Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

CMOS-Compatible Linear VCO Using a Single CFOA and Grounded Capacitors

D. K. Srivastava, V. K. Singh, R. Senani*

Division of Electronics and Communication Engineering, Netaji Subhas Institute of Technology, Sector 3, Dwarka, New Delhi, India

Abstract: A simple CMOS-compatible linear voltage controlled oscillator (VCO) has been presented which employs a single CFOA, four MOSFETs and three grounded capacitors as preferred for IC implementation. In the proposed circuit, variable frequency oscillations are obtained by simultaneous variation of two voltage-controlled-resistors in the circuit which appear in the expression for oscillation frequency in the product form but appear as a ratio in the condition of oscillation (which therefore, remains unaffected). The workability of the proposed VCO has been confirmed by SPICE simulations using an exemplary CMOS CFOA and CMOS VCRs both implementable in 0.18µm CMOS technology.

Keywords: sinusoidal oscillators, current feedback operational amplifiers, voltage controlled oscillators, voltage controlled resistance

Citation: D. K. Srivastava, V. K. Singh, R. Senani, CMOS-Compatible Linear VCO Using a Single CFOA and Grounded Capacitors. American Journal of Electrical and Electronic Engineering, 5 (6). 202-206. January 2017. doi:10.12691/ajeee-5-6-2

1. Introduction

Analog signal processing/signal generation circuits based on the current feedback operational amplifiers (CFOA) are suitable for high frequency applications as compared to conventional op-amps because of the several advantages offered by them, such as- (i) wider and nearly constant bandwidth independent of gain (for low /medium gains) (ii) higher slew rates (typically 2000V/µsec) and (iii) requirement of a smaller number of external passive components to perform a specified function. A large number of sinusoidal oscillator circuits using CFOAs have been evolved so far, for instance, see [3,5,6,7,8,10,11,12,15,17,18,19,20,24,25]. While a wide variety of bipolar CFOAs are available as off-the-shelf ICs, on the other hand, several CMOS-based CFOA topologies have also been introduced in the literature, for instance, see [24] and the references cited therein.

The main object of this communication is to introduce a simple voltage-controlled-oscillator (VCO) in which the frequency of oscillation can be varied linearly by simultaneously changing two voltage-controlled-resistances (VCR) in the circuit through an external control voltage VC. These resistors feature in the expression for the condition of oscillation (CO) as a ratio but appear in the frequency of oscillation (FO) as a product. Thus, when these two resistors are replaced by two CMOS VCRs derived by a common external voltage VC, a linear control of the FO results.

2. The Proposed Configuration

The CFOA is a four-port active building block which is characterized by the following hybrid matrix:

[picture] | (1)

The proposed configuration is shown in Figure 1 which requires only a single CFOA, four MOSFETs and three grounded capacitors with no passive resistors, as preferred for IC implementation [25,26,27,28].

Figure 1. The proposed Linear VCO

By a straight forward analysis, the condition of oscillation (CO) and the frequency of oscillation (FO) of the circuit are found to be:

[picture] | (2)

[picture] | (3)

Note that the resistors R₂ and R₁ appear as ratio in the CO but as product in FO. Thus, if these resistances are varied simultaneously and equally, CO will remain un-affected but oscillation frequency can be varied. Accordingly, these resistor pairs are replaced by two identical CMOS VCRs [1,16] derived by a common external control voltage VC as shown. The equivalent resistance simulated by each VCR circuit is given by

[picture] | (4)

where, K0 is the trans-conductance parameter and VTpi and VTni are the threshold voltages of the ith PMOS and ith NMOS transistors respectively. If we choose R₁=R₂=R or Req1=Req2=Req with both of these replaced by two identical VCR circuits derived by common control voltages Vni and Vpi, as shown, the eqn. (2) for FO would be modified as:

[picture] | (5)

Therefore, it is clear that oscillation frequency has now become a linear function of one of the common control voltages Vni or Vpi (keeping Vpi fixed and Vni variable or vice-versa) and the circuit, thus, realizes a linear VCO.

3. Effect of the Parasitic Impedances of the CFOA

Considering the various parasitic impedances of the CFOA, namely, the finite non-zero input resistance Rx at port x, the non-infinite input impedance consisting of at port y and the non-infinite output impedance consisting of at port z, the non-ideal characteristic equation (CE) of the proposed circuit is found to be

[picture] | (6)

where

From the above, the non-ideal expression for the CO is found to be

[picture] | (7)

whereas the non-ideal expression for the FO is found to be

[picture] | (8)

[picture] | (9)

For the designed values of the components as shown in the next section and taking the parasitic components of the CFOA as Rx = 50Ω, Ry = 2MΩ, Cy = 2pF, Rp = 3MΩ,Cp = 4.5pF, it is found that the non-ideal CO is not affected significantly due to the consideration of the various parasitics. On the other hand, in view of the complex formula for the non-ideal FO, it is difficult to draw any qualitative inference from it. However, the simulation results of the oscillator show that their influence also is not very substantial since the frequency obtained from simulations was found to be 7.13MHz which is very close to the value 7.18 MHz calculated from the ideal formula, which, therefore, implies an error of only -0.0069%.

It is worth mentioning that in the literature on CFOA-based circuits, several researchers have conjectured that having a capacitor at x-port may lead to instability in some cases. We now show that this is not true in the present case. In order to check the stability of the circuit, we apply the Routh-Hurwitz criterion for which, the Routh array is constructed as in Table 1.

Table 1. Routh array from the CE of equation (6)

Therefore, it is clear that there is not any root of the non-ideal characteristic equation in the right half of the s-plane other than the pair of complex conjugate roots which are responsible for generating sinusoidal signals and therefore, are required to be slightly in the right half of the s-plane initially (and eventually movable to the ±jɷ axis). This will happen if

[picture] | (10)

which implies that

[picture] | (11)

Thus, eqn. (11) should be regarded as the more practicable form of the CO as compared to eqn. (7). It is, therefore, concluded that if the non-ideal CO of the equation (11) is satisfied then there is no other pole which may be located in the right half of the s-plane and thus, the stability of the circuit is also ensured.

4. Completely-CMOS Version of the VCO and SPICE Simulation Results

For realizing a linear VCO implementable in CMOS Technology, the CFOA too needs to be realized in CMOS for which a number of alternatives have been proposed in the recent literature. For the present work, we have chosen the CMOS CFOA employed in [19] (which was derived by extracting a CCII+ from the CMOS DDCC of [16] and then appending a CMOS voltage follower to it) which is reproduced here in Figure 2.

Figure 2. An exemplary CMOS CFOA

Table 2. Aspect Ratios of MOSFETs in the CMOS CFOA

Table 3. W/L Ratios of the MOSFETs in CMOS VCR

Table 4. Level 7 SPICE parameters for 0.18µm CMOS process

For SPICE simulations, the W/L ratios of the MOSFETs used for implementing the CFOA, were chosen as given in Table 2, whereas the aspect ratios of the MOSFETs used to realize the floating VCR circuit were as given in Table 3. Lastly, the model parameters for 0.18μm Technology were taken as given in Table 4.

The SPICE simulation results of the proposed circuit as a linear VCOs are shown in Figure 3 and Figure 4 which show the variation of oscillation frequency with control voltage also.

Figure 3. Frequency (Simulated)=7.133MHz,THD = 1.83 % with component values C₁= 20pF C₂=10pF C₃=30pF,Vn= 0.75V,Vp= -0.9V

Figure 4. Variation of oscillation frequency with control voltage

From the SPICE simulations, the circuit was found to perform as predicted by the theory with excellent linearity with respect to the external control voltage. Simulations have shown it to be possible to vary the oscillation frequency from 5.1MHz to 8.4MHz by varying control voltage from 0.3V to 1.4V with % error in the realized frequency lying between 0.0067% to -0.009% only. The power consumed by the circuit was 19.4nW only.

5. Comparison with Previously Published Current Conveyors/CFOA-based VCOs

A comparison of the proposed new single-CFOA-based VCO with the previously published Current Conveyors (CC) or CFOA-based VCOs is now in order. It is found that the proposed circuit attains most of the desirable features using only a single CFOA, three grounded capacitors (as preferred for IC implementation [25,26,27,28]) along with four MOSFETs only, in contrast to the previously known CC/CFOA-based VCOs of [2,10,18,20,21,22,23], which suffer from the drawbacks of requiring two or more building blocks [2,9] along with other devices like either a FET and a few additional resistors [18] or eight to twelve MOSFETs [10] or two analog multipliers [20,21,22,23].

6. Concluding Remarks

A simple single-CFOA-based three-capacitor-two-resistor oscillator circuit was the main focus of this article which has a tuning law in which two resistors appearing as product in the expression for oscillation frequency appear as a resistor-ratio in the condition of oscillation. By replacing these two resistors by two identical CMOS VCRs derived by a common control voltage, oscillation frequency becomes a linear function of the control voltage, whereas the oscillation condition remains unaffected by this process. The workability of the completely CMOS-compatible version of the circuit obtained by using a CMOS CFOA and CMOS VCRs was verified by SPICE simulations from which the linearity of the variation in the oscillation frequency, with respect to the control voltage, was found to be as predicted by the theory. Lastly, it may be mentioned that the proposed circuit attains most of the desirable features using only a single CFOA, three grounded capacitors (as attractive for IC implementation [25,26,27,28]) and four MOSFETs only in contrast to the previously known CC/CFOA-based VCOs of [2,9,10,18,20,21,22,23].

References

[1]   | Y. Tsividis, M. Banu, J. Khoury, “Continuous-time MOSFET-C filters in VLSI” IEEE Journal of Solid-State Circuits, 21, 15-30, 1986.
[2]   | D. R. Bhaskar, R. Senani, “New current-conveyor-based single-resistance-controlled/voltage-controlled oscillator employing grounded capacitors” Electronics Letters, 29, 612-614,1993 .
[3]   | S. Celma, PA Martinez, A. Carlosena, “Current feedback amplifiers based sinusoidal oscillators” IEEE Trans Circuits and Syst-I: Fundamental Theory and Applications, 41, 906-908, 1994.
[4]   | R. Senani, V.K. Singh, “Novel single resistance controlled oscillator configuration using current feedback amplifiers” IEEE Trans Circuits and Syst-I: Fundamental Theory and Applications; 43, 698-700, 1996.
[5]   | R. Senani, V.K. Singh, “Comment: Synthesis of canonic single resistance controlled oscillators using single current feedback amplifier” IEE Proc Circuits Device; 143(1), 71-72, 1996.
[6]   | M.T. Abuelma′atti, S.M. Al-Shahrani, “A Novel low-component-count single-element-controlled sinusoidal oscillator using the CFOA pole”, Int J Electron, 80(6),747-752,1996.
[7]   | M.T. Abuelma′atti, S.M. Al-Shahrani, “New CFOA-based grounded-capacitor single element controlled sinusoidal oscillator”, Active and Passive Electronic Components, 20,119-124, 1997.
[8]   | R. Senani, “Realization of a class of analog signal processing/signal generation circuits: novel configurations using current feedback op-amps”, Frequenz, 52, 196-206, 1998.
[9]   | D. R. Bhaskar, M. P. Tripathi, “Realization of novel linear sinusoidal VCOs”, Analog Integrated Circuits and Signal Processing, 24, 263-267, 2000.
[10]   | S.A. Mahmoud, A.M. Soliman, “Novel MOS-C oscillators using the current feedback op-amp”, Int J Electron, 87, 269-280, 2000.
[11]   | V.K. Singh, R.K. Sharma, A.K. Singh, D.R. Bhaskar, R. Senani, “Two new canonic single-CFOA oscillators with single resistor controls”, IEEE Trans. on Circuits and Systems-II, Express Briefs, 52, 860-865, 2000.
[12]   | A.M. Soliman, “Current feedback operational amplifier based oscillators”, Analog Integrated Circuits and Signal Processing, 23, 45-55, 2000.
[13]   | U. Cam, “A Novel single-resistance-controlled sinusoidal oscillator employing single operational trans-resistance amplifier”, Analog Integrated Circuits and Signal Processing, 32, 183-186, 2002.
[14]   | A. Toker, O. Cicekoglu, H. Kuntman, “On the oscillator implementations using a single current feedback op-amp”, Computers and Electrical Engineering, 28, 375-389, 2002.
[15]   | D. R. Bhaskar, R. Senani, “New CFOA-based single-element-controlled sinusoidal oscillators”, IEEE Transactions on Instrumentation and Measurement, 55, 2014-2021, 2006.
[16]   | H.P. Chen, K.H. Wu, “Voltage-mode DDCC-based multifunction filters”, Journal of Circuits, Systems and Computers, 16, 93-104, 2007.
[17]   | S.M. Al-Shahrani, “CMOS wideband auto-tuning phase shifter circuit”, Electronics Letters, 43, 804-805, 2007.
[18]   | S.S. Gupta, D.R. Bhaskar, R. Senani, “New voltage controlled oscillators using CFOAs”, Int J Electron Commun (AEÜ), 63, 209- 217, 2009.
[19]   | R. Senani, D.R. Bhaskar, S.S.Gupta, V.K.Singh, “A configuration for realizing floating, linear, voltage-controlled resistance, inductance and FDNC Elements”, International Journal of Circuit Theory and Applications, 37, 709-719, 2009.
[20]   | D.R. Bhaskar, R. Senani, A.K. Singh, S.S. Gupta, “Two simple analog multipliers based linear vco’s using a single current feedback op-amp”, Circuits and Systems, 1, 1-4, 2010.
[21]   | D.R. Bhaskar, Raj Senani, A.K. Singh, “Linear sinusoidal vco’s: new configurations using current-feedback-op-amps”, Int. J Elec, 97, 263-272, 2009.
[22]   | S.S. Gupta, D.R. Bhaskar, R. Senani, A.K. Singh, “Synthesis of Linear vco’s: The state-variable approach” Journal of Circuits, Systems and Computers, 20, 587-606, 2011.
[23]   | S.S. Gupta, D.R. Bhaskar, R. Senani, “Synthesis of new single CFOA-based vco’s incorporating the voltage summing property of analog multipliers”, ISRN Electronics, 1-8, 2012.
[24]   | R. Senani, D.R. Bhaskar, A.K. Singh, V.K. Singh, “Current feedback operational amplifiers and their applications”. Springer Science + Business Media, New York 2013, Chapter 5, 131-176.
[25]   | R. Senani, D.R. Bhaskar, V.K. Singh R.K. Sharma, “Sinusoidal oscillators and waveform generators using modern electronic circuit building blocks”. Springer International Publishing, Switzerland 2016; Chapter 5: 213-264.
[26]   | R.W. Newcomb, “Active integrated circuit synthesis”, Prentice-Hall Electrical Engineering Series, 1-292, 1968.
[27]   | M. Bhushan, R. Newcomb, “Grounding of capacitors in integrated circuits”, Electronics Letters, 3, 148-149, 1967.
[28]   | S.S. Gupta, R. Senani, “Realization of current-mode SRCO’s using all grounded passive elements”, Frequenz, 57, 26-37, 2003.