Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Prediction of Punching Strength of Reinforced Concrete Footings by Finite Element Method

Faris R. Ahmed*, Kamaran K. Hamad, Zahraa N. Rashied

Civil Engineering Department, Faculty of Engineering, Koya University, Erbil, Kurdistan Region, Iraq

Abstract: This paper presents a nonlinear finite element modeling and analysis of the punching behaviour of reinforced concrete footings. The foundation system was modeled using ANSYS software. Several experimental tests were collected from literature to support the software outputs. The deflection in the footing’s concrete has been studied, marking the cracking patterns under column, and computing the failure loads for each footing. The experiments results were compared with the finite element results obtained from the modeled footing. The results indicated that the punching behaviour obtained from the analytical model using ANSYS software give good agreement with the experimental data with conservative difference of about 10 percent. Also, results of column`s punching shear capacity, using a number of codes of practice, were presented in this paper and compared with both experimental and the finite element results.

Keywords: punching, shear stresses, comparative analysis, footings, finite element analysis, ANSYS

Citation: Faris R. Ahmed, Kamaran K. Hamad, Zahraa N. Rashied, Prediction of Punching Strength of Reinforced Concrete Footings by Finite Element Method. American Journal of Civil Engineering and Architecture, 5 (1). 8-16. January 2017. doi:10.12691/ajcea-5-1-2

1. Introduction

One of the undesirable structural failure modes in buildings is the brittle punching shear failure of footings. Unfortunately, the number of experiments of footings punching on real soil is too small to formulate general conclusions. Deficit of experimental results for column footings leads to the use of finite element analysis models since a more detailed parametric study can be conducted to determine the influence of the parameters that are introduced in calculating the footing punching capacity.

Lee et. al. (2014) [9] used nonlinear finite element (FE) analysis to study the punching failure behavior of the footing. Series of experimental tests were performed by inserting steel funnel shaped to act as punching preventer (Punching Shear Preventers, PSP). The objective of the new method was to increase the punching capacity and the ductility of the footing. Five large scale footings were tested with the same size and reinforcement. The size effect, thickness, and location of PSP had been investigated. It was concluded that the FE analysis is capable of verifying the test results. The results and the proposed design recommendations were compared with ACI Code prediction and showed underestimation of the footing capacity with these punching preventers.

Vacev et. al. (2015) [13] made one experimental test sample of dimensions (850×850×125) mm of isolated reinforced concrete (RC) column footings rested on sub-grade soil and loaded until failure. The aim of the study was to determine the behavior of footing’s punching failure and comparing it with the result obtained from finite element analysis using ANSYS software. The researcher discussed the method of choosing the criterion of determining the failure load by FE. They suggested several methods such as the time when equilibrium of the internal forces is no longer valid due to the excessive deformations, by recording the vertical sudden displacement of the column top, or by observing the reinforcement strain for the column and footing and recording the sudden strain. No obvious statement was stated about which criteria was selected by the authors to determine the failure load, but it seems that it was the one which gives the lowest value.

2. Previous Experimental Works on Footing Punching

According to literature, relatively few punching tests for column footings resting on real bedding have been performed. The bedding natural was simulated in some of these tests by steel springs [11], by a set of small jacks, or by line loads which produced the same effect as the load exerted by a uniformly reactive soil [5]. The punching tests on real soil were practically implemented by Hegger et. al. (2006) [6] in a sandbox and by a real soil by Folić et. al. (2013) [4]. The geometric characteristics, number of tested footings, and supports used are presented in Table 1.

Table 1. Summary of some previous column-footing experiments

Hegger et. al. (2006) [6] tested five 900×900 mm reinforced concrete footings (DF1 to DF5) with realistic boundary conditions and designed to fail in punching. Full details of the tested footings are given in Table 2. The square column stubs were cast monolithically at the center of the slabs. The footings DF4 and DF5 were designed to investigate the effect of small shear slenderness (a/d) on the punching behavior. Although specimen DF3 had shear reinforcement, but this is out of the scope of this work and it will be discarded.

Table 2. Experimental data of previous column-footing experiments

The specimens were tested in a sandbox and their dimensions were chosen to fit into it. They developed a design model for the punching strength of footings taking into consideration the soil-structure interaction. The work results showed that the failure angle is steeper than observed in punching tests on flat slabs, and the shear slenderness considerably affects the punching shear capacity. Furthermore, the sand density does not affect the distribution of stresses below the footing, i.e. considering a uniform stress distribution gives sufficient safety against punching. The derived model was based on BS8110-1:1997 [2] provisions.

Few years later and in order to supplement their previous work, Hegger et. al. (2009) [7] completed their works [4] and tested additional 17 reinforced concrete footings (DF6 to DF22) to study the punching shear behavior. Several (a/d) and concrete compressive strength were taken. The tests were divided into two series, (DF6 to DF10) were realistically supported on sand. The second one (DF11 to DF22) were inverted upside down so that it supported on the column stub and a load applied on footing via 16 Polytetrafluoroethylene (PTFE) bearings connected to steel beams to simulate the case of uniformly distribution.

The experimental investigations proved the previous conclusion that the angle of the shear crack was steeper in specimens on compact footings than observed in tests on more slender slabs. Furthermore, the (a/d) significantly affects the punching shear capacity since more loads will be distributed out of the punching failure cone. Based on the test results, the ACI and Eurocode-2 provisions were reviewed and improvements were proposed. The experimental program and its implementation are described in Table 2.

The schematic of the experimental setup of Folić et. al. (2013) [4] consisting of a test frame, six test specimens, hydraulic jack, and prepared sub-grade. The frame is placed at the bottom of the footing pit measuring 4×5 m in plan with 3m depth. Gravel layers are compacted by vibrator at the bottom of testing steel frame. The gravel layers and the sub-soil compacted so that the modulus of compressibility was chosen to be about 40 to 70 MPa, which represent the normal compaction of the subsoil.

The adopted footing dimensions were 850×850 mm in plan, and they correspond to experiments made by Hegger et al. (2006) [6] for the sake of result comparison possibilities, and also to be within the capacity of the available test equipment (approximately 1000 kN). Foundations TIII and TVIII did not fail since their punching capacity was higher than the capacity of the testing machine. The dimensions and characteristics of the footing are given in Table 2.

They concluded that the punching strength is mostly related to the floor structures, and less to the footings under columns. The results obtained were compared with the predicted results based on various codes/regulations and showed that the punching shear capacity values based on these codes are significantly underestimated.

3. The Finite Element Model

All material models used for simulate the material properties of the specimens to the computer program are given in this section. ANSYS 15 finite element program is used for analysis, and the material properties of concrete, reinforcement, soil, and pads are defined to feed the software to complete footing modeling.

3.1. Concrete

The eight nodded solid element, SOLID65, is used for the 3D modeling of solids with and without reinforcing bars since it has rebar capability for modeling reinforcement and its behavior. The element is able to crack in tension and crush in compression in three orthogonal directions, and capable of plastic deformation. The geometry and other specifications for this element are specified in the software technical specification. Three types of cracking in SOLID65 are possible which are labeled ‘first’, ‘second’ and ‘third’ according to their occurrence order and can be visualized based on these labels. The element features are not including calculating the crack width, so cracks existence does not mean that these cracks are visible. In this study, crack profiles with ‘second’ cracks are more consistent with the experimental cracks than the ‘first’ and ‘third’.

3.2. Reinforcement

The rebars used in this work are smeared within the SOLID65 elements, and then the reinforcement defined using the real constants of SOLID65 element. This method needs more efforts in modeling than discrete it with the LINK8 element. The required steel properties to feel the software include density, modulus of elasticity, and Poisson’s ratio and they are shown in Table 2 and Table 3.

Table 3. Material properties for ANSYS model

3.3. Modeling of Bearings Pad

SOLID65 is also used to represent the PTFE bearing pads. They were modeled as a linear isotropic material with properties as shown in Table 3.

3.4. Modeling of Soil

The soil was modeled as an isotropic material with the basis of the Drucker–Prager’s elastic-perfectly plastic material criteria. The models were developed using 3D SOLID65 Element. In order to use this material model, it is necessary to define the cohesion (C), and angle of internal friction (φ) which are given in the original references, with modulus of elasticity and Poisson’s ratio. For sand or gravel soils (i.e. cohesion C = 0), implies that the material does not have any uniaxial compressive or tensile strength. The material, therefore, has to be iterated into a stable position. This leads to convergence difficulties, so it is advised to use an adequately small value instead of zero for the cohesion while using the Mohr-Coulomb (LAW = 1) yield conditions [ANSYS, 2015].

3.5. Modeling Interaction Contact

In ANSYS, several possible ways to represent the interaction contacts are possible. In this research Node-to-Surface model is used to represent the contact between footing and pads/soil elements. CONTA175 element is used here, which has a great ability to simulate large sliding and deformation. Contact occurs when the element surface penetrates one of the target segment elements (TARGE170) on a specified target surface. The nonlinear contact elements CONTA175 were added to the surface of the footing, while TARGE170 elements were added to the bearing pad and soil surfaces. [ANSYS, 2015].

3.6. Boundary Conditions

Although the model was symmetric, the whole models were simulated. The nodes of the bearing pads in the lowest plane were constrained in all degrees of freedom (DOF); the left and right planes were left free without any constraints, so that it could move in all directions. For the case of soil, all nodes located on all lateral faces of soil block were released in vertical direction while in other direction were constrained. Nodes located on bottom face of soil block were constrained in all directions. See Figure 1.

Figure 1. ANSYS Loads and boundary conditions

3.7. Loads and Load Stepping

In this work, the total applied load was divided into a series of load steps (increments). The ANSYS software controls the size of these steps whether maximum or minimum load step size is required according to the previous solution history and the convergence behavior whether it is smooth or abrupt. The total numerical applied load was that from the experiment increased by 10%.

4. Discussions of Results

The aims of this study were to show:

(1) To check the applicability of ANSYS software for analyzing and predicting the crack patterns and failure loads of RC footings;

(2) To show the entire phases of the FE model behavior from initial cracking until failure.

4.1. Load Deflection Curves

A number of experimental deflection curves carried out by Hegger et. al. (2009) [7] with the corresponding ANSYS load-deflection curves obtained for the footings are illustrated in Figure 2. The curves, in general, showed a good agreement in FE analysis with the test results. It’s been noticed that deflection by the ANSYS is slightly stiffer than the actual footings because full bond between concrete and reinforcement is assumed (no slip) in the finite element analyses, but for the actual footings slip occurs anyway.

Figure 2. Load-deflection curves obtained for the footings; (a) Original test, (b) Deflection by FE (ANSYS)

4.2. Failure Load

Results showed that the failure load obtained from the FE analysis is slightly smaller (conservative) than the experimental load. The final loads for the finite element models are the last applied load step before the solution diverges due to numerous cracks and large deflections, see Figure 3, (i.e. as example, by comparing Figure 3 with Figure 2(b) above, the deflection is increased dramatically in one load step!).

Figure 3. Large deflection when reaching the ultimate load

Table 4 shows comparison between the ultimate loads of the experimental footings and the final loads from the FE models.

Table 4. Comparison of ultimate normal force in column

4.3. Cracks Pattern

The ANSYS program save the cracks pattern for each load step, displaying circles at cracks locations or crushing in the concrete elements. Cracking is displayed as a small circle in the crack plane, while crushing is shown as an octahedron outline. The ‘first’ crack at integration point is shown with a red circle outline, the ‘second’ crack with a green outline, and the ‘third’ crack with a blue outline [ANSYS, Inc 2015].

Figure 4 shows crack patterns progressing developed for some models at the last loading step. It is clear that, in general, the generated cracks have almost the same crack shape and angle corresponding to the experimental specimens at failure stage.

Figure 4. Crack patterns for some models with the corresponding real test

4.3.1. Deflection and Stress Comparison at First Cracking

The cracking patterns in the footings can be obtained using the Crack/Crushing plot option in ANSYS. Vector Mode plots must be turned on to view the cracking in the model. The initial cracking of the footing DF12 (as example) in the FE model corresponds to a load of 800 kN (which is represent about 34% of the ultimate punching capacity of footing) and induces stress beyond the modulus of rupture of concrete (3.14 MPa) as shown in Table 2.

The stress increases up to 3.24 MPa at the centerline when the first crack occurs. The first crack can be seen in Figure 5, which is a flexural crack with maximum deflection of 0.356 mm.

Figure 5. First concrete crack at 800 kN for DF12

4.3.2. Behavior after First Crack

In the non-linear region of the response, subsequent cracking occurs as more loads are applied. Cracking increases in the region, and the footing starts cracking out at a load of 1,150 kN. Significant flexural cracking occurs in the footing at 1,500 kN. Also, diagonal tension cracks are starting to appear in the model. This cracking can be seen in Figure 6 and Figure 7.

Figure 6. Cracking at 1,150 kN for DF12

Figure 7. Increased cracking after yielding of reinforcement at 1,500 kN for DF12

4.3.3. Reinforcement Yielding and Beyond It

Yielding of steel reinforcement occurs when a force of 1,500 kN is applied, see Figure 7. At this point in the response, the displacements of the footing begin to increase at a higher rate as more loads are applied. The cracked moment of inertia, yielding steel and nonlinear concrete material, now defines the flexural rigidity of the member. Larger deflections occur at the center and the ability of the footing to distribute load throughout the cross section decreased greatly.

Figure 8 shows successive cracking of the concrete footing after yielding of the steel occurs. At 2,200 kN, the footing has increasing flexural cracks, and diagonal tension (shear) cracks. Cracking reached the top face, failure is soon to follow.

Figure 8. Failure of the concrete footing at 2,200 kN for DF12

At load of about 2,300 kN, the footing can no longer support additional load. Severe cracking throughout the bottom face region occurs.

5. Use of Codes of Practice in Predicting the Failure Loads

Generally, codes do not differentiate between punching shear strength of flat plates and footings, but it allows subtracting a part of the soil reaction from the punching load. However, this amount differs from one code to another according to the critical path location. In this study, no reaction is subtracted since this area, in some codes, are bigger than the footing itself.

According to the design code, the ultimate shear is:

where:

: Shear stress at punching of the control section,

: Perimeter of the control section according to adopted regulations, see Figure 9.

d: Effective depth of footing.

Describing the detailed procedure and recommendations of these codes are not within the scope of this paper.

The ultimate axial force shown in Table 4 was calculated for the purpose of comparison, and it was assumed that the safety reduction factors equal to one.

5.1. ACI 318-14 Code

The ACI code [7] takes the critical section at (0.5 d) from the column face and its shape similar to the column shape. The concrete punching shear capacity in the control section is calculated according to the equations (a), (b) and (c) listed in Table 22.6.5.2 of the ACI code.

5.2. BS 8110-1:1997 Code

This code takes the critical section at a distance of (1.5 d) from the column face and its shape also similar to the column shape. In this work, the partial safety factor taken is γm = 1.25.

5.3. Eurocode 2 [3] Code

The punching shear capacity around the column is checked on two places, along the column perimeter and in the basic control section at the distance of (2.0 d) from the face of the column. The material resistance factor for concrete taken is γc = 1.5, σcp = 1.5, and β=1.15.

Figure 9. The critical punching perimeter section for different codes

6. Comparison between the FE Model and Literature Experimental Results

The punching databank for footings without shear reinforcement contains 23 punching tests. The comparison between these tests and selected codes are based on the ratio of the punching load Vcode and the experimental punching load Vtest. The punching shear capacities were calculated using characteristic concrete strength (fc,cyl = 0.85 × fcu).

The results in Table 4 that obtained from literature experiments, the results based on this work, and codes are clearly shown in Figure 10.

Figure 10. Comparative diagrams of ultimate force ratios calculated by FE and codes (the 100% represents the experimental)

7. Conclusions and Recommendations

The following conclusions can be stated based on the evaluation of the analyses of the reinforced concrete footing:

1. Modeling the punching shear failure of concrete footing by nonlinear finite element is adequate flexibility to solve complex problems as in realistic soil bedding.

2. The tests results when compared with the predicted strength obtained from ACI [1], BS [2], and Eurocode-2 [3] design equations and they showed underestimation of the footing strength by about 46, 52, and 52% respectively, while it was just 10% when compared with the FE results.

3. In the current study, the adopted criterion for obtaining the maximum punching shear failure load is when shear crack pattern in the incomplete punching pyramid under the column reach the top face of the footing followed by excessive deflection. By using this criterion, the predicted results converged well to the test results.

4. The fact that all the codes calculations give high (Exp/Calc) ratios indicates that the punching effect on footings is less pronounced when compared with an ordinary flat slab. Further work is recommended to confirm this inference.

References

[1]   | ACI Code 318M-14 (2015). “Building Code Requirements for Reinforced Concrete”, American Concrete Institute.
[2]   | British Standards Institution BS8110 (1997). “Code of Practice for Design and Construction”, British Standard Institution, Part 1, London.
[3]   | European Standard (2004). “Eurocode 2: Design of concrete structures - Part 1-1: General rules and rules for buildings”, approved by CEN.
[4]   | Folić, R., Bonić, Z. (2013). “Punching of column footings - Comparison of Experimental and Calculation Results”, GRAĐEVINAR 65 (10), pp. 887-899.
[5]   | Hallgren, M., Kinnunen, S. and Nylander, B. (1998). “Punching Shear Tests on Column Footings”, Nordic Concrete Research 21(1), No. 1, Oslo, pp. 1-22.
[6]   | Hegger, J., Sherif, A.G., Ricker, M. (2006). “Experimental Investigations on Punching Behavior of Reinforced Concrete Footings”, ACI Structural Journal, July-August, pp. 604-613.
[7]   | Hegger, J., Ricker, M., and Sherif, Alaa G. (2009). “Punching Strength of Reinforced Concrete Footings”, ACI Structural Journal, V. 106, No. 5, pp. 706-716.
[8]   | Joseph E. Bowles (1974). “Analytical and Computer Methods in Foundation Engineering”, Book by McGraw-Hill Kogakusha.
[9]   | Lee, S., Moon, J., Park, K., and Bae K. (2014). “Strength of Footing with Punching Shear Preventers”, Hindawi Publishing Corporation, Vol 2014, Article ID 474728, 15 pages.
[10]   | Rivkin, S. (1967). “Calculation of Foundations”, Budivel’nik (in Russian).
[11]   | Talbot, A.N. (1913). “Reinforced Concrete Wall Footings and Columns under Concentrated Loads”, Research and Development Bulletin D47, Illinois.
[12]   | Timm, M. (2003). “Durchstanzen von Bodenplatten unter rotationssymmetrischer Belastung”, PhD thesis, Technical University of Brunswick, Brunswick, Germany, pp. 159 (in German).
[13]   | Vacev, T., Bonić, Z., Prolović, V., Davidović, N., Lukić, D. (2015). “Testing and Finite Element Analysis of Reinforced Concrete Column Footings Failing by Punching Shear”, Engineering Structures, Volume 92, PP. 1-14.