Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Safety Study of Three Concentrations of UniPron Vaginal Contraceptive Microbicidal Gel

Obiero Jael*, Waititu Kenneth Kariuki, Mwethera Peter Gichuhi

Department of Reproductive Health and Biology, Institute of Primate Research, Nairobi, Kenya

Abstract: Background: UniPron is an antimicrobial and a spermicidal agent that contains citric acid as the active component. This study was designed to evaluate the effects of three different concentrations of UniPron in the baboon (Papio anubis) model. Methods: Twenty sexually mature female baboons were used in this study. Vaginal pH and microflora, blood chemistry, vaginal and cervical histology were evaluated at baseline and after administration of 15 ml of UniPron 0.4, 0.8 and 1.2 gm or placebo twice a week for eight weeks to each randomized treatment group. Results: Baseline vaginal pH was 5.2±0.8. There was no significant difference in the vaginal pH and blood chemistry parameters. The microflora composition was diverse and slight variation in percentage frequency between UniPron concentrations was observed. No detectable histological changes were observed in the vaginal or cervical sections. Conclusion: Repeated application of 15 ml of three UniPron concentrations appeared to be safe when administered intravaginally in the baboon model.

Keywords: UniPron, baboon, safety, vagina, microbicide, contraceptive

Citation: Obiero Jael, Waititu Kenneth Kariuki, Mwethera Peter Gichuhi, Safety Study of Three Concentrations of UniPron Vaginal Contraceptive Microbicidal Gel. American Journal of Biomedical Research, 6 (2). 33-39. January 2018. doi:10.12691/ajbr-6-2-1

1. Introduction

The role that the vaginal bacteria plays in protecting the host from sexually transmitted infections (STIs), including HIV infection is becoming increasingly appreciated. Due to increased incidence of STIs, the development of vaginal products with microbicidal activities is a high priority in contraception research [1]. Women who are at risk of STIs are by definition also at risk of unintended pregnancy [2]. In the recent past, research and development of microbicidal contraceptives has been widely considered as they would ideally provide a convenient, readily available method of self-protection against STIs in addition to preventing unplanned pregnancy [3,4,5]. This female-controlled method of protection would also empower women because it offers a system that does not require consent from men. However, a major challenge has been to design mechanism-based products that are highly effective against pregnancy and STIs/HIV infections while lacking detergent-type effects on epithelial cells and normal vaginal flora [6]. Over the past two decades, both contraceptive and non-contraceptive microbicidal vaginal products have been undergoing development and investigation [4,5,7,8,9,10,11,12,13]. There is concern over the vaginal and cervical irritation caused by some of the products under investigation because these epithelial changes are thought to increase the risk of STI/ HIV acquisition for women at high-risk for infection, especially with frequent application [14,15,16,17]. It is essential that the evaluation of the potentially harmful effects of these compounds on the vaginal epithelium and/or normal vaginal flora be made before subjecting women to their use. Effective multipurpose prevention technologies for women’s reproductive health is an area searching for innovative strategies and approaches to increase access and adherence [2]. Research and development of dual microbicidal contraceptive are yet to produce safe and effective products and new approaches continue to emerge to achieve this goal. This study aimed to assess the safety of vaginal dosing of 0.4 gm, 0.8 gm and 1.2 gm of UniPron in terms of local and systemic effects in the baboon model. Smugel gel whose safety profile on the parameters to be assessed has been established [18] was used as a placebo.

2. Materials and Methods

2.1. Animals

Twenty healthy sexually mature cycling female olive baboons used in this study. The animals were housed at the Institute of Primate Research (IPR), Nairobi, Kenya which is a WHO Collaborating Centre that ethically utilizes non-human primates to improve human health and is guided by international and local standards including Primate Vaccine Evaluation Network, the Council for the International Organizations of Medical Sciences and the National Institutes of Public Health Service policies. The baboons were fed on a commercial monkey cubes (Unga Feeds Ltd, Nairobi, Kenya) supplemented with fruits, vegetables and water ad libitum. All animal procedures and care were conducted in accordance with internationally accepted standard operating procedures. Prior approval for use of baboons was obtained and sample collection performed following approved Institutional Review Committee (IRC) protocols.

2.2. UniPron

UniPron is an antimicrobial and spermicidal agent that contains citric acid as the active compound. It is a clear fluffy, acidic, water based and non-detergent lubricating gel. The product is heavily buffered with 0.4 gm, 0.8 gm and 1.2 gm concentrations of citric acid having a pH of 3.47, 3.02 and 2.7 respectively. It is composed of Carbomer, sodium benzoate, sodium carboxymethyl cellulose, EDTA, disodium hydrogen phosphate, purified water and citric acid. The buffering agent in UniPron is carbomer (carboxyvinyl polymers of high molecular weights). Its therapeutic classification is antifertility and/or microbicide agent. The product is stable at both room (approximately 22°C) and body temperature and has a shelf life of 24 months. UniPron’s mechanism of action is by lowering vaginal pH to 3.5 immediately after administration and maintaining the acidity for about 3 hours. It has the ability to preserve an acidic vaginal microenvironment due to its highly buffered low pH. Smugel gel, whose safety profile has been evaluated in the baboon model [19] was used as a placebo.

2.3. Study Procedures

Samples were collected from all the animals to obtain baseline data of vaginal pH, vaginal flora, and blood chemistry, vaginal and cervical mucosal integrity. Thereafter, the animals were randomized 1:1:1:1 to receive placebo (Smugel), UniPron 0.4 gm, 0.8 gm or 1.2 gm. Pre-clinical safety studies of intravaginally administered UniPron were performed in baboons to closely mimic the intravaginal application of a vaginal microbicidal contracetptive gel in women. The packaged 15 ml of the study gels in prefilled single use applicators were applied into the vagina of each animal twice a week for eight weeks, followed by sample collection during the entire treatment period and after the treatment. Vaginal and cervical biopsies were collected at baseline and at the end of vaginal gel application. Before any vaginal insertions for pH assessment, sample collection or gel application, the vulva was disinfected using betadine.

2.4. Vaginal pH

Vaginal pH was assessed for five weeks before treatment to obtain baseline data. Thereafter the assessment was done every week during the eight weeks treatment period with Smugel and UniPron, and one week post treatment. The pH was assessed twice a week as previously described [18].

2.5. Clinical Chemistry

Ten ml of blood was collected from all the animals before treatment to obtain baseline data. During treatment, blood was collected from each group at week two, four, six, eight, ten (two weeks post treatment) to obtain serum samples for subsequent chemistry assays to evaluate systemic toxicity. The aliquoted sera were used for analysis of total protein (TP-g/dl), albumin (ALB-g/dl), urea (Ure-mg/dl), creatinine (CRE-mg/dl), aspartate aminotransferase (AST-U/L), alanine aminotranferase (ALT-U/L), alkaline phosphatase (ALP-U/L) and total bilirubin (TBIL-mg/dl) as previously described [18].

2.6. Vaginal Microbiology

Vaginal swabs were collected once a week for five weeks from all the animals to establish baseline data. Thereafter, the swabs were collected from each of the four treatment groups during the entire period of gel treatment and one week post treatment. The vaginal swabs were processed and vaginal flora determined from Gram-vaginal smears, vaginal culture and biochemical tests as previously described [18].

2.7. Vaginal and Cervical Biopsies

Every time application of both Smugel and UniPron was done and before collection of biopsies, there was physical examination of the vagina and the cervix to assess any signs of mucosal irritation. Vaginal biopsies were collected once from each animal before treatment to obtain baseline data and at the end of the product application, processed and stained as described [19]. Cervical biopsies were collected at the same time by using an endoscopic cup (Karl Storz, GmbH & Co. KG, Germany) to pinch the epithelium at the external os of the cervix and processed in a similar version.

2.8. Statistical Analysis

Analysis of vaginal pH, serum chemistry and microflora percentage frequency isolation was done using StatView software (version 5.0, SAS Institute Inc, Cary, NC, USA) and the data were expressed as mean±SD ( ± SD). Differences with P values >0.05 were considered not significant at 95% confidence interval (CI).

3. Results

3.1. Baboon Vaginal pH Evaluation

Vaginal pH at baseline was determined to have a mean±SD of 5.2±0.8 (data not shown). The variation observed in vaginal pH during the eight weeks treatment was not statistically significant (P>0.05) across all gel arms (Table 1). Similarly, no significant difference was observed in vaginal pH one week post application.

3.2. Blood Chemistry Parameters

The parameters evaluated included TP, ALB, URE, TBIL, CRE, ALP, ALT and AST. The differences observed across all gel arms were considered not significant (P>0.05) (Table 2). Similarly, no significant differences were observed two weeks post gel application.

Table 1. Vaginal pH of animals treated with Smugel (Placebo) or UniPron (x ± SD). The pH was evaluated during weekly treatment with Smugel or UniPron and one week post treatment

Table 2. Blood chemistry profiles at baseline, during treatment period with Smugel or UniPron and at two weeks post treatment (x ± SD). The chemistry profiles evaluated included TP, ALB, URE, TBIL, CRE, ALP, ALT, and AST

3.3. Vaginal Microbiology

A total of 20 sexually mature cycling female baboons were used in this study. Diverse species of both Gram positive, Gram negative bacteria and yeast cells/Candida were isolated from the vaginal swabs collected from the animals. Of the Gram positive rods, eight species of Lactobacilli, two Coryneform and five other species were isolated. Four species of Lactobacilli, namely L. acidophilus, L. brevis, L. fermentum and L. rhamnosus were found to be frequent. The proportion of swab results with L. acidophilus, for example, were reported as follows; baseline (27%; 17/100); Smugel (23%; 9/40); UniPron 0.4 gm (20%; 8/40); UniPron 0.8 gm 25%; 10/40); UniPron (1.2%; 23/40). Of the coryneform bacteria, both C. glucuronolyticum and C. renale group were found to be common in the baboon vagina with baseline data having more than 50% of the swabs with both species of bacteria. The proportion of swab with these bacteria was found to be high across the four gel groups (Table 3a).

Table 3a. Percentage frequency isolation of gram positive rods at baseline and during treatment with Smugel (placebo) or UniPron

Table 3b. Percentage frequency isolation of gram positive cocci at baseline and during treatment with Smugel (placebo) or UniPron

Table 3c. Percentage frequency isolation of gram negative rods and yeast cells at baseline and during treatment with Smugel (placebo) or UniPron

In the Gram positive cocci group, six species of Staphylococci and two Streptococci were isolated. The Staphylococci included S. aureus, S. xylosus, S. hyicus, S. chromogenes, S. hominis and S. lentus. S. aureus was found to be the most common staphylococcus species; baseline (46%; 46/100); Smugel (38%; 15/40), UniPron 0.4 gm (45%; 18/40), UniPron 0.8 gm (33%; 13/40). UniPron 1.2 gm (38%; 15/40). A. viridans and Enterococcus faecalis were the only Streptococci species isolated. A. viridans was the most predominant bacteria and was found in more than 50% of the swabs both at baseline and across the four gel groups (Table 3b). Also isolated were four species of Gram negative rods namely E. faecalis, E. coli, G. vaginalis and Klyuvera spp. E. faecalis and E. coli were more common than the other rods in this group (Table 3c). In addition to bacteria, the swabs were also found to harbor four species of Candida; C. albicans, C. krusei, C. guilliermondii and C. tropicalis. C. albicans was found to be the most common candida in the baboon vaginal swabs collected (Table 3c). A few microbes such as S. lentus, Kliyuvera spp and C. tropicalis were not reported at baseline, but later appeared from a few swabs collected during treatment with the study gels. Similarly, a few other microbes including L. rafinolactis, S. chromogenes, G. vaginalis and C. krusei were reported at baseline, but did not appear during treatment at certain gel arms. Other than the few missing isolates, the proportion of vaginal swabs with microbes was approximately equally distributed both at baseline and across the four treatment groups (Table 3a, Table 3b, and Table 3c).

3.4. Biopsies

There was no detectable incidence of abnormal pelvic examination finding after repeated exposure to three concentrations of UniPron or placebo gels. Evaluation of histological sections by light microscopy indicated that, application of UniPron 0.4 gm, 0.8 gm and 1.2 gm twice weekly did not cause any detectable alterations in the cervicovaginal lining of the baboon vagina as no incidence of abnormal pelvic examination finding was observed. The epithelial architecture of vagina of the baboons treated with UniPron across gel arms was largely comparable to baseline and placebo treated biopsies with no detectable alterations such as erythema, edema and/or erosion of the cervicovaginal epithelial lining and leucocyte infiltration being observed (Figure 1 and Figure 2).

Figure 1a-f. Histology of the vaginal mucosa of baboons at baseline and after treatment with Smugel and UniPron. Vaginal biopsies were obtained from the animals in the follicular and luteal phases of the menstrual cycle. (a) Baseline follicular; (b) Smugel treated follicular; (c) UniPron 0.4gm treated follicular; (d) Baseline luteal; (e) UniPron 0.8gm treated luteal; (f) UniPron 1.2gm treated luteal (H&E ×400)

Figure 2a-e. Histology of the cervical mucosa of baboons during luteal phase of the menstrual cycle. (a) Baseline; (b) Smugel treated; (c) UniPron 0.4 gm; (d) UniPron 0.8 gm treated; (e) UniPron 1.2 gm treated (H&E ×400)

4. Discussion

There is renewed emphasis on the development of multifunctional prevention technologies, that is, products designed to address multiple STIs. Dual-protection contraceptive microbicidal products are being designed to prevent STIs and pregnancy [2]. Since consistent and correct use of these products will be critical to their effectiveness, the active pharmaceutical ingredients must be delivered in acceptable vaginal dosage forms such as gels. This study evaluated the safety of UniPron 0.4 gm, 0.8 gm and 1.2 gm compared to placebo administered twice weekly for eight weeks in the baboon model. The baseline data were collected before administration of any intravaginal product to provide for comparisons in the subsequent topical product testing. Repeated exposure of the baboon vagina to the three concentrations of UniPron did not induce detectable toxicity. Assessment of product safety included vaginal pH, clinical chemistry profile, vaginal microflora and cervicovaginal mucosal integrity. The baseline vaginal pH observed was 5.2±0.8 and no significant differences in the pH (P>0.05) was found to have occurred during treatment across the four gel arms and one week post treatment (Table 1). Similarly, analysis of blood chemistry parameters revealed no significant differences between baseline and the data obtained during treatment and two weeks post treatment with respect to TP, ALB, CRE, AST, ALT, ALP and TBIL (Table 2) that relate to liver and kidney functions. These findings indicate that the gel neither interfered with baboon vaginal pH, nor clinical chemistry profiles of the parameters tested.

Like the human vagina, the baboon vagina is a dynamic and complicated environment composed of varying microbiological species in variable quantities and proportions. Elucidating how a vaginal product interacts with the vaginal microenvironment constitutes a critical step in evaluating their safety, as the disturbance of this micro environment has been linked with several disease states [20,21] and associated with increased susceptibility to STIs possibly due to related changes in innate defense responses from the epithelial cells [22]. UniPron gel usage did not alter the baboon vaginal microbial flora within the confines of the current study design. However, there were slight variations in the percentage frequency isolation of all the microbes isolated (Table 3a, Table 3b, Table 3c). The differences were not significant and could not be conclusively linked to the use of any of the study gels. For instance, the percentage frequency isolation was high for some microbes such as C. glucuronolyticum, C. renale group and A. virudance (Table 3a, Table3b) both at baseline and across the four gel arms, with A. viridans being isolated from more than 50% of the vaginal swabs from each group. For other microbes such as S. chromogenes, S. lentus, Klyuvera spp, G. vaginalis and all species of Candida except C. albicans, (Table 3b, Table3c) the percentage frequency isolation was less than 10% both at baseline and across the four gel arms. The diverse composition of the baboon vaginal microbiota and the variation in percentage frequency isolation could not be attributed to treatment with any of the study gels, but could be as a result multiple factors such as host-specific relationships, composition of vaginal secretions and receptors on vaginal epithelial cell surfaces or vaginal tract tolerance to a variety of different strains of bacteria [23], a feature that might contribute to survival of primate species. In addition the vaginal flora characteristic is also of transient nature.

The healthy cervicovaginal mucosa represents an efficient barrier against STIs and dissemination of pathogens [24]. Histopathology results of biopsies obtained from UniPron treated animals showed that UniPron concentrations of 0.4 gm, 0.8 gm and 1.2 gm were non-toxic and did alter the integrity of the cervicovaginal mucosa (Figure 1 and Figure 2). Abnormal gross pelvic examination finding such as edema, erythrema excoriations or abrations were not identified. Several vaginal products, microbicidal or microbicidal contraceptive trials have been terminated due to safety concerns [16,17]. Vaginal contraceptive products have been available for many years and usually contain the membrane surfactant N-9 as one of the main ingredient. This has been associated with cytotoxic effect on the vaginal cells and increased genital tract inflammation thereby potentiating the transmission of infectiousness of STIs including HIV by recruitment of white blood cells to the genital tract and possibly, by upregulation of genital cytokines [25]. In addition, N-9 is also known to inactivate lactobacilli, which form the normal flora in vaginal tissues [26]. It is essential that the evaluation of the potentially harmful effects of these compounds on the vaginal epithelium and/or normal vaginal flora should be made before these products are used in human clinical trials. Partly due to the recent failures in human microbicide trials [27] there is an emerging consensus that pre-clinical safety and efficacy testing of vaginal microbicidal contraceptive candidates in nonhuman primates should precede to human trials. The development of different dosage forms will help ensure that women can find a method to protect themselves from pregnancy, and potential STIs [28]. Evaluation of the vaginal pH, microbiologic and histology of the baboon model has characterized the baboon vaginal environment’s response to repeated topical product application in the absence of the exogenous factors of intercourse and potential infectious ejaculate. The three concentrations of UniPron appeared to be safe and well tolerated based on the results of the study in the baboon model. These data support the need for future studies of this product and demonstrate that it is feasible to use the baboon model for assessment of potential vaginal microbicidal products.

References

[1]   | Potts M. (1994). The urgent need for a vaginal microbicide in the prevention of HIV transmission. Am J Public Health. 84: (6): 890-1.
[2]   | Thurman AR, Clark MR & DoncelGF. (2011). Multipurpose Prevention Technologies: Biomedical Tools to Prevent HIV-1, HSV-2, and Unintended Pregnancies. Infect Dis Obstet Gynecol. 2011:1-10.

[3]  
Abdool Karim Q, Abdool Karim SS, Frohlich JA, Grobler AC, Baxter C, MansoorLE,Kharsany ABM, Sibeko S,1 Mlisana KP, Omar, Gengiah TN, Maarschalk S, Arulappan N, Mlotshwa M, Morris L & Taylor D. (2010). Effectiveness and safety of tenofovir gel, an antiretroviral microbicide, for the prevention of HIV infection in women. Science. 329: (5996):1168-74.

[4]   | Ashish J Lokesh K, Bhavana K, Monika S, Aastha P, Vikas V, Vikas S, Vishal S, Tara R & Vishnu L. S. (2013). Combining a synthetic spermicide with a natural trichomonacide for safe, prophylactic contraception. Hum. Reprod.
[5]   | Keller MJ, Carpenter CA, Lo Y, Einstein MH, Liu C, Fredricks DN & Herold BC. (2012). Phase I Randomized Safety Study of Twice Daily Dosing of Acidform Vaginal Gel: Candidate Antimicrobial Contraceptive. PLOS One 7:10:e46901.
[6]   | Elias CJ & Heise LL (1994). Challenges for the development of female-controlled vaginal microbicides. AIDS. 8: (1):1-9.
[7]   | Uckun FM, D’Cruz OJ. Prophylactic contraceptives for HIV/AIDS. Human Reprod Update, 1999, 5: (5): 506-14.
[8]   | D’Cruz OJ & (2004). Uckun FM. Clinical development of microbicides for the prevention of HIV infection. Curr Pharm Design. 10: (3): 315-36.
[9]   | Obiero J, Maureen, Ndung’u, M. Waititu KK, Mulei I, Farah IO& Peter G. Mwethera UniPron is A Fully Effective Non-hormonal Reversible Contraceptive in Baboon Model (Papio Anubis). (2008). J Reprod & Contracep. 19: (2): 107-18.
[10]   | Mburu N, Obiero JA, Waititu K, Mwaura BN, Orawo JO, Farah IO & Mwethera PG. (2009). Safety Studies of a Recently Developed Microbicidal Contraceptive Gel (UniPron) in Female Baboons (Papio anubis). Afri J Reprod Health. 13: (4):95-104.
[11]   | McGowan I, Gomez K, Bruder K, Febo I, Chen BA, Richardson BA, Husnik M, Livant E, Price C & Jacobson C. (2011). Phase 1 randomized trial of the vaginal safety and acceptability of SPL7013 gel (VivaGel) in sexually active young women (MTN-004). AIDS. 25(8):1057-64.
[12]   | Sokal DC, Karim QA, Sibeko S, Yende-Zuma N, Mansoor LE, Baxter C, Grobler A, Frolich J, Kharsany AB, Miya N, Mlisana K, Maarshalk S & Karim SS. (2013). Safety of tenofovir gel, a vaginal microbicide, in South African women: results of the CAPRISA 004 Trial. Antivir Ther. 18: (3):301-10.

[13]  
Grammen C\, Ariën KK, Venkatraj M, Joossens J, Van der Veken P, Heeres J, Lewi PJ, Haenen S, Augustyns K, Vanham G, Augustijns P & Brouwers J. (2014). Development and in vitro evaluation of a vaginal microbicide gel formulation for UAMC01398, a novel diaryltriazine NNRTI against HIV-1. Antiviral Res. 101: 113-21.

[14]   | Wilkinson D, Tholandi M, Ramjee G, & Rutherford GW. (2002). Nonoxynol-9 spermicide for prevention of vaginally acquired HIV and other sexually transmitted infections: systematic review and meta-analysis of randomised controlled trials including more than 5000 women. Lancet Infect Dis 2002; 2: 613-7.

[15]  
Van Damme L, Ramjee G, Alary M, Vuylsteke B, Chandeying V, Rees H, Sirivongrangson P, Mukenge-Tshibaka L, Ettiègne-Traoré V, Uaheowitchai C, Karim SS, Mâsse B, Perriëns J, Laga M. (2002). Effectiveness of COL-1492, a nonoxynol-9 vaginal gel, on HIV-1 transmission in female sex workers: a randomised controlled trial. Lancet. 360: (9338): 971-7.

[16]   | Obiero J, Mwethera PG &Wiysonge CS. (2012). Topical microbicides for prevention of sexually transmitted infections (2012). Cochrane Database System Rev. Issue 6. Art. No.: CD007961.
[17]   | Obiero J, Mwethera PG, Hussey GD, Wiysonge CS. (2012). Vaginal microbicides for reducing the risk of sexual acquisition of HIV infection in women: systematic review and meta-analysis. BMC Infectious Diseases. 12: 289.
[18]   | Obiero JA, Kunyera R, waititu KK, Mulei I, Farah IO, Linge K, Jaoko W & Mwethera PG. (2013). A Comparative Study of Smugel and KY Jelly Vaginal Lubricating Gels. J Reprod Contracep. 24: (2):76-87.
[19]   | Nyachieo A, Kiulia NM, Arimi MM, et al. Vaginal histological changes of the baboon during the normal menstrual cycle and pregnancy. East Afr Med J, 2009, 86(4):166-72.
[20]   | Sobel JD. (2000). Bacterial vaginosis. Annu Rev Med. 2000. 51:349-356.
[21]   | Ursell LK, Gunawardana M, Chang S, Mullen M, Moss JA, Herold BC, Keller MJ, McDonald D, González A, Knight R & Baum MM. (2013). Comparison of the vaginal microbial communities in women with recurrent genital HSV receiving acyclovir intravaginal rings. Antiviral Res. 19: (102C): 87-94.
[22]   | Rose WA II, McGowin CL, Spagnuolo RA, Eaves-Pyles TD, Popov VL & Pyles RB. (2012). Commensal Bacteria Modulate Innate Immune Responses of Vaginal Epithelial Cell Multilayer Cultures. PLoS One. 7: (3): e32728.
[23]   | Rivera, AJ, Stumpf RM, Wilson B, Leigh S & Salyers AA. (2010). Baboon vaginal microbiota: an overlooked aspect of primate physiology. Am J Primatol. 72: (6): 467-74.
[24]   | Fichorova RN, Yamamoto HS, Delaney ML, Onderdonk AB & Doncel GF. (2011). Novel vaginal microflora colonization model providing new insight into microbicide mechanism of action. mBio. 2: (6):e00168-11.
[25]   | Stafford MK, Ward W, Flanagan A, Rosenstein IJ Taylor-Robinson D, Smith JR, Weber J & Kitchen VS. (1998). Safety study of nonoxynol-9 as a vaginal microbicide: evidence of adverse effects. J Acquir Immune Defic Syndr Hum Retrovirol. 17: 327-31.
[26]   | Richardson BA, Martin HL Jr, Stevens CE, Hillier SL, Mwatha AK, Chohan BH, Nyange PM, Mandaliya K, Ndinya-Achola J & Kreiss JK. (1998). Use of nonoxynol-9 and changes in vaginal lactobacilli. J Infect Dis. 178: (2): 441-5.
[27]   | Veazey RS. (2008). Microbicide Safety/Efficacy studies in animals -macaques and small animal models. Curr Opin HIV AIDS. 3: (5).
[28]   | Rosenberg ZF & Devlin B. (2012). Future strategies in microbicide development. Best Pract Res Clin Obstet Gynaecol. 26: (4): 503-13.