Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Serum Nitric Oxide as Early Predictor of Poor Outcome in Neonatal Sepsis

Minerva Riani Kadir*, Tetty Yuniati, Dadang Hudaya Somasetia

Department of Child Health, Dr. Hasan Sadikin General Hospital-Universitas Padjadjaran, Bandung, Indonesia

Abstract: Objective This study examines the serum nitric oxide (NO) as an indicator of poor outcome in neonatal sepsis. Study Design This prospective observational study was conducted in Dr. Hasan Sadikin General Hospital, Bandung, from September to November 2014. All subjects fulfilled inclusion criteria were tested serum NO metabolite at admission, then were followed up to determine the final outcome, grouped as Group I-good outcome, Group II-poor outcome. Logistic regression analysis was performed to determine independent variables associated with poor outcome, estimated as the odds ratio (OR) and the 95% confidence interval (95% CI). Results Fifty seven neonates were enrolled in this study. There was a good relation between NO level and poor outcome in neonatal sepsis (p<0.01). The level of NO metabolite was a significant independent factor of the poor outcome in neonatal sepsis in the multivariate regression logistic analysis (OR 25.975, p=0.000, 95% CI 4.354–154.952). It showed good discrimination with AUC 0.815 (95% CI 0.676 to 0.955), and good calibration (p=0.192). Conclusion A high serum NO level is independently associated with poor outcome in neonatal sepsis.

Keywords: nitrit oxide, neonatal sepsis, outcome

Received September 03, 2015; Revised September 17, 2015; Accepted September 20, 2015

Citation: Minerva Riani Kadir, Tetty Yuniati, Dadang Hudaya Somasetia, Serum Nitric Oxide as Early Predictor of Poor Outcome in Neonatal Sepsis. American Journal of Infectious Diseases and Microbiology, 3 (4). 137-140. January 2015. doi:10.12691/ajidm-3-4-4

1. Introduction

Neonatal sepsis is still important causes of morbidity and mortality among poor and developing countries.[1] Estimated 4 million newborns died caused by severe infection. The neonatal sepsis rate in Asia ranging from 7,1−38/1,000 while developed countries such as USA and Netherland estimated 1,5−3,5/1,000 cases [2].

Early recognition of neonates who are at high risk for poor outcome or even mortality allows for timely therapy and improves the overall outcomes [3]. Prior studies have identified a lot of risk factors associated with sepsis such as prematurity, low birth weight, premature membrane rupture, maternal factor such as pyrexia, poor intra- and postpartum hygiene, invasive medical procedures, and place of birth. Likewise, in our study, sepsis-associated factors we measured were onset sepsis, different body weight, maternal and neonatal risk factor [4,5]. In this study, we input nitric oxide (NO) metabolite as early predictor of neonatal sepsis outcome. Nitric oxide plays a significant role in the pathogenesis of severe conditions of sepsis. Over production of nitric oxide induced vasodilatation, changed in cardiovascular function, and decreased myocardium contractility [6]. Previous studies done by Shi et al. [7] showed NO level in sepsis higher than healthy control, but none showed NO as early risk factor to predict poor outcome. This study was conducted to investigate NO as an indicator of poor outcome in neonatal sepsis.

2. Methods

2.1. Setting

This prospective observational study was conducted in Dr. Hasan Sadikin General Hospital, Bandung, from September to November 2014. Subjects were selected by consecutive sampling.

2.2. Inclusion and Exclusion Criteria

Newborns who fulfilled two or more SIRS criteria with a proven bacterial infection or probable infection such as pneumonia, necrotizing enterocolitis (NEC) or chorioamnionitis were enrolled in this study. Neonates with major congenital abnormalities were excluded.

2.3. Data Collection

Neonates that fulfilled inclsion criteria were run for blood testing after parent’s approval. The complete blood count was tested in Hasan Sadikin Hospital. Serum NO levels were taken by the time of patient’s admission, and processed to its stable metabolites ; nitrate (NO₃) and nitrite (NO₂) using the Griess reaction. Two ml blood was drawn, centrifuged with 1,500 rpm for 15 minutes, kept under -20°C before sent to Laboratory Research and Esoteric Testing Prodia Bandung.

The subjects were followed prospectively and then divided in two groups according to the outcome: Group I-good outcome and Group II-poor outcome. Poor outcome defined as subjects suffered two or more organ dysfunction, or septic shock or died during hospitalization, while good outcome grouped based on clinical and laboratory improvement, discharged from hospitalization in good condition.

2.4. Statistical Analysis

All risk factors were analyzed by using Chi-square test for categorical data and t-test or Mann-Whitney test for numeric data. Bivariate analysis were then subsequently subjected to a stepwise multivariate logistic regression analysis to determine the independent contribution of poor outcome due to neonatal sepsis. Receiver operating characteristic (ROC) curve analysis was used to calculate area under the curve (AUC), determine the cut off point, as well as calculate the sensitivity, specificity, positive predictive value, negative predictive value, and positive likelihood ratio. Each variable to the risk of sepsis outcome was expressed as the OR with a 95% CI. Discrimination was determined using the receiver operating characteristic (ROC) analysis and calibration was analyzed using the Hosmer-Lemeshow goodness-of-fit test. All analysis was processed using SPSS software for Windows version 17.

The study has been approved by the Research and Ethics Committee of the Universitas Padjadjaran Medical School, Indonesia, and written parental consent was obtained.

3. Results

3.1. Study Population

Since September to November 2014, 68 neonates were eligible to assess. Eleven neonates were excluded and 57 were fulfilled the inclusion criteria. All subjects then continuosly follow up to determine outcome as shown in Figure 1.

Figure 1. Participant’s Flow Diagram

It was shown that subjects consist of 37 males and 20 females. Forty were in Group I and other 17 were matched in Group II. Difference characteristics of both groups were shown in Table 1.

Table 1. Characteristics of subject and outcome of neonatal sepsis

3.2. Level of Nitric Oxide

Cut off value of serum NO taken from ROC curve analysis recorded in this study was >13.7 µM/L, with AUC 0.815. It showed 70.5% sensitivity, 92.5% specificity, 80% positive predictive value (PPV), 88% negative predictive value, 9.41 time greater in predicting poor outcome of neonatal sepsis, as plotted in Figure 2.

Figure 2. ROC curve analysis of nitric oxide

Bivariate logistic regression analysis compared body weight, risk factors at birth, onset of sepsis, and NO with poor outcome in neonatal sepsis as shown in Table 2. There was statistically significant difference between two groups for birth weight and NO level (p <0.05).

Table 2. Factors associated with the outcome of neonatal sepsis

Multivariate logistic regression modelling was then performed using statistically significant bivariate variables. Only NO level was shown to have significant association with poor outcome (OR, 95%CI) (Table 3).

Table 3. Multivariate logistic regression model associated with poor outcome

The NO level >13.7 µM/L was significant independent factor for predicting poor outcome in neonatal sepsis. The risk to become poor outcome 25.975 times greater for newboen with elevated NO level. This final model showed good discrimination with AUC 0.815 (95% CI 0.676 to 0.955), and good calibration (p=0.192).

4. Discussion

Neonatal sepsis can progress to severe sepsis and septic shock, expand to multiple organ failure depending on the degree of severity. Early prediction of neonatal sepsis outcome has been challenging in reducing mortality in newborns and plays an important role in clinician’s assessment.

In this study, it was shown than NO as a significant independent risk factor of poor outcome in neonatal sepsis (p=0.00). Overproduction of NO induced by infection and inflammation can cause cytotoxic to host cells and play an important role in complex immuno-inflammatory response. Bacterial toxins caused infection with different ways. Gram negative bacteria induced i-NOS production directly. Therefore, gram positive bacteria produced superantigens (SAgs) that bind to the variable portion of β-chain (Vβ) of the T-cell receptor, induced i-NOS production and elevated serum NO level, so more severe the infection was, the higher NO level was [8,9].

Nitric oxide was heterogeneously distributed in the vascular system, tissue perfusion, decreased cardiac output, kidney failure, molecularly linked to tissue hypoxia, and eventually leads to severe form of sepsis to multiple organ dysfunction syndrome [10]. Nitric oxide concentrations are associated with some indices of severity, development of perfusion failure, and the detrimental consequences [11,12]. Tissue hypoxia related to the dysfunction of mitochondria and energy failure in neonatal sepsis, where leads to ATP depletion, later role in the course of neonatal sepsis development [13, 14].By determine the NO level, it was hoped that clinician could differ severity of sepsis earlier, adjust prompt treatment timely, reduce morbidity and mortality.

Other study performed by Shi et al. [7] showed that serum NO level in sepsis group higher compare to control. The study conducted by Duke et al. [15] compared that serum NO level lower in survived group. Other studies done by Mahmoud et al. [16] showed the cut off value ranged from 10.1 to 60.4 μmol/L, with the median level of 35.2 μmol/L. The different value of NO level might be caused by different equipment used in all study, different methods and analysis, other factors that supposed to contribute was the different facility available, climate, and geographic area.

The other factors such as body weight, onset sepsis and risk factors at birth were not associated with poor outcome in neonatal sepsis after multivariate analysis. This result is contrary to the previous study by Leal et al [4]. that stated all these factors contributed to the sepsis outcome. As shown in Ibraheem [17] percentage of mortality in early onset sepsis was higher than in late onset sepsis. Predicted this contrast result because of different sample size.

To our knowledge, this study is the first one in our department and has not been used routinely in our centre. Our setting has several limitations due to lack capacity of neonatal intensive care unit, medications, ventilators, monitors.

There were several limitations in this study. First, there was no control group. Second, double infection by viral and fungal pathogens can not be excluded. Third, the NO serum only measured one time. Further study is still needed to be done in multicentre study with larger sample size.

5. Conclusion

Serum nitric oxide is associated with neonatal sepsis severity. It can be a promosing biomarker needed to predict poor outcome in neonatal sepsis earlier and adjust prompt treatment.

Conflict of Interest Statement

No competing interest to declare.

Acknowledgement

We thanked Professor Abdurachman Sukadi and Professor Herry Garna for initial manuscript counseling.

References

[1]   | Wynn JL, Wong HR, Shanley TP, Bizzarro MJ, Saiman L, Polin RA. Time for a neonatal-specific consensus definition for sepsis. Crit Care Med. 2014; 20: 1-6.
[2]   | Sallab SE, Abdel-Hady H, Abu-Hashim E, Matter M. Implications of nitric oxide and carbon monoxide in neonatal sepsis. J Med Sci. 2002; 2(4): 177-81.
[3]   | Hollenberg SM, Cinel I. Bench-to-bedside review: Nitric oxide in critical illness - update 2008. Critic Care. 2009;13:218-27.
[4]   | Leal YA, Álvarez-Nemegyei J, Velázquez JR, Rosado-Quiab U, Diego-Rodríguez N, Paz-Baeza E, et al. Risk factors and prognosis for neonatal sepsis in southeastern mexico: Analysis of a four-year historic cohort follow-up. BMC. 2012;12:48-57.
[5]   | Satar M, Özlü F. Neonatal sepsis: a continuing disease burden. Turkish J Pediatr. 2012; 54: 449-57.
[6]   | Kurosawa DJ, Osuchowki MF, Valentine C, Kurosawa S, Remick DG. The pathogenesis of sepsis. Ann Rev Pathol Mech Dis. 2011; 6: 19-48.
[7]   | Shi Y, Li HQ, Shen CK, Wang JH, Qin SW, Liu R, et al. Plasma nitric oxide levels in newborn infants with sepsis. J Pediatr. 1993; 123: 435-38.
[8]   | Ramachandran G. Gram-positive and gram-negative bacterial toxins in sepsis. Virulence. 2014;5(1):213-8.
[9]   | Wink DA, Hines HB, Cheng RYS, Switzer CH, Flores-Santana W, Vitek MP, dkk. Nitric oxide and redox mechanisms in the immune response. J Leukoc Biol. 2011;89:873-91.
[10]   | Levett DZ, Fernandez BO, Riley HL, Martin DS, Mitchell K, Leckstrom CA, dkk. The role of nitrogen oxides in human adaptation to hypoxia. Scientific Report. 2011. Available in http:\\www.nature.com.
[11]   | Mathur V, Satrawala Y, Rajput MS, Vishvkarma A, Shah TD. Physiological and pathophysiological functions of nitric oxide. Der Pharmacia Lettre. 2010, 2(2): 244-57.
[12]   | Fortin CF, McDonald PP, Fulo T, Lesur O. Sepsis, leukocytes, and nitric oxide (NO): an intricate affair. Shock. 2010;33(4):1-9.
[13]   | Spasojević I, Obradović B, Spasić S. Bench-to-bedside review: neonatal sepsis –redox processes in pathogenesis. Crit Care. 2012; 221(16): 1-10.
[14]   | Nicolette NB, Jo W, Muloiwa R, James N. Presentation and outcome of tuberculous meningitis among children: Experiences from a tertiary children’s hospital. Afr Health Sci. 2014; 14(1): 143-9.
[15]   | Duke T, South M, Stewart A. Activation of the L-arginine nitric oxide pathway in severe sepsis. Arch Dis Child 1997; 76: 203-9.
[16]   | Mahmoud AT, Tawfik MA, Alshafey MK, Hak SM. Study on nitric oxide level in septicemic neonates. Menoufia Med J. 2014; 27: 474-77.
[17]   | Ibraheem MF. Neonatal bacterial sepsis: Risk factors, clinical features and short term outcome. Fac Med Baghdad. 2011; 53(3): 1-4.