Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Recurrence of Gerbode Defect despite Surgical Repair in a Patient with Bacterial Endocarditis

Sufyan AbdulMujeeb*, Faisal Masood, Syed Hussain, Adib Chaus

Department of Internal Medicine, Advocate Lutheran General Hospital, Park Ridge, IL, USA

Abstract: Gerbode defect refers to an abnormal communication of the left ventricle (LV) with the right atrium (RA), causing a severe left-to-right shunt. Symptoms of gerbode defect depend on the degree of communication between LV and RA. This defect can be congenital or acquired. Some etiologies of acquired gerbode defect include cardiac trauma, myocardial ischemia, a complication of prior cardiac surgery, or bacterial endocarditis. Regardless of the etiology, surgical intervention involving the closure of the defect is the definitive treatment of this rare anatomical anomaly. We present the case of a young man with an acquired gerbode defect as a complication of bacterial endocarditis for which he underwent surgical correction. He later had a recurrence and worsening of left-to-right shunt via the gerbode defect a few days after the first surgery, requiring another surgical intervention. To our knowledge, recurrence of this defect after a surgical repair has so far not been reported in the literature. Therefore, we conclude that patients presenting with symptoms of severe right heart failure in whom prior surgical repair of the gerbode defect is performed should prompt clinicians to rule out recurrence of this defect.

Keywords: Gerbode defect, AV block, Left-to-right shunt, Hepatic congestion, right heart failure

Received March 04, 2021; Revised April 07, 2021; Accepted April 16, 2021

Citation: Sufyan AbdulMujeeb, Faisal Masood, Syed Hussain, Adib Chaus, Recurrence of Gerbode Defect despite Surgical Repair in a Patient with Bacterial Endocarditis. American Journal of Medical Case Reports, 9 (7). 372-374. January 2021. doi:10.12691/ajmcr-9-7-8

1. Case Report

A 25-year-old relatively healthy male presented to the hospital complaining of chest pain for 5 days. Prior to chest pain, the patient was experiencing fever, chills, myalgia, shortness of breath. EKG performed at the time showed first-degree AV block and physical exam was significant for a grade III/VI holosystolic murmur. Transthoracic Echocardiogram (TTE) performed showed flail aortic leaflet concerning for a vegetation, evidence of ventricular septal defect (VSD), moderate to severe aortic insufficiency (Figure 1). One of two blood cultures was positive for methicillin-sensitive Staph. Aureus (MSSA) and he was being treated with vancomycin and gentamicin initially which was later modified to oxacillin after cultures and sensitivities were complete. A repeat echo two days later revealed worsening of aortic insufficiency, persistent VSD, and moderate purulent pericardial effusion (Figure 2). The patient had no history of abnormal heart valves, congenital cardiac defects, intravenous drug use, or recent dental procedure.

During his admission, the first-degree AV block slowly progressed to a third-degree AV block. The patient subsequently underwent surgery for repair of VSD, and aortic insufficiency. During the surgery, the patient was found to have a large hemorrhagic pericardial effusion, large vegetation on the aortic annulus, and a sizable VSD in the region of the membranous septum, which was later identified as having direct communication between left ventricular outflow tract (LVOT) and RA (Gerbode defect) (Figure 3). Inspection of the aortic valve revealed complete destruction of the right non-coronary leaflets. The annulus of the aortic valve in that area was also damaged. The tricuspid valve looked relatively uninvolved. A segment of autologous pericardial tissue was used to patch the VSD. A 24 mm homograft was used for aortic root replacement. Echocardiogram performed after the surgery showed mild aortic insufficiency, trivial peri-valvular regurgitation, and no VSD. Postoperatively, there was a discussion of a possible AV synchronous permanent pacemaker placement (PPM), but the patient spontaneously converted to sinus rhythm and appeared to have some conduction recovery without the need for a PPM. He was later discharged home on a 14-day extended cardiac monitor.

He returned to the hospital 10 days later complaining of palpitations in his chest and neck along with dyspnea on exertion. His physical exam was significant for tachycardia, a harsh grade V/VI holosystolic murmur across the entire precordium, a unilateral pulsating right sided jugular venous distension (JVD), and a pulsating liver. He was also found to have some right upper quadrant abdominal pain. Continuous telemetry morning showed variable heart block ranging from Mobitz type I to third-degree AV block. A repeat TTE showed moderate aortic regurgitation, the flow of blood from around the aortic valve prosthesis into the RA suggestive of recurrent gerbode defect, and severe tricuspid regurgitation with a mobile vegetation on the tricuspid septal leaflet. Patient then underwent transesophageal echocardiogram (TEE) for further examination and was found that the tricuspid vegetation that was identified on TTE was, in fact, a dehisced patch repair of the gerbode defect in the RA with a recurrence and worsening of VSD from LVOT to RA (Figure 4 & Figure 5). He subsequently underwent his second cardiac surgery with replacement of the aortic valve and root with a 23 mm homograft valve conduit and a bovine pericardial patch repair of the VSD along with tricuspid valve repair. Postoperatively, he continued to remain in complete heart block and subsequently underwent placement of Micra leadless PPM a few days after the surgery.

Figure 1. TTE with parasternal long axis showing flail aortic leaflet and purulent pericardial effusion

Figure 2. TTE parasternal long axis showing severe aortic regurgitation and persistent VSD

Figure 3. Surgical image showing the VSD between the LV and RA

Figure 4. TEE 4 chamber view showing vegetation on the tricuspid valve and the VSD

Figure 5. TEE long axis view of the LVOT at 135 degrees showing the LV to RA defect and VSD

2. Discussion & Conclusion

Gerbode defect is an extremely rare cardiac anatomical anomaly that refers to an abnormal connection and shunting of blood from LV to RA. The defect can be congenital or acquired later in life due to trauma, prior cardiac surgery, myocardial infarction, or endocarditis [1]. There have been a few documented reports of this abnormal shunting dating as far back as 1838, but it wasn’t until 1958 that Gerbode et al. coined the term “Gerbode defect” describing it as an anatomical defect in the ventricular-septal wall with an associated defect in the septal leaflet of the tricuspid valve [2]. The exact mechanism of acquired gerbode defect due to endocarditis is still under debate, but it is hypothesized that colonization of the valve leaflets by the offending microbial agent erodes through the septal leaflet of the [tricuspid] valve and also through the AV septum causing a direct communication between the left ventricle and RA [2,3].

Symptoms of this defect vary widely depending on the degree of communication between the two chambers. Some people can be asymptomatic while others with a larger defect can manifest symptoms of severe right heart failure such as, dyspnea on exertion, chest pain, lower extremity edema, etc [4]. A physical exam can be strikingly remarkable for a harsh holosystolic murmur heard throughout the precordium [5]. In addition to this murmur, our patient also demonstrated a unilateral (right-sided) pulsating jugular vein that was thought to be directly reflecting the LV pressures [6]. Due to the severe left-to-right shunt in our patient, he was also found to have a pulsating liver, thought to be due to liver engorgement and hepatic congestion [6]. Some degree of AV block is also associated with Gerbode defect, most likely due to the disruption of the electrical conduction system and close proximity of the defect to the AV node [4]. Definitive treatment of this defect includes surgical closure of the LV-RA communication and as noted per Prifti et al., recurrence of the defect after a surgical repair has not been reported so far [3].

We conclude that, although rare, gerbode defect can recur despite surgical correction, and patients presenting with symptoms of right heart failure, especially younger ones with a history of prior surgical correction of the gerbode defect, should prompt clinicians to rule out the possibility of recurrence of the communication between LV and RA. Perhaps recurrence occurs due to the repair being challenging given the friable nature of the tissue.

Financial Source

No financial source was provided for this manuscript.

Disclosure

There are no actual or potential conflict of interest in relation to this manuscript.

References

[1]   | Velebit V, Schöneberger A, Ciaroni S, Bloch A, Maurice J, Christenson JT, et al. "Acquired" left ventricular-to-right atrial shunt (Gerbode defect) after bacterial endocarditis. Tex Heart Inst J. 1995; 22(1): 100-2. PMID: 7787460; PMCID: PMC325219.
[2]   | Barclay RS, Reid JM, Coleman EN, Stevenson JG, Welsh TM, McSwan EN. Communication between Left Ventricle and Right Atrium. Thorax, 1967, https://thorax.bmj.com/content/thoraxjnl/22/5/473.full.pdf.
[3]   | Prifti E, Ademaj F, Baboci A. et al. Acquired Gerbode defect following endocarditis of the tricuspid valve: a case report and literature review. J Cardiothorac Surg 10, 115 (2015).
[4]   | Saker E, Bahri GN, Montalbano MJ, Johal J, Graham RA, Tardieu GG, Loukas M, Tubbs RS. Gerbode defect: A comprehensive review of its history, anatomy, embryology, pathophysiology, diagnosis, and treatment. J Saudi Heart Assoc. 2017 Oct; 29(4): 283-292.
[5]   | Taskesen, T., Prouse, A.F., Goldberg, S.L. et al. Gerbode defect: Another nail for the 3D transesophageal echo hammer? Int J Cardiovasc Imaging 31, 753-764 (2015).
[6]   | AbdulMujeeb S, Hussain S, Chaus A. Singing the “Hole” Song - Pulsating Right Jugular Vein and Liver Due to a Severe Gerbode Defect. Clin Image Case Rep J. 2021; 3(2): 140.