Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

The Bacteriology and Physico-chemical Parameters of Microcosms Used for Depuration of Mangrove oyster (Crassostrea gasar) Harvested from the Estuary of Rivers State, Nigeria

B.J.O. Efiuvwevwere*, L.O. Amadi

Department of Microbiology (Ofirima Complex), University of Port Harcourt, Port Harcourt, Nigeria

Abstract: Changes in the physico-chemical and bacteriological attributes of mangrove oysters subjected to depuration process on daily basis for 4days in brackish and tap water microcosms were determined. There were progressive decreases in the brackish water (BW) salinity (20.3-11.5ppt), dissolved oxygen (DO) (7.0-6.0mg/l) and conductivity (32.1-19.4x10³µS/cm) and increases in BOD (2.1-4.0mg/l) and turbidity (1.0-5.5NTU) whereas pH and temperature fluctuated between 6.6 and 7.2 and 26.5°C and 30.0°C respectively. In contrast, there were marked increases in the salinity (0.1-1.0ppt) and turbidity (0.5-1.5NTU) with decreases in DO (7.0-4.9mg/l) and BOD (3.8-1.0mg/l) whereas conductivity, pH and temperature were relatively constant in the tap water (TW) microcosm. The microorganisms isolated from the samples varied with the most heterogeneous genera; Bacillus, Pseudomonas, Vibrio, Enterobacter, Staphylococcus, Escherichia, Proteus, Lactobacillus, Acinetobacter and Micrococcus occurring in the BW and the least (7 genera) in the TW microcosm. The results indicate that changes in the physico-chemical parameters of the microcosms impacted adversely on the bacterial quality of mangrove oysters during depuration. The bacterial population dynamics and profiles obtained using the two microcosms have demonstrated the benefits of depuration on the potential health risk/safety of oysters prior to consumption.

Keywords: Gbolokiri, depuration, microcosms, estuary, bacterial profliles

Citation: B.J.O. Efiuvwevwere, L.O. Amadi, The Bacteriology and Physico-chemical Parameters of Microcosms Used for Depuration of Mangrove oyster (Crassostrea gasar) Harvested from the Estuary of Rivers State, Nigeria. American Journal of Microbiological Research, 3 (6). 184-189. January 2015. doi:10.12691/ajmr-3-6-2

1. Introduction

There is growing scientific interest in understanding the physico-chemical and bacteriological profiles of estuaries or brackish water ecosystems of the Niger Delta region of Nigeria [1,2,3]. The intertidal mudflat of brackish water is the habitat of mangrove oysters. Bivalve shellfish feed by filtering large volumes of brackish water and bioaccumulate food particles [4] and microbial pathogens from the surrounding environment [5,6]. These microorganisms may present a potential health risk when consumed with raw or lightly cooked shellfish. Contaminated shellfish by industrial, sewage and other anthropogenic inputs may be cleansed by depuration as a shellfish food safety strategy [7,8].

However, the physico-chemical parameters of the habitats are also major determinants of the distribution and composition of the bacterial community [9,10,11]. The efficacy of depuration depends on a number of variables such as the initial health status of the shellfish, environmental parameters within the depuration system, the types of pathogens and level of contamination [7,12]. Currently, more attention is being given to depuration protocols [8] but with little focus on the dynamics of the physico-chemical factors during depuration.

The objective of this study was to determine the physico-chemical parameters and the bacterial profiles of mangrove oysters, brackish and tap water microcosms in a static depuration system and its potential benefits.

2. Materials and Methods

2.1. Study Site and Sample Collection

The mangrove oysters and brackish water samples were collected at both low and high tides from the Gbolokiri creek (at Rumuorlumeni) of the New Calabar River (NCR), Nigeria. The estuary consists of inter-connecting creeks that link up the lower reaches of the NCR. All samples were collected and transported to the laboratory and analyzed within 3-4hours.

2.2. Depuration of Mangrove Oysters

Mangrove oysters (200) were randomly collected and washed thoroughly under running tap water and then placed in a sterile rectangular plastic container of 50x35x28cm dimension. Oysters (20) were shucked and analysed at zero-hour bacterial load. The remaining oysters (180) were depurated in 15L of clean brackish and tap water microcosms and the water samples changed at intervals of 24-hours following the method of Chinivasagam [13] for 4days. The water samples and oysters were subjected to bacteriological and physico-chemical analyses.

2.3. Bacteriological Analysis

Serial dilutions of the water samples were spread-plated in duplicate on surface-dried plate count agar (Scharlau Chemie S.A. Spain) supplemented with 1.0% NaCl [14] and incubated at 37°C for 24hours [15] to determine aerobic plate counts (APCs). Preparation of serial dilutions was carried out by blending 25g of oyster meat in 225mL 0.1N alkaline peptone water to obtain a (10⁻¹) homogenate. Serial dilutions were also prepared for oysters, brackish and tap water samples every 24hours and analysed for bacterial profiles. Total viable colonies (30-300) were enumerated as colony forming units (CFUs).

Coliforms including Escherichia coli colonies were determined on MacConkey agar (Oxoid) using the spread plate method and duplicate plates were incubated at 37°C for 18-24hours. Vibrio colonies were determined on surface-dried thiosulphate-citrate-bile-salt-sucrose agar (Lab M Ltd, UK) using spread-plate method and duplicate plates were incubated at 37°C for 18-24hours.

Identification of bacterial isolates was carried out based on their cultural, morphological and biochemical characteristics [16,17,18].

2.4. Physico-chemical Analyses of Brackish and Tap Water Samples

The brackish water (BW) samples collected at low and high tides were analysed for several physico-chemical parameters including salinity (‰), pH, turbidity and conductivity as described in Horiba U-10 Instruction Manual [19]. Dissolved oxygen (DO) and Biochemical Oxygen Demand (BOD) were determined using the Modified Azide or Winkler’s method in American Public Health Association (APHA) [20]. The temperature of the water samples was determined by immersion of a hand-held mercury-in-glass thermometer. The brackish and tap water samples used for depuration were subjected to the same physico-chemical analysis.

2.5. Statistical Analysis

Data are presented as mean ± standard deviation (SD). The one way analysis of variance (ANOVA) was used to analyse obtained data for significant differences using SPSS Inc., 2007.

3. Results

The changes in salinity and DO of brackish and tap water microcosms during depuration in dry and rainy seasons are presented in Figure 1. There was an initial increase in the salinity of BW followed by decreases after day 1 of depuration in the dry and rainy seasons. Similar trends were observed with the TW sample but with much lower salinity values. The DO values of BW decreased throughout the depuration period as well as those of TW in the rainy and dry seasons respectively.

Figure 1. Changes in salinity and DO in brackish and tap water microcosms collected seasonally for oyster depuration. Shaded symbol = Rainy season samples; Unshaded symbol = Dry season samples. Values represent the mean of four determinations. Error bars represent standard deviations of four determination

The pH values were relatively stable in both the BW and TW microcosms during depuration (Figure 2). There was some degree of disparity with the conductivity values of BW during depuration; a high peak was observed on day 3 in the dry season as against absence of peak in the rainy season (Figure 2). The conductivity values were higher during the dry season than in the rainy season.

Figure 2. Changes in pH and conductivity of brackish and tap water microcosms collected seasonally for oyster depuration. Shaded symbol = Rainy season samples; Unshaded symbol = Dry seasons samples Values represent the mean of four determinations. Error bars represent standard deviations of four determinations

The BW temperature was higher during the dry season than during the rainy season but was relatively stable during depuration (Figure 3). Similar findings were observed with the TW (Figure 3). There was a sharp increase in BW turbidity as opposed to TW during depuration in the rainy and dry seasons respectively.

Figure 3. Changes in temperature and turbidity of brackish and tap water microcosms collected seasonally for oyster depuration. Shaded symbol = Rainy season samples; Unshaded symbol = Dry seasons samples. Values represent the mean of four determinations. Error bars represent the standard deviations of four determinations

There were initial sharp decreases in BOD values for both samples and thereafter followed by progressive increases after day 1 for the BW and decreases for the TW in BOD values for both seasons respectively (Figure 4).

Figure 4. Changes in BOD of brackish and tap water microcosms collected seasonally for oyster depuration. Shaded symbol = Rainy season samples; Unshaded symbol = Dry seasion samples. Values represent the mean of four determinations. Error bars represent standard deviations of four determinations

In general, there were decreases in bacterial loads between days 0 and 1 followed by progressive increases except for E. coli (Table 1 and Table 2). Evidently, the APCs, CCs and VCs were higher for the dry season than those for the rainy season for both BW and TW. Comparatively, the APCs of oysters depurated in TW microcosm were higher than those of BW irrespective of seasons.

Table 1. Bacterial population (cfu/g) dynamics of oysters depurated in brackish and tap water microcosms during rainy season

Table 2. Bacterial population (cfu/g) dynamics of oysters depurated in brackish and tap water microcosms during dry season

The bacteria isolated from the samples are shown in Table 3. The most diverse bacterial genera occurred in the brackish water while the least diverse was observed in the tap water microcosms.

Table 3. Bacterial flora isolated from tap water, oyster and brackish water samples during depuration

4. Discussion

The results of this investigation indicate that appreciable changes occurred in the physico-chemical parameters, bacterial profiles of the microcosms and the oyster samples (Figure 1-Figure 4 and Table 1-Table 3). The progressive decreases in salinity during depuration of oysters in both microenvironments may be related to the ability of bivalves to assimilate substances from their environment, digest and discharge some in form of pseudofaeces [21,22]. The decreases in DO in both microcosms during depuration may not be unconnected with the presence of materials of high organic content leading to oxygen depletion (Figure 1). The occurrence of DO deficit is indicative of deoxygenation rate due to higher biological decomposition of organic matter compared with reoxygenation from the microenvironment or may be due to the presence of oxidizable minerals in the microcosms of stagnant water which has been reported by previous workers [23,24,25]. The DO of not less than 2.0mg/l has been recommended [22] as conducive for depuration of bivalve. Thus, the DO values observed in the depuration microcosms were adequate for the oysters.

The relatively stable pH values of both microenvironments may be attributed to the activities of microorganisms which make their environment more alkaline by generating ammonia through amino acid degradation or production of acidic or basic metabolic waste products [7,26,27].

The increase or fluctuation in conductivity values of the brackish water microenvironment may be due to the concentration of ions by evaporation, coupled with increased mineralization of organic matter in the stagnant unagitated water. On the other hand, the relatively stable conductivity values of TW microenvironment could be attributed to poor conductivity and ionic concentration while those of the BW reflect the status of inorganic constituents [25]. The concentrations of ions of metals and nonmetals have been earlier reported to affect the metabolism of bacteria and higher organisms in brackish water [28]. This may partly explain the shorter shelf-life of oysters in TW than in BW during the depuration.

Similarly, the consistent temperatures observed throughout depuration suggest their probable beneficial effects on the ecology of oysters and their sustainability. But the progressive increases in turbidity of both water bodies may not be unrelated to the metabolic activity of organisms and the discharge of pseudofaeces in the microenvironment. In addition, the natural status of the water used for depuration may contribute to changes in turbidity. Lio-Po [22] had earlier reported 77NTU as the maximum allowable turbidity in a depuration system and the results obtained in this work are lower and hence adequate for the physiological activities of the oysters.

The observed increases in BOD (Figure 4) in the BW microenvironment could be related to rapid biological depletion of organic matter as a result of proliferation of diverse bacterial groups (Table 3). In contrast, the decrease in BOD of TW microcosm may not be unconnected with the composition of the medium and the bacterial content. Consequently, the poor activity of oysters in TW may be related to the influence of physico-chemical parameters and these may explain the higher bacterial loads in TW than in BW microcosms (Table 1 and Table 2).

Depuration has been one the strategies used in eliminating oyster-associated bioindicators, microbial pathogens and viruses [6,8,28] and therefore constitutes a veritable tool for assessing and achieving microbial safety of oysters. The APCs in oysters depurated in BW and TW microcosms during the dry season were comparatively higher than in the rainy season (Table 1 and Table 2) most probably due to evaporation effects. The apparent decreases in APCs following day 1 of depuration were indicative of the beneficial effects associated with purification of contaminated shellfish [7,27,29]. The increases in APCs after day 1 may be attributed to selective mechanism which operates in the gut and intervalvular fluid of oysters that favours the retention and multiplication of some microorganisms such as gram-positive cocci and Vibrio species [30,31].

The present work has also shown that coliforms, especially E. coli were not selectively retained in the gut but were readily eliminated from the oyster during depuration such that E. coli became undetectable after day 1 (Table 1 and Table 2). This corroborates the findings earlier reported by other workers [31,32]. The reduction in APCs and CCs in BW microcosms than in TW used for oyster depurations in both rainy and dry seasons (Table 1 and Table 2) further confirms the beneficial impacts of BW in terms of enhanced microbial safety.

5. Conclusions

The physico-chemical parameters of the microcosms influenced the diversity and composition of bacterial flora as well as the activity and viability of the oysters. However, this study has provided baseline information on the range of physico-chemical parameters needed to understand the dynamics of bacterial communities available in the depuration system. It also showed that the conditions affecting oyster activity during depuration in the microcosms drastically affect the profiles and manner of bacterial elimination.

References

[1]   | Amadi, L.O. and Efiuvwevwere, B.J.O. Seasonal variations in physico-chemical and bacteriological parameters of Ogodogbo creek, Niger Delta Nigeria. International Journal of Environment and Bioenergy, 2015, 10(2):94-106.
[2]   | Edun, O. M. and Efiuvwevwere, B.J.O. Bacterial profiles and physico-chemical parameters of water samples from different sites of the New Calabar River, Nigeria. Sustainable Agriculture Research, 2012, 1(2):162-169.
[3]   | Odokuma, L.O. and Ijeoma, S.O. Seasonal changes in the heavy metal resistant Bacterial population of the New Calabar river, Nigeria. Global J. Pure and Applied Sciences, 2003, 9 (4): 425-433.
[4]   | Iwamoto, M., Ayers, T., Mahon, B.E. and Swerdlow, D.L. Epidemiology of Seafood-Associated Infections in the United States. Clin. Microbiology Reviews, 2010, 23(2):399-411.
[5]   | Hatha, A.A.M., Christi, K.C., Singh, R. and Kumar, S. Bacteriology of the fresh water bivalve clam Batissa violacea (Kai) sold in the Suva market. The South Pacific J. Nat. Sci. 2005, 23: 48-50.
[6]   | Lee, R., Younger, A. and Dorẻ, B. Emerging Issues in Water and Infectious Disease Series- Safe Management of Shellfish and Harvest Waters. Eds. G. Rees, 2010.
[7]   | Obodai, E.A., Nyarko, H.D. and Amponsah, S.L. Effect of depuration on microbial content of mangrove oyster (Crassostrea tulipa, L) from Benya Lagoon, Ghana. Ethiopian Journal of Environmental Studies and Management, 2010, 3(2): 47-53.
[8]   | Scottish Aquaculture Research Forum (SARF). SARF066/FD3.0 Review and cost-benefit analysis for industry of reduced depuration times for the mussel Mytilus edulis. Published by SARF, UK. http://www.sarf.org.uk, 2011.
[9]   | Yannarell, A.C. and Triplett, E.W. Within and between lake variability in the composition of bacterioplankton communities: Investigations using multiple spatial scales. Applied Environ Microbiol., 2004, 70:214-223.
[10]   | Hahn, M.W. The microbial diversity of inland water. Curr. Opin. Biotechnology, 2006, 17: 256-261.
[11]   | Wu, Q. L. and Hahn, M.W. Differences in structure and dynamics of Polynucleobacter communities in a temperate and a subtropical lake revealed at three phylogenetic levels. FEMS Microbiol. Ecol., 2006, 57:67-79.
[12]   | Jackson, K.L. and Ogburn, D.M. Review of depuration and its Role in Shellfish Quality and Assurance. Final report to Fisheries Research and Development Corporation- Project No. 96/355, 1999.
[13]   | Chinivasagam, H.N. Status of Sanitation and Marketing of Mollusc in Sri Lanka. In: FAO Corporate Document Repository. Report of the workshop and study tour on mollusc sanitation and marketing. Regional seafarming development and demonstration project RAS/86/024. France, 1989.
[14]   | Dalgaard, P. Freshness, Quality and Safety in Seafoods. FLAIR-FLOW Europe Technical Manual. F-FE 380A/00. EU- funded projects, 2000.
[15]   | Anon. Standard Methods for the Examination of Water and Wastewater, 16th ed. Washington, DC, U.S.A, 1985.
[16]   | Cowan, S.T. and Steel, K.J. Manual for the identification of medical bacteria 2nd edn. Cambridge University Press, Cambridge, 1974.
[17]   | Harrigan, W.F. and McCance, M.F. Laboratory Methods in Food and Dairy Microbiology. Academic Press, London, UK, 1976.
[18]   | Sneath, P.H.A., Mair, N.S., Sharpe, M.E. and Holt, J.G. Bergey’s Manual of Systemic Bacteriology,Vol 2, Williams and Wilkins, Baltimore, MD, USA, 1986.
[19]   | Horiba Instruction manual. Water Quality checker U-10 2nd edn. Tokyo, Japan, 1991, pp. 54-67.
[20]   | American Public Health Association Standard methods for the examination of water and wastewater 18th edn. American Public Health Association, Washington, DC. U.S.A, 1992.
[21]   | Quayle, D.B., Tropical Oysters: Culture and Methods. Ottawa, Ontario, IDRB-TSITE, 1980, p 80.
[22]   | Lio-Po, G. Post-Harvest Technology of Commercially Important Bivalves. Selected papers on mollusk culture. In: FAO Document Repository. FAO Regional seafarming Development and Demonstration Project (RAS/90/002), 1990.
[23]   | Das, J. and Acharya, B.C. Hydrology and assessment of lotic water quality in Cuttack City, India. Water, Air and Soil Pollution, 2003, 150:163-175.
[24]   | Gasim, M.B., Ismail, B.S., Toriman, E., Mir, S.I. and T. C. Chek. A Physico-chemical Assessment of the Bebar River, Pahang, Malaysia. Global Journal of Environmental Research, 2007, 1(1):7-11.
[25]   | Tukura, B. W., Gimba, C. E. Ndukwe, I. G. and Kim, B. C. Physico-chemical characteristics of water and sediment in Mada River, Nasarawa state, Nigeria. Int. J. Environ. Bioenergy, 2012, 1(3): 170-178.
[26]   | Prescott, L.M., Harley, J.P. and Klein, D.A. Microbiology, 3rd edn. WCB Wm. C. Brown Publishers, U.S.A, 1996, pp. 880-885.
[27]   | Efiuvwevwere, B.J.O. and Ezeama, C.F. The bacteriological profiles of freshwater snail (Pila ovata) subjected to microcosms simulating local storage conditions. World Journal of Microbiology and Biotechnology,2004, 20: 359-363.
[28]   | Gill, O.N., Cubitt, W.D., McSwiggan, D.A., Watney, B.M. and Bartlett, C.L. Epidemic of gastroenteritis caused by oyster contaminated with small round Structured viruses. Br Med J (Clin Res Ed), 1983, 287(6404):1532-1534.
[29]   | Murphree, R.I. and Tamplin, M. L. Uptake and retention of Vibrio chlorae 01 in the Eastern Oyster, Crassostrea virginica. Applied and Environmental Microbiology, 1995, 61, 3656-3660.
[30]   | Vasconcelos, G. J. and Lee, J.S. Microbial Flora of Pacific Oysters (Crasssostrea gigas) subjected to Ultraviolet-Irradiated Seawater. Applied Environmental Microbiology, 1972, 23(1):11-16.
[31]   | Maalouf, H., Zakhour, M., Le Pendu, J., Le Saux, J-C. Almar, R. and Le Guyader, F.S. Distribution in Tissue and Seasonal variation of Norovirus Genogroup I and II Ligands in Oysters. Applied and Environmental Microbiology, 2010, 76(16):5621-5630.
[32]   | Souness, R.A. and Fleet, G.H. Depuration of the Sydney rock oyster (Crassostrea commercialis). Food Technology Australia, 1979, 31:397-404.