commercially available rutile TiO₂ nanoparticles and MB dyes (molecular weight = 319.85 g) were purchased from Sigma Chemicals. They were used without further purification. The type of the TiO₂ nanoparticles is nanospheres with diameter and density being 100 nm and 4.23 g/cm³, respectively. The crystalline phase of the TiO₂ nanoparticles was reconfirmed by infrared spectroscopy (Shimadzu, IRPrestise-21) with 2.0 cm⁻¹ spectral resolution, and their morphology, type of nanoparticles, and size were evaluated by a scanning electron microscope imaging (JEOL, JSM-7610F). In order to characterize the electronic and optical properties of the nanoparticles in powder form, we have also measured their UV-vis diffuse reflectance using a single beam spectrophotometer (Hitachi, F-4500) and fluorescence spectra after excitation at 395 nm using a spectrofluorometer (Horiba Scientific). From the spectra, shown in Figure 1, we understand that rutile TiO₂ nanoparticles efficiently absorb photons in the UV region (less than 400 nm or 3.0 eV), as it has been discussed by Reyes-Coronado et al. [18], and the nanoparticles emit light in the visible region between 400 to 550 nm [19] which is strongly overlapped with the absorption spectrum of MB to facilitate efficient energy transfer.

Figure 1. UV-visible reflectance (a) and fluorescence (b) spectra of TiO₂ nanoparticles

2.2. Photoirradiation Setup

Photocatalytic reactions were carried out in a glass tubular reactor (2 cm diameter; 15 mL volume) transparent for UV light, as schematically shown in Figure 2. The tube consisting the reaction mixture of TiO₂ nanoparticles and MB dissolved in distilled water was irradiated with UV light from an LED (powered by a DC power supply of 2 mV), emitting at 395 nm. With this UV light irradiation, we can selectively excite TiO₂ nanoparticles, because MB has a very low extinction coefficient in the spectral range between 350 to 450 nm [2]. During the irradiation, the reaction mixture was also continuously stirred, while dispersion of UV light and disturbance from stray light were carefully blocked.

Figure 2. Schematic diagram of the experiment set-up for photocatalytic reactions

To evaluate the photocatalytic degradation rate, 10.0 mL MB solutions with concentrations of 15.0, 12.5, 10.0, 7.5, 5.0 ppm in distilled water were prepared. In each solution, 20 mg of TiO2 powder were added. The mixtures were illuminated at different irradiation times of 0, 5, 10, 15, 30, 40, 50, 60, 80 and 100 minutes at room temperature (25°C). After the irradiation, the mixture was centrifuged at 3000 rpm for 15 min to separate the particulates. The supernatant was collected and subjected to absorption spectrum measurement using UV-visible spectrophotometer (Shimadzu UV-1601PC, Japan). The concentration of MB left in the solution was calculated from its absorption peak at 665 nm, at which it has an extinction coefficient of 7.4×10⁴ cm-1 mol⁻¹, according to the Beer-Lambert Law. With such high extinction coefficient, concentration of MB in water as low as 1 mg/L or 1 ppm can be accurately detected by the spectroscopic technique [2].

Effect of TiO2 dosage was evaluated by varying the mass of TiO2 in a fixed concentration of MB solutions at room temperature (25°C). In to each solution of 10.0 mL MB solutions (15 ppm), 0‒35 mg of TiO2 were added. The photocatalytic degradation rate was evaluated by the same procedure, namely the mixtures were irradiated at the same light power and irradiation times, followed by centrifugation at the same speed after the irradiation, the supernatant was subjected to absorption spectrum measurement, and the concentration of MB left in the solution was determined from its absorption peak at 665 nm.

Kinetics of the photocatalytic degradation was investigated by evaluating the degradation of MB at different temperatures between 22 to 50 °C. In this case, the glass tubular reactor was placed on temperature-controlled hot plate. The concentration of MB and mass of TiO2 were fixed at 15 ppm and 20 mg, respectively. The photocatalytic degradation rate was evaluated by the same procedure, as described above.

We note that variation in pH of the mixture would change the charges on the surface of the photocatalyst TiO₂ nanoparticles as well as on the organic compounds, leading to variation of photocatalytic degradation rate of the organic compounds. We found that pH of MB solution was 5.5, and it was not changed after mixing with TiO2 nanoparticles or after irradiations. Thus, the pH of the colloidal mixture of MB and TiO2 nanoparticles was kept as it is without any addition of acid or base.

2.3. Data Analysis

All the collected data were analyzed. The subsequent photodegradation of MB was evaluated by analyzing the absorption data which were fitted with single exponential functions, as described below.

3. Results and Discussion

3.1. Photodegradation of MB

Figure 3A representatively shows absorption spectra of MB before and after a series of illumination with UV light. It is clearly observed that the absorbance decreases, demonstrating the degradation of MB, with irradiation time due to the photocatalytic reaction. The photocatalytic reaction pathway is believed to involve the reaction of MB with the generated OH• radicals, resulting in N-demethylation of its auxochromic dimethylamine groups. Such demethylization depredates MB into a compound with a short absorption wavelength, in addition to H₂O and CO₂ [20]. It is noted that the degradation rate of MB is reduced with increasing initial MB concentration, indicating that the photonic efficiency decreases rapidly with increasing initial concentration of MB. This behavior has been reported earlier by Jang et al. [21].

The photocatalytic degradation rate was deduced from the plot of the concentration of MB as a function of irradiation time up to 100 min irradiations, as shown in Figure 3B. For all initial concentrations of MB, the degradation follows the first order reaction, as normally observed in photocatalytic reactions of organic compounds. Therefore, the time-dependent plot was fitted with either a single exponential function, , or a logarithmic function, . Here and is the initial concentration of MB and the concentration of MB after t irradiation time, respectively, and k is the rate constant of the photocatalytic degradation.

Figure 3. (A) A series of absorption spectra of MB after UV light illumination at (a) 0, (b) 5, (c) 30, (d) 60, (e) 80 and (f) 100 mins. (B) The concentration of MB as a function of irradiation time up to 100 min irradiations. The line is the best fit for a logarithmic function, ln [MB]t= -kt+ln [MB]₀, from which k was deduced

As shown in Figure 4, k is smaller for higher , indicating that the photocatalytic degradation tends to be slower for higher . Similar trends of concentration-dependent photocatalytic degradation of MB has been reported by Dariani et al. for MB [17], Dai et al. [22], and Ling et al. [23]. It may not be surprising, in this case, for the same number of both TiO₂ nanoparticles and irradiated photons, the UV light penetrates into the colloidal solution and excites TiO₂ nanoparticles more easily in lower , resulting in more efficient photocatalytic degradation, although collision probability between MB molecules and excited TiO₂ nanoparticles is increased with the concentration of MB. In this sense, we may consider the formation of the by-products during the degradation of MB molecules. At high concentrations of MB, large amount of MB molecules are adsorbed on TiO₂ nanoparticles and absorb more photons of the UV irradiation, resulting in UV screening effect. At such high concentrations of MB, large amount of MB molecules do not have direct contact with TiO₂ nanoparticles neither with the generated OH• radicals, thus preventing them from the successful photocatalytic degradation reactions. Consequently, higher concentrations of MB give lower photonic efficiency. To exemplify further this issue, we have evaluated the photocatalytic degradation of MB at different dosage of TiO₂ as described in the following section.

Figure 4. Plot of k as a function of [MB]₀. The TiO₂ dosage was 20 mg in 10 mL MB solutions

3.2. Effect of TiO₂ Dosage

Figure 5 shows the effect of TiO₂ mass (or the number of nanoparticles) on photocatalytic degradation rate of 15.0 ppm MB within 100-min UV light irradiations. It is clearly observed that the photodegradation rate of MB increases with the mass or number of TiO₂ nanoparticles, however it reaches a maximum, and after which the photodegradation rate tends to decrease with high number of TiO₂ nanoparticles.

Figure 5. Plot of k as a function TiO₂ dosage in 10 mL MB solutions at [MB]₀ 15 ppm

This finding suggests that TiO₂ has a good photocatalytic performance [22,24], thus at higher dosage of TiO₂ there will be a higher probability for the photocatalyst to absorb photons required to generate electrons in the conduction band, leading to the higher concentration of generated OH• radicals which is responsible to degrade the organic compounds [24]. However, it should also be mentioned that the colloidal mixture becomes more turbid at higher density of TiO₂ nanoparticles. Thus, the UV light is readily absorbed at the tubular reactor, and it requires higher light power or larger number of photons to excite the larger number of TiO₂ nanoparticles in the mixture. For the constant power of the UV light, at one state of large quantity of TiO₂ nanoparticles, the photonic efficiency will be saturated and decreased at larger quantity of TiO₂ [25]. Thus, basically, the degradation of MB in the photocatalysis process increases, reaches a maximum, and decreases with increasing TiO₂ dosage.

We note that, under our experimental conditions, the optimum photocatalytic degradation rate of MB was achieved when was 15.0 ppm and mass of TiO₂ nanoparticles was 25.0 mg. As the excitation wavelength is much smaller than the size of TiO2 nanoparticles, we may exclude the effect of light absorption cross section in the colloidal mixtures with different number of the TiO2 nanoparticles. Thus, to understand the optimum condition of the photocatalysis, we consider the coverage of MB on the TiO₂ nanoparticles. Based on molecular weight of MB, density, and size of TiO₂ nanoparticles, we can estimate that the optimum photocatalytic degradation rate is when the ratio between MB molecules and the number TiO₂ nanoparticles is 2.8×10¹⁷:1.1×10¹³ or it is roughly 2.5×10⁴ MB molecules per individual TiO₂ nanoparticles. Though the molecular size of MB⁺ based on van der Waals radii is 112 Å² [26], an effective molecular diameter of such a three membered rings is approximately 1–1.5 nm [27]. Thus, for monolayer coverage of MB on the TiO₂ nanoparticles with diameter of 100 nm, we can estimate that there are also about ~2.5×10⁴ MB molecules adsorbed on the surface of individual nanoparticles. This means the optimum photocatalytic degradation rate was achieved when the TiO₂ nanoparticles in the colloidal solution are well covered by MB molecules. Thus, we can anticipate that the degradation rate becomes slower when the MB molecules and the number of TiO₂ nanoparticles in the colloidal mixtures are not at the optimum ratio. This further provide an interpretation that MB–TiO₂ molecular interactions play the key role in the photoinduced oxidation and reduction, leading to the photocatalytic degradation.

3.3. Temperature Dependence of k

The photocatalytic degradation rate of MB increases with increasing temperature, as shown in Figure 6 for the plot of temperature dependence of the degradation rate. The data points were fitted with Arrhenius equation, , (where A is the pre-exponential factor related to the frequency of successful degradation reaction, is the activation energy, R is the universal gas constant (8.314 J K⁻¹ mol⁻¹), and T is the absolute temperature), giving of the first-order photocatalytic degradation reaction to be 14.03 kJ mol⁻¹. Comparable values (13.09 and 14.45 kJ mol⁻¹) for the decolorization of MB by photocatalysis of TiO₂ nanoparticles can be found in the literature for different temperature ranges and experimental conditions [28,29].

Figure 6. Arrhenius plot of k against inverse temperature, 1/T, of the photocatalytic degradation of MB. The temperature range was 25 to 50 °C, [MB]₀ was 15 ppm, and TiO₂ dosage was 20 mg in 10 mL. The solid line is the best fit, from which the energy of activation for photocatalytic degradation, Ea, was deduced

We may note that the value is much lower than that normally observed for a chemical reaction [30]. To understand this issue, we should consider that the photocatalytic oxidation and reduction process is initiated by photonic activation, rather than by heating [31]. Thus, might be ascribed to the potential barrier of the photocatalytic degradation which is related to diffusion-controlled reaction, where the activated state is a well solvated structure formed between the MB dyes and generated OH• radicals. Thus, we consider that of the photocatalytic degradation should be very close to those of a reaction of OH• radicals. In other words, the photocatalytic degradation of the dyes is controlled by the diffusion and reaction of OH• radicals.

4. Conclusions

Degradation of MB in aqueous solutions upon photocatalytic oxidation of the rutile TiO₂ nanoparticles under UV light irradiation, a system which is a suitable model for wastewater photodegradation under sunlight, has been investigated. As anticipated, the TiO₂ nanoparticles show good photocatalytic activity in decomposing MB. We demonstrated that the photonic efficiency of the photocatalytic degradation of MB is actually determined by the ratio between the initial concentration of MB and the number of TiO₂ nanoparticles in the solution. The optimum photocatalytic degradation rate was achieved when the TiO₂ nanoparticles in the colloidal solution were well covered by MB molecules. This further provide an interpretation that MB–TiO₂ molecular interactions play the key role in the photoinduced oxidation and reduction, leading to the photocatalytic degradation. We found that the first-order photocatalytic degradation reaction of MB is 14.03 kJ mol⁻¹, which should be very close to those of a reaction of OH• radicals, indicating that the photocatalytic degradation of the dyes is diffusion-controlled reaction of OH• radicals.

Acknowledgements

The authors are grateful for research fund provided by Universiti Brunei Darussalam.

Statement of Competing Interests

The authors have no competing interest.

References

[1]   | Peleka, E.N. and Matis, K.A., “Water separation processes and sustainability,” Ind. Eng. Chem. Res. 50, 421-430, 2011.
[2]   | Tayeb, A.M. and Hussein, D.S., “Synthesis of TiO₂ nanoparticles and their photocatalytic activity for methylene blue,” Am. J. Nanomater. 3, 57-63, 2015.
[3]   | Lim, L.B.L., Priyantha, N., Chan, C.M., Matassan, D., Chieng, H.I. and Kooh, M.R.R.,” Investigation of the sorption characteristics of water lettuce (WL) as a potential low-cost biosorbent for the removal of methyl violet 2B,” Desalin. Water Treat. 57, 8319-8329, 2016.
[4]   | Mohd. Rafatullah, M., Sulaiman, O., Hashim, R. and Ahmad, A., “Adsorption of methylene blue on low-cost adsorbents: A review,” J. Hazard. Mater. 177, 70-80, 2010.
[5]   | Ngah, W.S., Teong, L.C. and Hanafiah, M.A.K.M., “Adsorption of dyes and heavy metal ions by chitosan composites: A review,” Carbohydrate Polym. 83, 1446-1456, 2011.
[6]   | Crini, G., “Non-conventional low-cost adsorbents for dye removal: A review,” Bioresource Tech. 97, 1061-1085, 2006.
[7]   | Schiavello, M. (Ed.). Heterogeneous Photocatalysis, Wiley, New York, 1997.
[8]   | Bahnemann, D. in: Boule, P. (Ed.). Handbook of Environmental Photochemistry, Springer, Verlag, 1999, 285-323.
[9]   | Robert, D. (Ed.), Industrial and Environmental Applications of Photocatalysis (special issue), Int. J. Photoenergy, 5, 2003.
[10]   | Pichat, P. in: Ert, G., Knözinger, H. and Weitkamp, J. (Eds.), Handbook of Heterogeneous Photocatalysis, VCH, Weiheim, 1997, 2111-2121.
[11]   | Ollis, D.F. and Al-Ekabi H. (Eds.), Photocatalytic Purification and Treatment of Water and Air, Elsevier, Amsterdam, 1993.
[12]   | Robert, D., Lede, J. and Weber, J.V. (Eds.), Special Issue in Entropie, 2000, no. 228.
[13]   | Chakrabarti, S. and Dutta, B.K., “Photocatalytic degradation of model textile dyes in wastewater using ZnO as a semiconductor catalyst,” J. Hazard. Mater. 112, 269-278, 2004.
[14]   | Behnajady, M.A. and Eskandarloo, H. “Silver and Copper Co–Impregnated onto TiO₂–P₂₅ nanoparticles and its photocatalytic activity,” Chem. Eng. J. 2013, 228, 1207-1213.
[15]   | Jeni, J. and Kanmani, S., “Solar nanophotocatalytic decolorisation of reactive dyes using titanium dioxide,” Iran. J. Environ. Health. Sci. Eng. 8, no. 1, 2011.
[16]   | Fujishima, A. and Zhang, X., “Titanium dioxide photocatalysis: present situation and future approaches,” Chin. Res. Chim. 9, 750-760, 2006.
[17]   | Dariani, R.S., Esmaeili, A., Mortezaali, A. and Dehghanpour, S., “Photocatalytic reaction and degradation of methylene blue on TiO₂ nano-sized particles,” Optik 127, 7143-7154, 2016.
[18]   | Reyes–Coronado, D., Rodriguez–Gattorno, G., Espinosa–Pesqueira M.E., Cab, C., de Coss, R. and Oskam G. Phase–Pure TiO₂ Nanoparticles: anatase, brookite, and rutile. Nanotechnology 19, 145605–145614, 2008.
[19]   | Mishra, G., Farida, K.M. and Singh, S.K. Solar light driven Rhodamine B degradation over highly active -SiC-TiO₂ nanocomposite. RSC Adv. 4, 12918-12928, 2014.
[20]   | Zhang, T.Y., Oyama, T., Aoshima, A., Hidaka, H., Zhao, J.C. and Serpone, N., “Photooxidative N-demethylation of methylene blue in aqueous TiO2 dispersions under UV irradiation,” J. Photochem. Photobiol. A 140, 163-172, 2001.
[21]   | Jang, H.D., Kim, S.K. and Kim, S.J. “Effect of particle size and phase composition of titanium dioxide nanoparticles on the photocatalytic properties,” J. Nanopart. Res. 3. 141-147, 2001.
[22]   | Dai, K., Lu, L. and Dawson, G., “Development of UV-LED/TiO₂ device and their application for photocatalytic degradation of methylene blue,” J. Mater. Eng.Perform. 22 1035-1040, 2013.
[23]   | Ling, C. and Mohamed, A., “Photo degradation of methylene blue dye in aqueous stream,” J. Technol. 40, 91-103, 2004.
[24]   | An, T.C. Zhu, X.H. Xiong, Y., Feasibility study of photo electrochemical degradation of methylene blue, Chemosphere 46, 897-903, 2002.
[25]   | Wu, R.J., Chen, C.C., Chen, M.H. and Lu, C.S., “Titanium dioxide-mediated heterogeneous photocatalytic degradation of terbufos: parameter study and reaction pathways,” J. Hazard. Mater. 162, 945-953, 2009.
[26]   | Simoncic, P. and Armbruster, T., “Cationic methylene blue incorporated into zeolite mordenite-Na: A single crystal X-ray study,” Micropor. Mesopor. Mat. 81, 87-95, 2005.
[27]   | Murphy, S., Huang, L., and Kamat, P., “Charge-transfer complexation and excited-state interactions in porphyrin-silver nanoparticle hybrid structures,” J. Phys. Chem. C 115, 22761-22769, 2011.
[28]   | Benetoli, L. O. de B., Cadorin, B. M., Postiglione, C. da S., de Souza, I.G., and Debacher, N.A., “Effect of temperature on methylene blue decolorization in aqueous medium in electrical discharge plasma reactor,” J. Braz. Chem. Soc., 22, 1669-1678, 2011.
[29]   | Lee, B.-N, Liaw, W.-D., and Lou, J.-C., “Photocatalytic decolorization of methylene blue in aqueous TiO₂ suspension,” Environ. Eng. Sci. 16, 165-175, 1999.
[30]   | Wu, C. H. and Chern, J. M., “Kinetics of photocatalutic decomposition of methylene blue,” Ind. Eng. Chem. Res. 45, 6450-6457, 2006.
[31]   | Ling, C. M., Mohamed, A. R. and Bhatia, S., “Performance of photocatalytic reactors using immobilized TiO₂ film for the degradation of phenol and methelene blue dye present in water, Chemosphere 57, 547-554, 2004.