Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Optimising a Fusarium solani Biofilm Formation Protocol in Vitro

Marwan Y. Al-Maqtoofi

Department of Biology, College of Sciences, University of Basrah, 61004, Iraq

Abstract: Opportunistic fungi belonging to the Fusarium solani have become increasingly recognised as life-threatening pathogens causing keratitis and disseminated fusariosis among both healthy individuals and patients with haematological malignancies. These infections are associated with biofilm formation on different biotic and abiotic surfaces. Considering, a biofilm is a virulence factor for causing infections, the aim of this study optimising and illustrating a simple, cost-effective and highly reproducible 96 well microtitre-based method for F. solani biofilm formation via using crystal violet stain. The results revealed that the possibility of using either 570nm or 595nm as a wavelength for quantifying fungal biofilm formation. The best time for crystal violet de-staining was 10 min of incubation. This model can be used in-vitro to quantify and understand the virulence factor of fungal biofilm during infections, and for antifungal susceptibility testing.

Keywords: Biofilm formation, Fusarium solani, fungi, crystal violet, 96 well microtitre plates

Received August 09, 2018; Revised October 02, 2018; Accepted October 16, 2018

Citation: Marwan Y. Al-Maqtoofi, Optimising a Fusarium solani Biofilm Formation Protocol in Vitro. American Journal of Infectious Diseases and Microbiology, 6 (2). 62-65. January 2018. doi:10.12691/ajidm-6-2-5

1. Introduction

Fusarium solani is responsible for more than 60% of Fusarium biofilm-related infections (fusariosis) among immunocompromised individuals [1,2]. This infection is challenging to treat due to the ability of pathogenic fungi for developing extensive biofilm leading to enhance drug resistance properties against common antifungal treatments, also, to absorb the stress of physical and biological [3]. Since fungal plankton cells require adhesion and colonisation on a synthetic surface such catheter or host tissue, biofilm initiates and expands allowing developing a highly structured community that microbial cells are integrated and enclosed within a protective extracellular matrix [4].

Conventionally, plating methods are considered the primary way for fungal biofilm quantification via inoculation on plates and counting recovered colony forming units in vitro [5]. Besides time and media wasting, these methods have a variable range of estimation and less accuracy to assess biofilm biomass [6]. Recently, quantification of microbial biofilm mass based on staining propagules matrix using 96 well-plate microtiter-based methods have been used widely for fungal biofilm production assays as can be used for screening large scale of samples at once with high accuracy resulting in reduction the estimation errors [7,8,9,10]. In addition, these techniques offer necessary data for investigating antifungal susceptibility [11,12].

In comparing with the high volume of bacterial biofilm studies, there is a little attention has been paid to medically biofilm-related fungi [13,14].

Based on our knowledge this study is the first work that focuses on optimising a model for biofilm production in vitro for human pathogenic F. solani based on forming biofilm in 96 well-microtiter plates and then staining with crystal violet. This model is efficient inaccuracy, cost-effective, easy to perform for many biological assays and can be used for any fungal species including filamentous and yeasts forms.

2. Material and Methods

2.1. Source of Strain

F. solani CBS 224.34 was isolated clinically from human infection (obtained from the CBS-KNAW culture collection, Westerdijk Fungal Biodiversity Institute, Utrecht, The Netherlands). This isolate was grown and maintained on PDA or in PDB (PDB; Difco, 254920) 2.4% containing 2% (w/v) agar). For liquid cultures, fungal spores at a concentration of 1 x 103 ml-1, or 3 x 5 mm agar plugs taken from the leading edge of PDA cultures, were inoculated into 250 ml conical flasks containing 100 ml of PDB. Flasks were incubated with shaking (New Brunswick Scientific, USA) at 125 rpm for 3 days at 37°C. Media was autoclaved at 121°C for 15 min prior to use.

2.2. In Vitro Biofilm Formation Model Steps

2.2.1. Growing Biofilm

F. solani (CBS 224.34) biofilms were developed on pre-sterilized flat-bottomed, 96-well microtitre plates (442404; Nunc). After spores harvesting from 3-days old PDB flask by filtration through sterile two layers of Miracloth, spore suspension was washed three times with sterile MQ water, then spore concentration at (106 ml⁻¹) was prepared by using haemocytometer. For biofilm formation, 200 ul of spore suspension was added into each well of the microtitre plate, then incubated statically at 37°C for the different time interval (24 and 48 hr). A minimum of 32 replicates was performed for each assay, plus 8 replicates for controls which were inoculated with PDB only.

2.2.2. Staining the Biofilm

At each selected time point, the medium, plankton and died cells were removed by aspiration and the biofilms were rinsed three times with sterile PBS by repeated pipetting to remove non-adherent cells. The microtitre plates were left to drain in an inverted position on a paper towel at room temperature (RT). After adding a 200 μl aliquot of 0.5% crystal violate (CV) into each well including the control, the plates were sealed and incubated at RT for 30 mins. The plates were again washed three times with PBS, then left inverted to drain at RT.

2.2.3. Quantifying the Biofilm

To de-stain the fungal biofilm, a 200-μl of 95% ethanol was added to each well and then incubated at RT for either 1min or 10 min. The plates were then read at two different wavelengths (570nm and 595nm) using a MRX automated microplate reader (Dynex Technologies, Billingshurst, UK).

2.2.4. Statistical Analysis

The data was analysed using the statistical programme Minitab (Minitab Express, Minitab., Coventry, UK). Statistical differences between treatments and controls were established by means of one-way analysis of variance (ANOVA). Post hoc Tukey-Kramer analysis was then performed to distinguish which groups were significantly different from one another. Results of the test were considered significantly different when p-values were < 0.05.

3. Results

The F. solani biofilm formation morphology was observed visually, and spore germination for hyphal development was imaged using either a Leica Laser Microdissection Microscope and epifluorescence an Olympus microscope (IX81, Visitron System, GmbH). Following initial seeding, the spore-initiated adherence on the flat bottom of wells of the microtitre plate (~ 0 – 8 hr) (Figure 1), and then processed germination, elongation and hyphal networks formation as a primary step to make a monolayer matrix of hyphae within (~8 - 12 hr) (Figure 1). Forming extensive F. solani biofilm with abundant extracellular matrices was observed after (24 – 48 hr), which is the stage of forming mature biofilm and conidia dispersion (Figure 1). The dense of the biofilm biomass of F. solani after (24 and 48 hr) on flat-bottomed well before staining with CV was noticed as shown in Figure 2.

The biofilm biomass was quantified after the two-time points (24 and 48 hr) and measured at two different wavelengths (570nm and 595nm). The result shows that there were no significant differences for quantification fungal biofilm either at 570nm or 595nm (p>0.05) (Figure 3).

Details of measuring Absorbance (Ab) for the different de-staining time after (1 min and 10 min) at the same wavelength either 570 and 595 nm was recorded. The result indicates that the best time for destaining crystal violet was after incubation ethanol for 10 min (Figure 4).

Considering the measuring two wavelengths, there were no significant differences noticed for Ab values of F. solani biofilm formation (p> 0.05). However, the Abs of de-stained CV after (10 min) was significantly increased compared with (1 min) at the same wavelength (p<0.01).

Among the assays findings, CV is a sufficient assay to evaluate fungal biofilm formation and the best de-staining time for CV was (10 min) at either (570nm or 595nm).

Figure 1. Schematic representation of different phases of Fusarium solani biofilm development from (0 to 24 hr)

Figure 2. Development of Fusarium solani biofilm on a flat-bottomed well of microtitre plate before staining with crystal violet after (A) 24 hr, and (B) 48 hr

Figure 3. Comparison of two wavelengths for quantification biofilm formation. (A) absorbance after 1 min, (B) after 10 min. NS= non-significant

Figure 4. Comparison of destaining times (1 min and 10 min) quantification biofilm formation. (A) absorbance at 570nm, and (B) absorbance at 595nm. Significance indicate: **< 0.05

4. Discussion

To our knowledge, this is the first report of optimising a biofilm formation model invitro for the human pathogenic F. solani using 96-well microtitire plate and crystal violet. The fungal biofilm formation is a key step for developing fungal superficial, systemic or disseminated infections [13,15]. Biofilm architecture is considered a virulence factor that enhance the ability of pathogenicity via drug resistance particularly after developing multilayer biofilm [3,16].

Since dry weight method is unable to distinguish between dead and living propagules, our study showed CV staining method is a sufficient assay that can be used for detection only living cells after removing dead cells during washing steps. This dye binds non-specifically to negatively charged surface molecules including polysaccharides and eDNA that located within the extracellular matrix components [17,18]. For this reason, the model of biofilm was used CV for total living biofilm quantification.

Collectively, the model that was developed in this study is reliably and can be used for quantifying F. solani biofilm formation with a chance to test large number of samples. The results of this study demonstrated that the F. solani biofilm biomass can be quantified at two different wavelengths with no differences.

The key observation of our developed biofilm model is the incubation period of ethanol for CV de-staining. The results of testing two different CV de-staining incubation times revealed that the Abs values of CV de-stained for 10 mins were more accurate and higher than short-time de-staining. The possible explanation is due to developing F. solani multilayers biofilm matrices which adsorbed large amount of CV stain.

5. Conclusion

In conclusion, F. solani is able to form biofilm through spore adherence and then germination on the flat-bottomed microtiter plate during the first 12 hr after incubation. The mature biofilm can be achieved after 24 hr. The best CV de-staining time is incubation for 10 mins. This model is simple to perform, accurate, easy to assess fungal biofilm and cost effective.

Acknowledgements

I thank the University of Basrah, Department of Biology, College of Science for financial support (grant 19052018). Also, I would thank the University of Exeter, UK for providing the research environment for this work to be done.

References

[1]   | Al-Maqtoofi M, Thornton CR. Detection of human pathogenic Fusarium species in hospital and communal sink biofilms by using a highly specific monoclonal antibody, Environ Microbiol, vol. 18, no. 11, pp. 3620-3634, Nov. 2016.
[2]   | Guarro J. Fusariosis, a complex infection caused by a high diversity of fungal species refractory to treatment, Eur. J. Clin. Microbiol. Infect. Dis., vol. 32, no. 12, pp. 1491-1500, Dec. 2013.
[3]   | Kaur S, Singh, S. Biofilm formation by Aspergillus fumigatus, Med Mycol, vol. 52, no. 1, pp. 2-9, Jan. 2014.
[4]   | Nett JE, Cain MT, Crawford K, Andes DR. Optimizing a Candida Biofilm Microtiter Plate Model for Measurement of Antifungal Susceptibility by Tetrazolium Salt Assay, J. Clin. Microbiol., vol. 49, no. 4, pp. 1426-1433, Apr. 2011.
[5]   | Zago CE, Silva S, Sanitá PV, Barbugli PA, Dias CM, Lordello VB, Vergani CE. Dynamics of Biofilm Formation and the Interaction between Candida albicans and Methicillin-Susceptible (MSSA) and -Resistant Staphylococcus aureus (MRSA), PLoS One, vol. 10, no. 4, Apr. 2015.
[6]   | Taff HT, Nett JE, Andes DR. Comparative analysis of Candida biofilm quantitation assays, Med Mycol, vol. 50, no. 2, pp. 214-218, Feb. 2012.
[7]   | Mowat E, Butcher J, Lang S, Williams C, Ramage G. Development of a simple model for studying the effects of antifungal agents on multicellular communities of Aspergillus fumigatus, J. Med. Microbiol., vol. 56, no. Pt 9, pp. 1205-1212, Sep. 2007.
[8]   | Pathak AK, Sharma S, Shrivastva P. Multi-species biofilm of Candida albicans and non-Candida albicans Candida species on acrylic substrate’, Journal of Applied Oral Science, vol. 20, no. 1, pp. 70-75, Feb. 2012.
[9]   | Pierce CG, Uppuluri P, Tristan AR, Wormley FL, Mowat E, Ramage G, Lopez-Ribot JL. A simple and reproducible 96-well plate-based method for the formation of fungal biofilms and its application to antifungal susceptibility testing, Nat Protoc, vol. 3, no. 9, pp. 1494-1500, 2008.
[10]   | Silva-Dias A, Miranda IM, Branco J, Monteiro-Soares M, Pina-Vaz C, Rodrigues AG. Adhesion, biofilm formation, cell surface hydrophobicity, and antifungal planktonic susceptibility: relationship among Candida spp., Front. Microbiol., vol. 6, 2015.
[11]   | Melo AS, Bizerra FC, Freymüller E, Arthington-Skaggs BA, Colombo AL. Biofilm production and evaluation of antifungal susceptibility amongst clinical Candida spp. isolates, including strains of the Candida parapsilosis complex, Med Mycol, vol. 49, no. 3, pp. 253-262, Apr. 2011.
[12]   | Seidler MJ, Salvenmoser S, Müller MC. Aspergillus fumigatus Forms Biofilms with Reduced Antifungal Drug Susceptibility on Bronchial Epithelial Cells, Antimicrob. Agents Chemother., vol. 52, no. 11, pp. 4130-4136, Nov. 2008.
[13]   | Chandra J, Kuhn DM, Mukherjee PK, Hoyer LL, McCormick T, Ghannoum MA, Biofilm Formation by the Fungal Pathogen Candida albicans: Development, Architecture, and Drug Resistance, J. Bacteriol., vol. 183, no. 18, pp. 5385-5394, Sep. 2001.
[14]   | Peiqian L, Xiaoming P, Huifang S, Jingxin Z, Ning H, Birun L. Biofilm formation by Fusarium oxysporum f. sp. cucumerinum and susceptibility to environmental stress, FEMS Microbiol. Lett., vol. 350, no. 2, pp. 138-145, Jan. 2014.
[15]   | Ramage G, Rajendran R, Gutierrez-Correa M, Jones B, Williams C. Aspergillus biofilms: clinical and industrial significance, FEMS Microbiol. Lett., vol. 324, no. 2, pp. 89–97, Nov. 2011.

[16]  
Imamura Y, Chandra J, Mukherjee PK, Lattif AA, Szczotka-Flynn LB, Pearlman E, Jonathan HL, O’Donnell K, Ghannoum MA. Fusarium and Candida albicans Biofilms on Soft Contact Lenses: Model Development, Influence of Lens Type, and Susceptibility to Lens Care Solutions, Antimicrob Agents Chemother, vol. 52, no. 1, pp. 171-182, Jan. 2008.

[17]   | Li X, Yan Z, Xu J. ‘Quantitative variation of biofilms among strains in natural populations of Candida albicans’, Microbiology (Reading, Engl.), vol. 149, no. Pt 2, pp. 353-362, Feb. 2003.
[18]   | Pitts B, Hamilton MA, Zelver N, Stewart PS. A microtiter-plate screening method for biofilm disinfection and removal’, J. Microbiol. Methods, vol. 54, no. 2, pp. 269-276, Aug. 2003.