Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Isolation of MRSA Strains from Hospital Environment in Benghazi City, Libya

Nadia. E. Al-Abdli*, Saleh.H. Baiu

Department of Laboratory, Eye Hospital, Benghazi, Libya

Abstract: Methicillin-resistant Staphylococcus aureus (MRSA) is an important cause of healthcare-associated infections, where healthcare workers (HCWs) are vectors of transmission. In addition to exposure to healthcare workers who may be as carriers, exposure to contaminated rooms can also be a risk factor. The hospital environment, especially surfaces, represents a secondary reservoir for pathogens such as S. aureus, and represent a challenge to infection control practices in most countries. This study aimed to explore the prevalence of MRSA in hospitals of Benghazi, Libya, Sounding the alarm of the presence of large hospitals infection in Benghazi and probably are in the grip of endemic problems with resistant organisms. Methods: The 395 swabs were collected from hospital surfaces such as surfaces of frequently handled items (beds, sinks, door handles, floors, and table surfaces). The surface swabs were collected at the different wards of the hospital Medical units, ICU and HCWs rooms. Results: Highest rate was in ICU followed by medical units and dialysis wards (9.5%, 7.8%, and 5% respectively ). Conclusion: MRSA strains prevalence in Benghazi City. was high and this may be the case for other hospitals in Libya. A sound surveillance program of nosocomial infections is urgently needed to reduce the incidence of infections due to MRSA and other antimicrobial-resistant pathogens in Libyan hospitals.

Keywords: hospital environment, Nosocomial infection, MRSA strains

Citation: Nadia. E. Al-Abdli, Saleh.H. Baiu, Isolation of MRSA Strains from Hospital Environment in Benghazi City, Libya. American Journal of Infectious Diseases and Microbiology, 4 (2). 41-43. January 2016. doi:10.12691/ajidm-4-2-4

1. Introduction

Nosocomial infections or hospital-acquired infections are one of the major problems in healthcare, undoubtedly hospital environments are a great source of potentially pathogenic microorganisms [1,2]. These may be transmitted from person to person, from hospital equipment, materials, and hospital environment to the patient, or may be from the endogenous flora of the patient [3,4,5]. One of the most common bacteria associated with nosocomial infections is Staphylococcus. Methicillin-resistant Staphylococcus aureus (MRSA) bacteria are more and more prevalent in the hospital environment and represent a challenge to infection control practices in most countries [6,7]. The main mechanism of transmission of infections within hospital is by direct contact, in particular with the hands of health professionals [6,8], which may both contaminate or be contaminated by hospital surfaces. The staphylococci can be spread by the infected person to someone else or to an object. Inanimate objects, such as clothing, bed linens, be associated to several biological materials in the hospital, environment such as floors, walls, ceiling, doors, windows electro-electronic equipment , sports equipment, personal items (soap or wash cloths) or furniture, may be a source of infection if they become soiled with wound drainage and a non-infected person comes into contact with them [9,10]. If there is no break in the skin, contact with infected persons or contaminated objects may result in colonization [11,12,13]. Many previous studies have evaluated MRSA contamination of various items such as computers, pens, television sets, stethoscopes, tourniquets, uniforms and gowns, blood-pressure cuffs, and mattresses, pillows, chairs, bed frames, and over-bed tables [14,15,16]. Incidence and prevalence of MRSA varies widely between countries, geographical regions, hospitals and even wards in the same hospital. MRSA may spread from person to person and from one hospital to another, causing outbreaks [17]. Welsh's study evaluating hospital cleaning regimes and standards argues that there is “no doubt that environmental surfaces can act as a source of pathogens which can give rise to nosocomial [hospital-acquired] infections [18]. Health care settings are an environment where both infected persons and persons at increased risk of infection congregate. Patients with infections or carriers of pathogenic microorganisms admitted to hospital are potential sources of infection for patients and staff [18,19]. Patients who become infected in the hospital are a further source of infection. Crowded conditions within the hospital, frequent transfers of patients from one unit to another, and concentration of patients highly susceptible to infection in one area (e.g. newborn infants, burn patients, intensive care ) all contribute to the development of nosocomial infections [20]. Microbial flora may contaminate objects, devices, and materials which subsequently contact susceptible body sites of patients. In addition, new infections associated with bacteria such as waterborne bacteria (atypical mycobacterium) and/or viruses and parasites continue to be identified [20]. Methicillin-resistant S. aureus (MRSA) has been shown to have the ability to survive for long periods of time in healthcare environments. Hospital-acquired infections are increasing. There is a growing recognition of the relationship between the effective cleaning of hospitals and long-term care facilities and the health and safety of both patients and staff [21]. Thus, the quality of cleaning services is an important condition in the prevention and control of microbial spread, as well as the type of disinfectants used to diminish risks of cross infections during healthcare assistance [6,22].

2. Material and Methods

2.1. Sample Collection and Bacterial Isolates

Clinical samples were obtained from environments and equipment surfaces in ten public hospitals in Benghazi, Libya between April and August 2013. These hospitals (Psychiatric hospital and Al-Erada sanatorium, Benghazi Childrens hospital, Al- Joumhouria hospital, Nephrology Center and Al-Jala Hospital). The sites were determined by following the routines of each hospital. We selected sites with a greater possibility of contamination. The selected collection sites were: floors, hospital cots, hospital cot control panels, heart monitors, hospital ventilator control panels, infusion-pump control panels, blood-gas analyzer control panels, hospital incubators, telephones, scales, doors, tables, hospital beds, cabinets, emergency carts, medication carts, computers, air conditioners, faucets, handles, hospital countertops and prescription records. Samples were collected from each surface using sterile swabs. 395 hospital environment items) were collected for detection of MRSA.

2.2. Cultivation, Identification and Antibiotic Susceptibility

All swabs were inoculated on Mannitol salt agar plates (MSA-HiMedia, India) and were incubated at 37°C for 24-48 hours. Suspect colonies, which revealed acidification of mannitol, were subjected to identification procedures. Colonies with coagulase-positive, Gram-positive cocci, DNase and catalase positive [23]. were selected as possible S. aureus and identified by BD Phoenix Automated Microbiology System. Also antimicrobial resistance of sampled colonies was evaluated in vitro by BD Phoenix Automated Microbiology System; S. aureus is tested against various concentrations of antimicrobics. A maximum of 100 identification and antimicrobial susceptibility tests can be performed in the Phoenix instrument at a time using Phoenix ID/AST combination panels; bacterial layer was resuspended and then inoculated drop wise into Phoenix panels ID broth in order to obtain a suspension matching a McFarland 0.5 standard. The remaining of the panels setup and loading was performed according to the manufacturer’s instructions, determining the S. aureus resistance (ineffective) or susceptibility (effective) to the antimicrobics; Phoenix panels are read only by the instrument. Phoenix panels cannot be read manually.

3. Results

Out of 395 samples from environment swabs 100 (25.3%) were identified as S. aureus. The incidence of MRSA at Benghazi Hospitals environment was approximately 8.1 %. The high incidence of MRSA isolates was evident in both ICU (9.5%) and medical units (7.8%). A similar incidence was seen in HCWs rooms (7.5%) and the dialysis wards (5%) of MRSA (Table 1).

Table 1. The distribution of MRSA in different hospital wards

Most MRSA strains isolated from this study were multidrug- resistant (MDR) (Table 2).

Table 2. Resistance patterns of MRSA strains isolated from hospitals environment

4. Discussion

Out of total 395 samples from environment swabs, about (25.3%) of the investigated were contaminated with S. aureus, irrespective of whether they had infected patients or not. The present study disclosed staphylococci in various sites within the hospital environment. Similar results were reported by Masaki [24]. An another study [25,26] obtained 25 MRSA isolates from hospital beds. In this study MRSA prevalence was (8.1%) among all the samples from environment, which is less than that reported in other studies [29,30,31]. The present study disclosed the presence of MRSA in various sites within the hospital environment, in surfaces in ICU, medical units, HCWs rooms and dialysis wards, the high incidence of MRSA isolates was evident in ICU(9.5%). Similar results were reported by [26,32,33]. As observed most of the isolates obtained in the present study were showing growth of multi drug resistant organisms as compared to those isolated from non clinical sections. The effectiveness of environmental cleaning is an important factor in strategies to prevent the nosocomial transmission of MRSA [27,28]. A study conducted reported that health professionals re-contaminate their hands during interruptions of patient care by touching objects such as a computer mouse, control panels, phones, alarm buttons, electrical switches and pens before caring for patients [32]. Moreover, many other microorganisms are transmitted to health professionals’ hands through inanimate objects such as soap dispensers, tables, telephones, sphygmomanometers, monitors and bedside bars [33]. This transmission may render the health professionals’ hands permanently colonized with pathogenic microorganisms acquired in a hospital environment [34, 35].

5. Conclusion

Hospitals provide reservoirs of multi resistant microorganisms borne by patients and staff. Preventing the spread of relevant bacteria depends on the quality of hospital routine cleaning services. Monitoring bacterial susceptibility to antimicrobials and disinfectants may help the management of nosocomial infections.

References

[1]   | Bryce, E.A; Scharf, S; Walker, M; Walsh, A. (2007). The infection control audit: the standardized audit as a tool for change. Am. J. Infect. Control, 35: 271-283.
[2]   | Bouzada,M.M; Silva,V; Sa Moreira,F; Silva,G; Diniz,C..(2010). Antimicrobial resistance and disinfectants susceptibility of persistent bacteria in a tertiary care hospital. Academic Journals, 2(7):1-8.
[3]   | Ducel,G.F; Fabry,J; Nicolle, L. (2002). Prevention of hospital-acquired infections. WHO/CDS/CSR/EPH/2002.12
[4]   | Anderson, N,; Pearsal. (2004). Microbiology A Human Perspective. McGrawhill: New York. 4th Edition.
[5]   | Atata RF, Ibrahim YKE, Olurinola PF, Giwa A, Akanbi II AA, Sani AA (2010). Clinical bacterial isolates from hospital environment as agent of surgical wound nosocomial infections. Journal of Pharmacy and Bioresourcrs. 7(2). 146-155.
[6]   | Al-Abdli, N.E; Baiu, S.H.(2014). Nasal Carriage of Staphylococcus in Health Care Workers in Benghazi Hospitals. American Journal of Microbiological Research, 2 (4) : 110-112.
[7]   | Lemmen, S.W; Hafner, H; Zolldann, D; Stanzel, S; Lutticken, R. (2004). Distribution of multi-resistant Gram-negative versus Gram-positive bacteria in the hospital inanimate environment. J Hosp Infect; 56(3):191-7.
[8]   | Boyce, J.M. (2004). New insights for improving hand hygiene practices. Infect Control Hosp Epidemiol ; 25(3):187-8
[9]   | Carvalho, K.S; Melo, M.C; Melo, G.B; Gontijo-Filho, P.P.(2007). Hospital surface contamination in wards occupied by patients infected with MRSA or MSSA in a Brazilian university hospital, Journal of Basic and Applied Pharmaceutical Sciences, 28(2): 159-163.
[10]   | Oie, S; Hosokawa, I; Kamiya, A.(2002).Contamination of room door handles by methicillin-sensitive/methicillin-resistant Staphylococcus aureus, Journal of Hospital Infection,51: 140-143.
[11]   | Kim, T; Oh, P. I; Simor, A. E. (2001). The economic impact of methicillin-resistant Staphylococcus aureus in Canadian hospitals. Infection Control & Hospital Epidemiology 22(2): 99-104.
[12]   | Auditor General of Scotland. 2000. A clean bill of health? A review of domestic services in Scottish hospitals. Audit Scotland. April. www.audit-scotland.gov.uk.
[13]   | Bennett, J.V; Jarvis‏, W. R; Brachman‏, P. S.(2007). ‏Bennett & Brachman's Hospital Infections. Wolters Kluwer Health / Lippincott Williams & Wilkins, 5th ed 19, pp 276- 297.
[14]   | Devine J, Cooke RPD, Wright EP. Is methicillin resistant Staphylococcus aureus (MRSA) contamination of ward-based computer terminals a surrogate marker for nosocomial MRSA transmission and handwashing compliance? J Hosp Infect 2001; 48: 72-5.
[15]   | Banerjee D, Fraise A, Chana K. Writing pens are an unlikely vector of cross-infection with methicillin resistant Staphylococcus aureus (MRSA). J Hosp Infect 1999; 43: 73-5.
[16]   | Blythe D, Keenlyside D, Dawson SJ, Galloway A. Environmental contamination due to methicillin resistant Staphylococcus aureus (MRSA). J Hosp Infect 1998; 38: 67-70.
[17]   | Ayliffe, G.A.J. (1996). Recommendations for the control of methicillin resistant Staphylococcus aureus (MRSA). World Health Organization, Division of Emerging and other Communicable Diseases Surveillance and Control, Geneva
[18]   | Griffith, C. J; Cooper, R. A; Gilmore, J; Davies, C;& Lewis, M. (2000). An evaluation of hospital cleaning regimes and standards. Journal of Hospital Infection 45: 19-28. p. 25. See also p. 19.
[19]   | Panlilio, A.L; Culver, D.H; Gaynes, R.P; Banerjee, S; Henderson, T.S; Tolson, J.S. 1992. Methicillin-resistant Staphylococcus aureus in U.S hospitals, 1975-1991. Infect Control Hosp Epidemiol; 13:582-6.
[20]   | Weller, B. (2000). Bailliere’s Nurses’ Dictionary. Royal College of Nursing: London. 23rd Edition.
[21]   | Resources. In: Proceedings of the 3rd Decennial International Conference on Nosocomial Infections, Preventing Nosocomial Infections. Progress in the 80’s. Plans for the 90’s, Atlanta, Georgia, July 31–August 3, 1990:30 (abstract 63).
[22]   | Kramer,A; Schwebke, I; Kampf,G. (2006). How long do nosocomial pathogens persist on inanimate surfaces?. BMC Infectious Diseases, (6)130: 1-8.
[23]   | Cheesbrough, M, (2009). District Laboratory Practice in Tropical Countries. Cambridge university, UK, 2 (2): (65-67).
[24]   | Masaki, I; Asoh, N; Watanabe, H. (2003). Possible relationship between Staphylococcus aureus colonizing the respiratory tract and rectum and S. aureus isolated in a geriatric hospital environment. Intern. Med. 42, 281-282.
[25]   | Naseer, B.S; Jayaraj, Y.M. (2010). Nasal carriage of methicillin resistant Staphylococcus aureus isolates from intensive care unit patients. Res. J. Biol. Sci. 5(2): 150-154.
[26]   | Brady, R.R.W; Kallma, P; Damani, N.N. (2007). Bacterial contamination of hospital bed-control handsets in a surgical setting: a potential marker of contamination of the healthcare environment. Ann. R. Coll. Surg. Engl. 89, 656-660.

[27]  
Sehulster, L.M; Chinn, R.Y.W; Arduino, M.J; Carpenter, J; Donlan, R; Ashford, D. (2004). Guidelines for environmental infection control in health-care facilities. Recommendations from CDC and the Healthcare Infection Control Practices Advisory Committee (HICPAC). Chicago: American Society for Healthcare Engineering / American Hospital Association; , 249p.

[28]   | Loveday, H.P; Pellowe, C.M; Jones, S.R.LJ; Pratt, R.J. (2006). A systematic review of the evidence for interventions for the prevention and control of methicillin-resistant Staphylococcus aureus (1996-2004): report to the joint MRSA working paty (subgroup A). J Hosp Infect ; 63(Suppl 1):45-70.
[29]   | Kateete, D. P; Sylvia, N; Moses, O; Alfred, O; Hannington, B; Nathan, L. M; Fred; A. K; Moses, L. J; Robert, S; Florence, C.N (2011). High prevalence of methicillin resistant Staphylococcus aureus in the surgical units of Mulago hospital in Kampala, Uganda. BMC Res. Notes 2011, 4:326.
[30]   | Al-Charrakh, A.H; Naher, H.S; Al-Fuadi, A.H. (2012). Methicillin Resistant Staphylococcus aureus. An evaluation of phenotypic and molecular methods for detection of MRSA. LAMBERT Academic Publishing.
[31]   | Al-Khudheiri, M.K. (2008). Bacteriological and genetic study of methicillin resistant Staphylococcus aureus isolated from hospitals of Najaf City. MSc. Thesis. College of education for girls. Kufa University. (In Arabic).
[32]   | Lam, B.C.C; Lee, J; Lau, Y.L. (2004). Intervention and impact on nosocomial infection hand hygiene practices in a neonatal intensive care unit: a multimodal. Pediatrics. 114, 565.
[33]   | Karabey, S; AY, P; Derbentloy, S. (2002). Hand washing frequencies in an intensive care unit. J. Hosp. Infect. 50, 36-41.
[34]   | Bonten, M.J; Weinstein, R.A. (1996). The role of colonization in the pathogenesis of nosocomial infections. Infect Control Hosp Epidemiol ; 17(3): 193-200.
[35]   | Derya, G; Kadriye, K; Sabahat, T; Afife, A. K.(2014). Single Palliative Care Rooms on The Control of Infections in Severe Traumatic Brain -Injured Patients: Acta Medica Mediterranea; 30: 361.