Dear Label_Name,

Greetings! I hope you are well.

I am writing on behalf of an international publishing house, Science and Education Publishing, USA (http://www.sciepub.com).

Science and Education Publishing (SciEP) is a multidisciplinary open access publisher of Journals covering the fields of Science, Technology and Medicine. All SciEP publications are subject to high-quality peer review, editorial and production processes and are freely available online.

Welcome to the April, 2013 edition of SciEP newsletter, providing monthly summaries of articles on science & education related topics of interest to scientist and professionals. The mission of our journals is to provide an open access forum for publishing new findings on issues pertinent to scientific and academic field. We also invite you to submit original research papers, review articles, short reports, or case studies are considered for publication in our Multidisciplinary Journals.

American Journal of Public Health Research
DOI: 10.12691/ajphr-1-1-3

The Implementation of a Tele-Homecare System with Service Oriented Architecture and HL7 Message Transmission Standard
Ching-Sung Wang

American Journal of Medical and Biological Research
DOI: 10.12691/ajmbr-1-1-2

The Influence of Ethanol on Pyruvate Kinases Activity in Vivo, in Vitro, in Silico
Lelevich Sergey Vladimirovich, Khrustalev Vladislav Victorovich, Barkovsky Eugene Victorovich, Shedogubova Tatyana Aleksandrovna

American Journal of Medical Sciences and Medicine
DOI: 10.12691/ajmsm-1-1-1

Clinical and Histological Features in Wegener Granulomatosis
Li Cavoli Gioacchino, Passantino Rita, Bono Luisa, Tortorici Calogera, Ferrantelli Angelo, Giammarresi Carlo, Rotolo Ugo

American Journal of Infectious Diseases and Microbiology
DOI: 10.12691/ajidm-1-1-2

The Curse of Lymphatic Filariasis: Would the Continual Use of Diethylcarbamazine Eliminate this Scourge in Papua New Guinea?
Anne Lanham, Lillian Mwanri

We have released issues of some journals on February 2013.
American Journal of Public Health Research
American Journal of Medical Sciences and Medicine
American Journal of Medical and Biological Research
American Journal of Pharmacological Sciences
American Journal of Clinical Medicine Research
American Journal of Nursing Research
American Journal of Cancer Prevention
American Journal of Medicine Studies
American Journal of Infectious Diseases and Microbiology
American Journal of Cardiovascular Disease Research
American Journal of Biomedical Research
American Journal of Mechanical Engineering
American Journal of Microbiological Research
Journal of Preventive Medicine
American Journal of Food and Nutrition
American Journal of Hypertension Research
American Journal of Sports Science and Medicine
Journal of Cancer Research and Treatment
American Journal of Zoological Research
Journal of Biomedical Engineering and Technology
American Journal of Microbiological Research
Biomedical Science and Engineering

We are pleased to announce that submissions are now being accepted for peer review for all the journals across all our subject areas in SciEP.

Please submit your manuscript via our online submission system:
http://www.sciepub.com/author/signin

To unsubscribe from our mailing list, please click on the following link: unsubscribe

I am looking forward to hearing from you.

Kind regards,

David Rain
Email:join@sciepub.com
Science and Education Publishing (http://www.sciepub.com)

Assessment of Ground Water Quality of Bhagwanpur Industrial Area of Haridwar in Uttarakhand, India

Bhavtosh Sharma*, Krishna Kumar Savera, Sudhanshu Kausik, Pankaj Saini, Sushil Bhadula, Vijay Sharma, Prashant Singh

Uttarakhand Science Education & Research Centre (USERC), Dehradun-248 006, Uttarakhand, India

Abstract: The ground water quality of Bhagwanpur Industrial Area of Haridwar district of Hilly state Uttarakhand in India has been studied. Under the study, the ground water samples were collected as per Bureau of Indian Standard from the selected locations of the area with the identification of their longitude and latitude. The GIS locations of the sampling sites have been shown in GIS map. Further, the samples were analyzed as per guidelines of BIS for 12 drinking water quality parameters like Colour, Temperature, pH, Total Hardness, Alkalinity, Chloride, TDS, Sulfate, Nitrate, Fluoride, Arsenic and Iron in analytical laboratory within the standard time limit of analysis. The results of the study have been explained in the paper. The Arsenic and Iron values in the ground water samples in some places have been found more than BIS standard limits. The probable reasons of the problem with the hydrogeology of Bhagwanpur area have also been described in the paper.

Keywords: drinking water, ground water, water quality, chemical analysis, Bhagwanpur industrial area, Haridwar, Uttarakhand, India

Citation: Bhavtosh Sharma, Krishna Kumar Savera, Sudhanshu Kausik, Pankaj Saini, Sushil Bhadula, Vijay Sharma, Prashant Singh, Assessment of Ground Water Quality of Bhagwanpur Industrial Area of Haridwar in Uttarakhand, India. Applied Ecology and Environmental Sciences, 4 (4). 96-101. January 2016. doi:10.12691/aees-4-4-3

1. Introduction

Water is a precious prime natural resource on the planet earth which plays a vital role in various sectors like domestic applications, agriculture, industrial activities, hydropower generation, fisheries, livestock production, forestry and other creative activities [1]. Currently, the surface water quality as well as ground water quality has become serious due to several factors like rapid increase in the population, urbanization, deforestation, industrialization etc. in the plain areas of the state. Due to these reasons, the water levels of water sources are getting depleted and unfavorably affected in both way quantitatively and qualitatively [2-24]. During the past decades, careless and unscientific patterns of disposal of industrial, agricultural, and domestic wastes have enlarged the problem of pollutants which are contaminating not only the surface waters but groundwater sources also [25]. Water quality of any area or water source can be monitored by its physical, chemical and biological characteristic. Moreover the landfill sites and mining waste dumps are some factors of metal pollution in drinking water. The higher amounts of the metal ions create human health problems [10,11,12,26,27,28,29,30]. Metals such as copper, iron, aluminium, calcium, chromium, lead, magnesium, manganese etc. may occur in drinking water due to geogenic activities or may be due to anthropogenic activities [31]. The researchers are working on improving existing analytical tools for the determination of elements upto nano, pico, and femto levels. The regular monitoring has become necessary to know the existing water quality status and the level of potential pollutants in the water for researchers and decision makers [26,27,28,29].

Hilly state Uttarakhand is comprised of two regions as Kumaun and Garhwal regions where geographical conditions are entirely different from the other plain areas of the country. In the state, the local community uses numerous traditional water management techniques to store water for their drinking and irrigation uses [3]. Tube wells are the main sources of irrigation in Haridwar district. According to Central Ground Water Board (CGWB), rainfall is the only source of water for ground water recharge in the area. There are 225 State Government tube-wells and 32930 private tube wells. The average rainfall of Hardwar district is about 1174.3 mm per annum. Haridwar district is divided in Roorkee, Bhagwanpur and Laksar Tehsils and have 06 developmental blocks like Bhagwanpur, Laksar, Khanpur, Roorkee, Bahdarabad and Narsan [32]. A large portion of population lives in the hilly parts of the state and approximately 90 % of the rural population depends upon the natural water sources for their survival. The production of drinking water occurs by alluvial aquifers that are hydraulically associated with a water system.

Hardwar district of Uttarakhand comes under Gangatic riverine system and has the Solani, Ratmau Rao and Banganga as main tributaries of the area. Geologists have divided Haridwar area into three zones such as Siwalik, Bhabar and Gangetic Alluvial Plains from North to South. The selected Bhagwanpur area of Haridwar falls under only Upper and Middle Siwalik zones. In which the Upper Siwalik zone holds the boulders, pebbles, sand and clay where as the Middle Siwalik zone comprises mostly grey micaceous sandstone and siltstone. The major part of Bhagwanpur block has been occupied by Gangetic Alluvial Plains and lithologically, the alluvium is composed of unconsolidated to semi-consolidated deposits of sand, silt, clay and kankar.

The water levels are declining at faster rate in Bhagwanpur Block due to heavy pressure on ground water. However, the ground water abstraction for drinking, domestic and agriculture purposes is higher in Bhagwanpur block as compared to other blocks. The quality of water of any specific area can be assessed by physico-chemical and biological parameters of water. The values of these parameters are harmful for human health if they found more than limits. Characterization of water quality is necessary to study about the existing water quality. The assessment of water quality includes sampling, analyzing and characterization of drinking water samples obtained from sources on continuous basis, which explains the quality of water after comparing with water quality standards [32-39]. In Haridwar district, an industrial estate is developed at Bhagwanpur other than SIDCUL of Haridwar. The impact of Industrial development on natural resources specially on ground water resource has become necessary to study. Therefore, it has been decided to study the ground water quality. We have selected 04 sites in Bhagwanpur industrial area for ground water monitoring which is about 11 km away from Roorkee. The results of this monitoring are interpreted in the present paper.

2. Materials and Method

2.1. Study Area

The selected study area Bhagwanpur is a town of Haridwar district in Uttarakhand state of India. The GPS co-ordinates of the selected locations for water sampling were collected by using a GPS system (Make: Garmin, Taiwan; Model: GPSmap 76CSx). The sampling locations are depicted in the Map (Figure 1) using the coordinates. The following four sampling locations were identified for water sample collection near industrial area of Bhagwanpur.

Table

Figure 1. Water sample collection sites of Bhagwanpur area in Map

2.2. Water Sample Collection

Water samples from 04 locations were collected 02 times from each siteduring March and April month of 2015 considering the guideline of BIS [27] (BIS: 10500, 2012; APHA 2015). High-density polyethylene Tarson brand bottles were used after 2-3 times rinsing with the sample of each site. Ground water samples from tube well and hand pumps were obtained. For the analysis of trace metals, ground water samples were collected in acid-leached polyethylene bottles. The samples were preserved by the addition of 5 ml ultra pure nitric acid in one liter sample to minimize the adsorption and precipitation by lowering the pH less than two 2. Some important water quality parameters such as turbidity and pH of the collected samples were measured at the time of sample collection on the site. The collected water samples were carried to State Level Water Quality Analysis Laboratory in Uttarakhand Jal Sansthan campus, Dehradun in sample box at 4°C temperature for further analysis.

2.3. Water Sample Analysis in Laboratory

The water samples were analyzed in the laboratory with the available facilities in the laboratory [27,29,32-39]. Total 15 water quality parameters were analyzed in the laboratory as given in Table 1.

Table 1. Instruments used in water quality analysis

3. Results

The collected water samples were analyzed in laboratory for 12 drinking water quality parameters such as Colour, Temperature, pH, Total Hardness, Alkalinity, Chloride, TDS, Sulfate, Nitrate, Fluoride, Arsenic and Iron using various specific analytical instruments (Table 1). According to BIS 10500 (2012), the desirable limit for drinking water has been explained as acceptable limit and permissible limit as a limit in the absence of alternate source [26]. The mean values and standard deviations were studied and shown in Table 2 for March and April samples of 2015.

The values of colours of the ground water samples of Bhagwanpur (no. 1 and 2) sites are below the desirable limit of BIS where as the colour of Bhagwanpur no. 4 site were within the desirable limit (DL) and permissible limit (PL). The pH values of all the samples during both the months were also found within the DL and PL of BIS specification.

Total hardness and alkalinity values of all the samples in March and April Months were well within DL and PL standard values of BIS. In March month, only site no 2 and 3 show the highest value of total hardness as 343 mg/l whereas site no 2 has highest value of 363 mg/l hardness in April month. On the other hand in case of Alkalinity, site no. 4 shows the highest value as 372 and 371 mg/l in March and April months respectively.

The chloride values of all the four selected site samples of Bhagwanpur area were found less than the desirable standard limit of BIS during both the months of monitoring. Similarly, the total dissolved solids (TDS) values of all the samples were fall below the DL values. Among all the 04 sites, only Bhagwanpur-4 (no. 4) site shows the highest TDS values.

Sulphate, Nitrate and Fluoride values of the samples were also less than their desirable limits during both times of monitoring. Only arsenic values of all the four samples in both the months were analyzed as slightly greater than DL values.

The amount of Iron in the sample of third sampling site (Bhagwanpur-3) was found more than the DL of BIS as 0.61 mg/l and 0.68 mg/l in March and April months respectively. The remaining samples showed iron values less than 0.30 mg/l in both the months.

Table 2. Water quality analysis results of all the four selected sites

Figure 2A. Results of total eight water quality parameters during the Months of March and April 2015

Figure 2B. Nitrate, Fluoride, Arsenic and Iron values during the months of March and April 2015

4. Discussion

Almost all the drinking water quality parameters of all the ground water samples under the study were within the standard limits of BIS except Arsenic values of all the four sites in both the months and Iron values of Bhagwanpur site no. 3 in March and April months were also found more than BIS values (Figure 2A and Figure 2B). The reason of the higher values of Arsenic and Iron may be the effect of Industrial developmental activities in the area which affect the ground water quality. Although, the development of Ground water in Hardwar district has been performed through tube wells but suitable management is necessary to reduce the excess withdrawal of ground water in Bhagwanpur block. Excess withdrawal of ground water in this area may also be a reason for this metallic contamination. Besides this, Rainwater harvesting and artificial recharge practices should be adopted on a larger scale by the local people of the area. According to Hydrogeologically point of view, Alluvium as the main water bearing formation of Bhagwanpur area, having coarse sand, fine sand and silt. CGWB reported that the water level data of the area have showed the presence of multilayer aquifer system. As per CGWB, the stage of ground water development is about 96.40%. Hydrogeological investigations of CGWB reports that the water levels in Hardwar district are sustained apart from Bhagwanpur block. The water levels in Bhagwanpur block are declining (CGWB) [31]. Specific Suitable measures may be beneficial to maintain the ground water quality of the area [6,7,17,40].

5. Conclusion

The ground water quality of Bhagwanpur industrial area of Haridwar has been studied for the 12 selected drinking water quality parameters as per BIS. After the analysis of samples, it has been found that the overall water quality of the area is good except the higher values of arsenic and iron at some places. Geogenic or industrialization may be the reasons for this type of issues. However, the ground water may be used for the purposes as well as the treatment of such water can also be adopted before use. Regular monitoring of the ground water samples of Bhagwanpur area is required by concerned departments and the reports of the monitoring should be shared among the concerning departments.

Acknowledgements

The authors are thankful to the Director USERC and Chief General Manager Uttarakhand Jal Sansthan for providing necessary facilities to complete the M.Sc. dissertation work of Mr. Krishna Kumar Savera. Besides, the authors are also thankful to Ms. Monika Rawat to help in the preparation of GIS map of the sites and Society of Environmental Education & Mass Awareness (SEEMA), Haridwar for the technical support during the entire study.

References

[1]   | Kumar R., Singh R.D. and Sharma K.D. 2005. Water Resources of India. Current Science, 89 (5), 794-811.
[2]   | Sharma B. and Uniyal D.P., “Water Resources” in “Uttarakhand: State of the Environment Report (SOER)”, Published by Dept. of Science & Technology, Govt. of Uttarakhand, Dehradun, pp. 144-209, 2012.
[3]   | Rawat A.S. and Sah R. 2009. Traditional knowledge of water in Kumaun Himalaya. Indian Journal of Traditional Knowledge, 8(2), 249-254.
[4]   | Bhandari N.S. and Joshi H.K. 2013. Quality of spring water for irrigation in the Almora district of Uttarakhand, India. Chinese Journal of Geochemistry, 32, 130-136.
[5]   | Tyagi S. and Sharma B., Occurrence of Pharmaceutical Pollutants in Water Resources and Their Remediation Techniques in Current Trends in Environmental Resource Management”, Gaura books India Pvt. Ltd, New Delhi. pp. 141-162, 2014.
[6]   | Sharma B., Jadon V. S., Rana, R. S., Singh P. and Sanjay Gupta, Pharmaceutical Industry Waste Water: Monitoring and Management, In Water Resources Management & Treatment Technologies, pp. 171-202, 2016.
[7]   | Water Resources Management & Treatment Technologies, Edited by Sharma B., Nautiyal O.P. and Pant D. Published by Uttarakhand Science Education & Research Centre (USERC) and Bishen Singh Mahendra Pal Singh Publisher, Connaught Palace, Dehradun, Uttarakhand, India (2016).
[8]   | Sharma B., Tyagi S., Singh P., Dobhal R. and Jaiswal V. 2015. Application of Remote Sensing and GIS in Hydrological Studies in India: An Overview, National Academy Science Letters, 38 (1), 1-7.
[9]   | Tyagi, S., Singh P., Sharma, B., Singh, R., Dobhal, R. and Uniyal, D.P. 2015. Bacteriological Assessment of Drinking Water Sources of Uttarakhand, India, National Academy Science Letters. 38 (1), 37-44.
[10]   | Gupta V.K., Dobhal R., Nayak A., Agarwal S., Uniyal D.P., Singh P., Sharma B., Tyagi S. and Singh R. 2012. Advanced and Hyphenated Techniques for Nano-Level Analysis of Iron in Water. Critical Reviews in Analytical Chemistry, 42:245-256.
[11]   | Gupta V.K., Dobhal R., Nayak A., Agarwal S., Uniyal D.P., Singh P., Sharma B., Tyagi S. and Singh R. 2012. Toxic metal ions in water and their prevalence in Uttarakhand, India. Water Science & Technology: Water Supply, 12(6), 773-782.
[12]   | Gupta V.K., Dobhal R., Nayak A., Agarwal S., Uniyal D.P., Singh P., Sharma B., Tyagi S. and Singh R. 2012. Arsenic speciation analysis and remediation techniques in drinking water. Desalination and Water Treatment, 40(1-3), 231-243.
[13]   | Sharma B., Tyagi S, Singh R. and Singh P. 2012. Monitoring of Organochlorine Pesticides in Fresh Water Samples by Gas Chromatography and Bioremediation Approaches. National Academy Science Letters, 35(5), 401-413.
[14]   | Dobhal, R. et al., 2011. Pesticides Management in Surface and Ground Waters of India”, International Journal of Science Technology and Management, 2(1), 8-17.
[15]   | Vikas Chander et al., 2014. Environmental and Health Hazards due to Pharmaceutical Effluents. International Journal of Pharmacy Research & Review, 4, 100-103.
[16]   | Sharma B., Singh R., Singh P., Uniyal D.P. and Dobhal R. 2015. Water Resource Management through Isotope Technology in Changing Climate, American Journal of Water Resources, 3(3) 86-91.
[17]   | Sharma B. 2016. Sustainable Drinking Water Resources in Difficult Topography of Hilly State Uttarakhand, India. American Journal of Water Resources, 4(1), 16-21.
[18]   | Sharma B., 2014. Nature of Chiral Drugs and Their Occurrence in Environment. Journal of Xenobiotics, 4, 14-19.
[19]   | Chander V., Sharma B., Negi V., Aswal R.S., Singh P., Singh R. and Dobhal R. 2016. Pharmaceutical compounds in drinking water. Journal of Xenobiotics, 6, 5774.
[20]   | Seth R., Singh P., Mohan M., Singh R. and Aswal R.S. 2013. Monitoring of phenolic compounds and surfactant in water of Ganga, Haridwar (India). Applied Water Science, 3(4), 717-720.
[21]   | Rani N, Sinha R.K., Prasad K. and Kedia D.K. 2011. Assessment of temporal variation in water quality of some important rivers in middle Gangetic plain, India. Environment Monitoring Assessment, 174, 401-415.
[22]   | Alam J.B., Hossain A., Khan S.K., Banik B.K., Islam M.R., et al. 2007. Deterioration of water quality of Surma River. Environment Monitoring Assessment, 134, 233-242.
[23]   | Cruz J.V. and Amaral C.S. 2004. Major ion chemistry of groundwater from perched-water bodies of the Azores (Portugal) volcanic archipelago. Applied Geochemistry, 19, 445-459.
[24]   | Ali I., Singh P., Aboul-Enein H.Y. and Sharma, B. 2009. Chiral Analysis of Ibuprofen Residues in Water and Sediment. Analytical Letters, 42, 12, 1747-1760.
[25]   | Lacorte, S. Pollutants in Water: Analysis by Chromatography. In Encyclopedia of Chromatography, 2nd ed.; Cazes, J., Ed.; Taylor and Francis: Boca Raton, Fla., Vol. 2; pp. 1301-1308, 2005.
[26]   | Guidelines for Drinking-water Quality, Fourth Edition, World Health Organization 2011.
[27]   | Bureau of Indian Standards, Specification for drinking water. IS: 10500, New Delhi, India, 2012.
[28]   | Guide Manual: Water and Waste Water, Central Pollution Control Board, New Delhi.
[29]   | Eaton A.D., Clesceri L.S., Rice E.W. and Greenberg A.E. 2005. Standard methods for the examination of water and wastewater. American Public Health Association, Washington, DC.
[30]   | Knobeloch L., Salna B., Hogan A., Postle J. and Anderson, H. 2000. Blue babies and nitrate contaminated well water. Environment Health Perspectives, 108(7), 675-678.
[31]   | Sharma, B. and Tyagi, S. 2013. Simplification of Metal Ion Analysis in Fresh Water Samples by Atomic Absorption Spectroscopy for Laboratory Students. Journal of Laboratory Chemical Education, 1(3), 54-58.
[32]   | Central Ground Water Board (CGWB). (http://cgwb.gov.in/District_Profile/Uttarakhand/Hardwar.pdf assessed on 28/09/2016).
[33]   | Tyagi, S., Sharma, B., Singh, P. and Dobhal, R. 2013. Water Quality assessment in Terms of Water Quality Index. American Journal of Water Resources, 1(3), 34-38.
[34]   | Dobhal, et al. 2012. Development of Water Quality Map of Uttarakhand. Bhujal News (Central Ground Water Board, Govt. of India) 27(1-4), 36-41.
[35]   | Tyagi S., Singh P., Sharma B. and Singh, R. 2014. Assessment of Water Quality for Drinking Purpose in District Pauri of Uttarakhand, India. Applied Ecology and Environmental Sciences. 2(4), 94-98.
[36]   | Sharma. B, Uniyal D.P., Dobhal R., Kimothi, P.C. and Grischek, T. 2014. A Sustainable Solution for Safe Drinking Water through River Bank Filtration (RBF) Technology in Uttarakhand, India. Current Science, 107(7), 1118-1124.
[37]   | Tyagi S., Singh P., Dobhal R., Uniyal D.P., Sharma B. and Singh R. 2015. Spatial and temporal variations in quality of drinking water sources of Dehradun district in India. International Journal of Environmental Technology and Management. 18, 5/6, 375-399.
[38]   | Singh P., Dobhal R., Seth R., Aswal R.S., Singh R., Uniyal D.P. and Sharma B. 2015. Spatial and Temporal Variations in Surface Water Quality of Pithoragarh District, Uttarakhand (India), Analytical Chemistry Letters, 5,5, 267-290.
[39]   | Sharma B., Pant H.V. and Pant D. 2015. Monitoring of Pharmaceutical compounds in water and waste water samples by chromatographic methods. International Journal of Environment & Allied Sciences. 1(2) 53-59.
[40]   | Saini V.K., Chauhan M. and Sharma B. Recent advances in Nanomaterial’s Based Wastewater Treatment, In Water Resources Management & Treatment Technologies, pp. 83-112 (2016).