Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

An Automated Irrigation System for Greenhouses

Hatem Elaydi

Abstract: Gaza Strip is a small region with limited agriculture land and water resources. Greenhouse technology allows farmers to optimize the use of this land. In this paper a computer-based control and monitoring system is designed and tested to automate drip irrigation. The model greenhouse can be used as a prototype where several sensors are connected to an acquisition and control system using a PC and a data acquisition card. The designed system can be used as a stand-alone system by lay farmers with no technical background where they can command full control through a screen command. The system is set up to handle several crops by using a user screen to adjust certain parameters on the front panel. A web server enables users to remotely monitor and control the greenhouse through VI's from any place in the world with internet access. Moreover, the system periodically generates alarms and automatically sends emails to notify users of the conditions inside greenhouse.

Keywords: greenhouses, automatic drip irrigation, SCADA, Gaza strip, automation

Citation: Hatem Elaydi, An Automated Irrigation System for Greenhouses. American Journal of Electrical and Electronic Engineering, 5 (2). 48-57. January 2017. doi:10.12691/ajeee-5-2-3

1. Introduction

Greenhouse agriculture became popular in the last three decades. Greenhouse controlled environment provides a golden place to grow crops out of season and increase the crops' s productivity [1]. Greenhouse automation is the right tool to fully monitor and control the environment and has a dramatic social and economical impact. Greenhouses are translucent glass or plastic construction for hasting crops growth [2]. They allow for more effective use of water and daylight. Proper irrigation is key to improve quality and productivity of crops grown in greenhouses [3]. The time, duration, type and amount or irrigation are essential to optimize the use of water [4,5,6,7,8].

Different irrigation systems can be used such as: hand watering, overhead sprinkling system, movable irrigation boom, flood floor, drip irrigation, capillary mat, and hydroponics [9,10]. However, the drip irrigation is the most suitable for greenhouses in term of its efficient use of the available water. The soil moisture content determines the irrigation time; therefore, continuous monitoring is necessary to decide when to exactly start the irrigation.

Gaza Strip is located at the south eastern coast of the Mediterranean Sea (at 31 25 N, 34 20 E). As shown in Figure 1, it borders Egypt in the southwest and Israel in the south, east and north. Its area size totals 360 square kilometers such that it is stretched about 41 kilometers long (North-South), and from 6 to 12 kilometers wide (East-West). It has a total population of 2 million inhabitants (about 5000 inhabitants/km²) [11].

The Gaza Strip is considered as a water deficient and water-stressed middle eastern region [12]. The Gaza Strip mainly dependent on its coastal aquifer that runs along the Mediterranean from the borders of Egypt to Haifa. The availability of water resources in Palestine has been a problem and totally dependent on the annual amount of rain. The estimated water quantities drained from and supplied to the aquifer indicate negative current net effect on water availability in Gaza coastal aquifer [13].

Figure 1. Map of Gaza Strip [14]

Gaza suffers from regular drought, since Gaza rainy days average around 39 days per year with an average amount of rain about 372.1 mm/y [15]. This leads to deficit in the water budget which has been leading to deterioration in the quality and quantity of groundwater (EQA). The over-pumping of the aquifer leads to sea water intrusion, as shown in Figure 2, where the red color indicates dangerous level while color green indicates the safe level [14].

The scarce water and agriculture resources and the demands to meet urban expansion, put pressure on the agriculture industry to better optimize the use of these resources. This led to using modern irrigation technology and better use of the available land. Greenhouse technology has been utilized for the last three decades but with no monitoring systems, no control, and no data records of over-pumping and/or over-applying irrigation water. Using Monitoring and Control System can save an estimated 70% of excess irrigation water [16].

Figure 2. 2010 Groundwater Levels within the borders of Gaza [14]

Lack of data records on water usage in general, and irrigation water in particular makes it hard to move forward and optimize the use of water in the irrigation process. The low efficiency of water usage in the irrigation systems can be blamed on poor management of irrigation systems and lack of reliable monitoring systems. Moreover, lack of effective tool and modern equipment for better irrigation management makes it harder to measure improvement. The absence of accurate supervisory tools, makes this problem more complicated.

This paper presents an automatic drip irrigation system with monitoring and control features using SCADA technology. The irrigation is done based on the plants' needs and the automation process is done using PIC microcontroller technology.

This paper is organized as follow: section 2 talks about water irrigation, section 3 covers SCADA systems, section 4 shows the system design while section 5 presents the results, and section 6 concludes this paper.

2. Irrigation Systems

Modern drip irrigation systems is used in greenhouses in Gaza Strip where water is supplied near the root zone of the plants drip by drip; thus, making optimal use of the available water. Currently, Gaza farmers have been using drip irrigation technique through manual control. This process sometimes consumes more water and sometimes irregularity in watering causes the crops to dry. Water deficiency can slow growth rate and lead to lighter weight fruit. This problem can be solved using automatic drip irrigation system in which the irrigation will take place only when the crops need to be watered.

Valves are used to turn irrigation ON and OFF and is automated using controllers and solenoids in order to provide the right amount of water at the right time. Thus, automation reduces over watering saturated soils and avoids irrigating at the wrong time of day.

This paper divides the automation process into two parts: The first involves studying the basic components of irrigation system, while the second covers the design and implementation of the control circuitry.

2.1. Definition of Irrigation

Irrigation is defined as artificially applying water to the soil. It is mainly used in dry areas, controlled environment and in periods of dry seasons in order to protect plants against frost. There are three famous types of irrigation: localized irrigation, drip irrigation and sprinkler irrigation [17].

Drip irrigation allows water to drip slowly to the roots of plants using two ways: directly onto the soil surface or directly onto the root zone by using a network of valves, pipes, tubing, and emitters; thus, minimizing the amount used of water and fertilizer.

2.2. Drip Irrigation System

The drip irrigation supplied water to root zone of the plant more frequently, often daily, and slowly to maintain moist. Drip irrigation requires about half of the water needed by sprinkler or surface irrigation [18]. Plants can be supplied and consume water more efficiently. By keeping soil moist enough, plant foliage stays dry; thus, reducing disease and insect damage.

3. Design of Irrigation System

The following factors play major role in designing a mechanical model as detailed in [19]:

• Flow: Amount of water available per hour that can be measured as liters per hour.

Liters per minute x 60 minutes/hour = liters per hour.

• Pressure: Optimal operation pressure for irrigation products between 20-40 pounds. Normal household products operate between 40-50 pounds of pressure.

• Water Supply and its Quality: The type of water source and its quality will determine the necessary type of filter.

• Soil Classification: Soil can be classified based on its structure such as sandy, clay, and loamy. The type of soil will dictates the design of the water dripping system and its spread. Closer emitter spacing enables water to percolate vertically at a fast rate and horizontally at slower rate and this suitable for sandy soil. While in clay soil, water spreads horizontally covering a wider distribution area; thus, emitters can be spread out further apart. In loamy soil, water percolates evenly. Therefore, short and frequent cycles are best suited for clay soil or on a hillside, while higher gap emitters enable water to spread out horizontally and fit perfectly the sandy soil.

• Root of Plants: Plants with shallow roots require slow watering and emitters to be spaced closer together while plants with deep roots are fitted best with emitters spaced wider.

• Elevation: Water pressure changes with elevation such as one pound for every 2.3 foot change in elevation. Areas with large changes in elevation can utilize pressure-compensating emitters.

• Timing: Regular watering is essential to the plant health and growth. Short and frequent cycles prevent runoff, erosion and wasted water and are more suitable for clay soil or hillsides. Slow watering via tight emitters (small output) is more suitable for sandy soil. Timers control watering cycles in terms of frequency, duration and timing; thus, protecting plants from stress and slow growth.

• Watering Needs: Plants have different water needs in terms of quantity and frequency; thus, may require their own watering circuits. For example, orchards get watered weekly while a garden gets watered daily; a separate circuit for each is necessary. Similarly, dry weather plants need to be watered differently than wet weather plants that require a lot of water.

The automated drip irrigation system consists of: Pump, water filter, flow meter, control valve, chemical injection tools, drip lines with emitters, moisture and temperature sensors, and microcontroller.

4. Platform

A SCADA system is a powerful solution for monitoring and control of remote processes. Automated greenhouses can use microcontrollers or relay switches but they may require high maintenance costs with minimal upgradeability. A SCADA system can be easily developed and upgraded; therefore, logging and archiving, report generation, and alarm handling are part of most SCADA software [20,21,22,23,24]. These features can be utilized centrally in greenhouse operations. The designed system can be completely operated by lay farmers; thus, making it more attractive.

The system is implemented using LABVIEW software produced by National Instruments with VI portability features [24,25,26,27]. This software is compatible with most SCADA software where coding is implemented at the block-diagram level while the front panel forms the visual interface to monitoring and control. The main front panel of an automated greenhouse is shown in Figure 3. This front panel forms the visual link between the operator and the system.

Figure 3. Main front panel

5. System Design

The hardware is presented first, then followed by the software. A full description of control of temperature, humidity, and irrigation using the front panel is described.

5.1. Hardware

A prototype greenhouse is designed where it is divided into two sections: the control room and the actual greenhouse. The control room contains the main host computer and corresponding modules and other circuitry. The control room is connected electrically and logically to all sensors, motors, pumps, valves, etc. The host is loaded with the DAQ software and the field points configured accordingly. The circuitry and field points are not transparent to the operator who uses the system through a touch-screen monitor. The prototype of the actual greenhouse is seen in Figure 4.

Figure 4. Prototype of greenhouse and control room

The used components are described as follow:

5.1.1. Tank capacity GP2D12 Infrared Sensor

The GP2D12, shown in Figure 5, is a distance measuring sensor with integrated signal processing and analog voltage output proportional to the measured distance from 4-80 cm. The sensor is resistant to ambient lighting, angle of reflection, and color of detected object [28]. It is used to measure the water level in tank so it can be determined if the tank is empty or full. If it is empty, a pump will be automatically turn on and fills the tank.

Figure 5. IR sensor

5.1.2. Temperature Sensor LM35

The LM35, shown in Figure 6, is a sensor that is used to measure temperature with an electrical output proportional to the temperature, Co. The LM35 does not require any external calibration and maintains an accuracy of +/-0.4 Co at room temperature and +/- 0.8 Co over a range of 0 Co to +100 Co. The output voltage varies linearly with temperature. [29]. This sensor is utilized to measure the temperature of the greenhouse. The health of crop is dependent on suitable temperature; thus, high/low temperature leads a fan/heater to operate respectively to reach the desired value.

Figure 6. LM35 sensor

5.1.3. Humidity Sensor

The humidity sensor, shown in Figure 7, measures humidity of the greenhouse. Based on humidity level, high/low reading activates a fan to reach the desired value [30,31].

Figure 7. Humidity sensor

5.1.4. Valves

The valve, shown in Figure 8, needs 220V AC source to work. The valve will open to let water passes through it for irrigation purposes upon receiving a signal from computer. After the signal is turned off, the valve will close and water stops flowing [32].

Figure 8. Valve

5.1.5. Pumps

The used pump, shown in Figure 9, works at 12V DC. It pumps water from the tank if the water level is above a certain level. The tank is used to irrigate the plants in the greenhouse [33].

Figure 9. Pump

5.1.6. Moisture Scale

It is the device that measures the average moisture in the soil. It consists of a source of constant voltage connected in series with a constant resistance and a variable resistance which is the soil as illustrated in Figure 10. The variable resistance is conducted with the soil's resistance through Noresta poles.

Figure 10. The circuit of moisture scale

The electrical conduction in soil positively varies with the quantity of water in soil. The value of the soil resistance varies from 250MΩ for high moisture soil to 3GΩ for low moisture soil. We apply a 10 V voltage to the circuit, as the soil is being watered, the voltage value across the variable resistance varies. There is a direct relation between voltage and amount of water [34].

5.1.7. NI 6024E Data Acquisition Card (6024E DAQ)

The 6024E card contains 16 analog input channels, two analog output channels, a 68-pin connector and eight digital I/O lines. For time-related functions, the board utilizes NI DAQ-STC timing controller. The NI DAQ-STC uses control analog input, analog output, and general-purpose counter/timer functions. The functions utilize a total of seven 24-bit and three 16-bit counters and a maximum timing resolution of 50 ns. This board has Real-Time System Integration (RTSI) bus [35].

Analog Signals

Four analog signals are available in this design from: moisture scale, humidity sensor, level sensor, and temperature sensor. Table 1 shows pins and channels for analog signal entry of the DAQ.

Table 1. Analog Signals

Analog signals should go though stages like pre-filtering, amplifying, sampling and quantizing in order to deal with computer.

Digital Signals

Eight digital signals are available for operating the pump, valves, and fan, as shown in Table 2.

Table 2. Digital signals

The maximum voltage of the computer is 5 V which cannot run the output devices. As a result, a driver circuit is necessary. The pump and fan work at 12 VDC. As shown in Figure 11, the input is the signal which came from the computer so the relay can close the circuit of pump or/and fan. A valve is used for the water tank to irrigate the plants and works at 220 VAC.

Figure 11. Driver Circuit for pump and fan

5.2. Software

Processes that occur inside the greenhouse such as irrigation and the other factors that affect agriculture such as temperature, humidity, and light are considered here. We build our project "greenhouse1", shared variable and the VI's packages in project libraries. Each control process is in its own library as shown in Figure 12.

Figure 12. Greenhouse Project

Upon opening the project, you should choose the crop in order to select the control process that belongs to that crop that you choose as insulated as Figure 13. After that you should choose the process as shown in Figure 14.

Figure 13. Choosing the crops

Figure 14. Choosing the process

5.2.1. Temperature and HUMIDITY SYSTEM

The ideal ranges of temperature and humidity can be set through the front panel for any crops. The current value of temperature and humidity, are read through sensors, and are displayed. Based on these conditions, action is taken such as: e.g. if the temperature falls below a set value, then a heater is switched on. The designed system is an ON-OFF system but can easily be extended to a PID control system. The limit ranges can be preset or controlled using the front panel. The range can be changed by setting the end-point through the front panel itself. The LEDs represents the status of equipment control when the values exceed the acceptable range.

A fan is placed on the wall of the greenhouse or we can use a water pump to reduce the temperature of the greenhouse. A heater is used when the temperature is increased. The operator can also start or stop devices manually.

Foggers and dehumidifiers are equipment used to control electronically the humidity level within the greenhouse. The data can be archived for use later on.

5.2.2. Irrigation System

Automatic Irrigation is an essential tool for accurate soil moisture control in greenhouses. It provides simple means of accurately sensing the soil moisture levels and releasing the required amounts of water [28,29,30]. The removal of human error in estimating and adjusting available soil moisture levels enables the farmer to maximize net profits.

First the level of water in tank will be measured using IR level sensor. If the water level is low then the EMPTY led will be turned on which give an order to the pump to switch on and fill the tank. If the tank level is high then the FULL led will be turned on. The moisture in the soil is measured using "moisture scale" and compared with the acceptable range. According to this test, the moisture considered to be LOW or HIGH. If the moisture scores LOW and the tank water is FULL, then a signal applied to the valve to open and release the water to irrigate the soil.

5.2.3. Stored Data

If you click on the button "previous data", a SubVI will be opened, as shown in Figure 15. SubVI contains a table of the stored data and the date and time of events. The user can convert this table to report to print or to change it to HTML to be used in webpage setting, as an example show in Figure 16.

Figure 15. SubVI Data base of irrigation system

Figure 16. Database file in access format

5.3. Remote Panels

Users can gain access to the VI's to monitor and control them remotely from LabVIEW environment or from a web browser without any programming. The two access methods will be explained in the following subsections.

5.3.1. Using LabVIEW Program

To gain access to a remote panel from within LabVIEW, select Operate >> Connect to Remote Panel from the menu. This will open a dialog where you can enter your connection parameters, and connect to the server, as shown in Figure 17.

Figure 17. The Connect to Remote Panel dialog

Once you are connected, the remote panel client window, as shown in Figure 18, will appear and you will be able to take control and use the VI.

Figure 18. Remote panel client window connected to a VI

At any time during this process, the host computer can take control of the application away from any of the remote clients. Figure 20 shows a remote front panel screen with a message when the server regained control. At that point, the client will be able to just monitor the situation until the server release control to the client.

5.3.2. Using Web Browser

Using a web browser in the client computer, the user enters the address of the remote panel. The, Right click on the panel and request control of VI, as shown in Figure 20. If access is authorized, control of the VI is granted, just as if running it from LabVIEW. The client can release control, from the panel's pop-up menu via the Remote Panel.

Figure 19. Remote panel client window when server regained control

Client >> Release Control of VI option. Note that only one remote panel can be activated at any given time. Control of the VI front panel (the real VI's front panel) can be re-established, from the pop-up menu of the VI, by selecting the Regain Control option. The server can also lock out other panels from gaining control by choosing the Remote Panel Server >> Lock Control option.

Figure 20. Requesting control through VI using web browser

5.4. email Notifications

In this system, the SMTP server of the Islamic University of Gaza was utilized. The e-mails are sent to IUG webmail account. In Figure 21, the temperature goes to a high value so the user get an email indicating that.

Figure 21. email notification of high temperature

6. Conclusion

A greenhouse was designed to achieve optimal irrigation and growth factors. In this paper, a computer-based control and monitoring system was designed and tested to automate drip irrigation. The model greenhouse was used as a prototype and used several sensors and was connected to an acquisition and control system using a PC and a data acquisition. The designed system also controlled humidity, temperature, and irrigation. The developed system can be used as a stand-alone control and monitoring system for novice farmers with no technical background.

The system can be programed to work with any crop by simply adjusting certain parameters on the front panel of a user screen. The fully automated greenhouse had a control room for monitoring and governing. A web server was placed in the control module of the greenhouse and it can be controlled remotely from any place in the world. Moreover, the system periodically generates alarms and automatically sends emails to notify users of the conditions inside greenhouse.

Future work may involve implementing the system on real life environment and using emails and SMS for monitoring and control, using image processing technology and using PLC technology.

References

[1]   | Richard G. Snyder (2017). “Environmental Control for Greenhouse Tomatoes,” Agricultural Communications, Extension Service of Mississippi State University, Publication no 17. Accessed March 27, 2017. http://extension.msstate.edu/sites/default/files/publications/publications/p1879.pdf.

[2]  
British Columbia Ministry of Agriculture and Lands (2015). “Understanding Humidity Control in Greenhouses,” Greenhouse fact sheets.. Accessed March 27, 2017 http://www2.gov.bc.ca/assets/gov/farming-natural-resources-and-industry/agriculture-and-seafood/animal-and-crops/crop-production/understanding_humidity_control.pdf.

[3]   | E.H. Simonne, M.D. Dukes, and L. Zotarelli (2010). “Principles and practices of irrigation management for vegetables,” Horticultural Sciences Dept., UF/IFAS, Fla. Coop. Ext. Serv., Publication no. AE260, Chapter 3, pp. 1-8.
[4]   | R. Alimardani, P. Javadikia, A. Tabatabaeefar, M. Omid and M. Fathi (2009). “Implementation of On/Off Controller for Automation of Greenhouse Using LabVIEW,” Artificial Intelligence and Computational Intelligence, Lecture Notes in Computer Science, Vol. 5855, pp. 251-259, 2009.
[5]   | M Nagarajapandian, U Ram Prasanth, G Selva Kumar, and S. Tamil Selvan (2015). “Automatic irrigation system on sensing soil moisture content,” International Journal of Innovative Research in Electrical, Electronics, Instrumentation and Control Engineering Vol. 3, Issue 1, pp. 96-98.
[6]   | Cardenas-Lailhacar, B., & Dukes, M. D. (2012). “Soil moisture sensor landscape irrigation controllers: A review of multi-study results and future implications,” Trans. ASABE, Vol. 55, No. 2, 581-590.
[7]   | B. Cardenas-Lailhacar and M. D. Dukes (2016). “Soil moisture sensors controlling irrigation with reclaimed water in landscapes; Part I: Field-plot study,” Applied Eng. Agric, Vol. 32, No. 2, pp.217-224.
[8]   | D.D. Fang Meier, D.J. Garrote, F. Mansion, and S.H. Human (1990). “Automated irrigation systems using plant and soil sensors. in: visions of the future,” ASAE Publication 04-90. American Society of Agricultural Engineers, St. Joseph, Michigan, pp. 533-537.
[9]   | Jess Stryker (2017). “Irrigation Tutorials”, Accessed March 27, 2017. http://www.irrigationtutorials.com/
[10]   | G. Kavianand, V. M. Nivas, R. Kiruthika and S. Lalitha (2016). “Smart drip irrigation system for sustainable agriculture,” 2016 IEEE Technological Innovations in ICT for Agriculture and Rural Development (TIAR), Chennai, 2016, pp. 19-22.
[11]   | Palestinian Central Bureau of Statistics (PCBS) (2016). Statistical Yearbook of Palestine, Palestine.
[12]   | Y. Mogheir and M. Aiash (2013). “Evaluation of Gaza Strip Water Situation and Water National Plans Using International Water Poverty Index (WPI),” International Journal of Emerging Technology and Advanced Engineering, Vol. 3, Issue 9, pp 396-404.
[13]   | Palestinian Water Authority (PWA) (2011). The Gaza Emergency Technical Assistance Programme (GETAP) on Water Supply to the Gaza Strip, The Comparative Study of Options for an Additional Supply of Water for the Gaza Strip (CSO-G), The Updated Final Report. Gaza Strip, Palestine.
[14]   | Palestinian Water Authority (PWA) (2012). “Water Demand Management Plan and its Implication of the Water Resources Deficit on Gaza Strip,” Gaza Strip, Palestine.
[15]   | Environment Quality Authority (EQA) (2016). “Initial National Communication report to the United Nations Framework Convention on Climate Change (UNFCCC),” Ramallah, Palestine, Accesed March 10, 2017. http://environment.pna.ps/ar/index.php?p=home.
[16]   | Muñoz-Carpena, R., M.D. Dukes, YC. Li, and W. Klassen (2007), “Design and evaluation of a new controller for soil water-based irrigation control,” Applied Engineering in Agriculture, Vol. 24, No. 2, pp 183-191.
[17]   | N. Vijay (2012). “Application of sensor networks in agriculture,” IET Chennai 3rd International on Sustainable Energy and Intelligent Systems (SEISCON 2012), Tiruchengode, 2012, pp. 1-6.
[18]   | P. Ashok and K. Ashok (2011). “Microcontroller Based Drip Irrigation System,” International Journal & Magazine of Engineering, Technology, Management and Research, pp. 741-746.
[19]   | D. N. Wavha, S. Ghumatkar, M. Giri, and N. Kumar (2014). “Water Management System for Agricultural Sector,” American International Journal of Research in Science, Technology, Engineering & Mathematics, Vol. 8, No. 2, pp. 137-142.
[20]   | S. Bhutada, S. Shetty, R. Malye, V. Sharma, S. Ramamoorthy (2005). “Implementation of a fully automated greenhouse using SCADA tool like LabVIEW,” Proceedings, 2005 IEEE/ASME International Conference on Advanced Intelligent Mechatronics., Monterey, CA, pp. 741-746.
[21]   | Ronald L. Krutz (2006). Securing SCADA Systems. Wiley Publishing, Inc., Indianapolis, USA.
[22]   | J.M. Molina-Martinez and A Ruiz-Canales (2010), “Development of a SCADA system for irrigation programming and educational use in agriculture,” 2nd International Conference on Education and New Learning Technologies, Barcelona, Spain, 5-7 July, 2010.
[23]   | J.M. Molina-Martínez and A. Ruiz-Canales (2010). “Development of a SCADA system for irrigation programming and educational use in agriculture,” EDULEARN10 Proceedings of 2nd International Conference on Education and New Learning Technologies, 5-7 July, 2010, Barcelona, Spain, pp. 4199-4210.
[24]   | National Instruments .”Sharing Code with the LabVIEW Project Library,” 30 April 2008, available on line: http://zone.ni.com/devzone/cda/tut/p/id/4067.
[25]   | National Instruments. “Overview of LabVIEW Data logging and Supervisory Control Module features,” 30 April 2008, available online: http://www.ni.com/swf/presentation/us/labview/newdsc/default.htm.
[26]   | National Instruments. “Advanced Tips and Techniques in LabVIEW Remote Panels”, 30 April 2008, available on line: http://zone.ni.com/devzone/cda/tut/p/id/5154.
[27]   | Jeffrey Travis, and Jim Kring(2006), LabVIEW for Everyone: Graphical Programming Made Easy and Fun, Third Edition, Prentice Hall.
[28]   | Sharp GP2D12 distance measuring sensor, Specification Sheets, Accessed on March 7, 2016. https://engineering.purdue.edu/ME588/SpecSheets/sharp_gp2d12.pdf.
[29]   | Texas Instruments, LM35 Temperature Sensor with Analog Output. Accessed March 14, 2016. http://www.ti.com/product/LM35.
[30]   | AMT1001-module-Resistive-Temperature-Humidity-Sensor. Accessed March 15, 2016, http://s2.electrodragon.com/wp-content/uploads/2012/03/AMT1001-module-Resistive-Temperature-Humidity-Sensor.jpg.
[31]   | C. Stanghellini, and T. De Jong (1995). “A model of humidity and its applications in a greenhouse,” Agriculture and Forest Meteor, Vol. 76, pp 129-140.
[32]   | Electric water valve. Accessed on March 27, 2016. http://www.asco.com/ASCO%20Asset%20Library/asco-solenoid-valves-engineering-information.pdf.
[33]   | 12 V DC water pump. Accessed on March 27, 2016 http://yhpump.manufacturer.globalsources.com/si/6008843303127/pdtl/Mini-brushless/1133265429/12V-DC-Water-Pump.htm.
[34]   | Building soil moisture sensor using noresta poles, Learning about electronics, “How to Build a Soil Moisture Sensor Circuit with an Arduino.” Accessed on March 27, 2016 http://www.learningaboutelectronics.com/Articles/Arduino-soil-moisture-sensor-circuit.php.
[35]   | National Instrument, Data Acquisition card, DAQCard-6024E for PCMCIA, http://sine.ni.com/nips/cds/view/p/lang/en/nid/10969.